%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

What is BarcodeXpress

Barcode Xpress™, Version 5 is a powerful control which reads most commonly used 1D barcodes, detecting them anywhere on the page, in any orientation. It accurately reads common industry 1D and 2D barcodes, writes most 1D barcodes and many 2D barcodes.

Barcode Xpress ships with ImagXpress and ScanFix Lite, providing world class image clean up capability for use with Barcode Xpress. Configurable speed settings are available to suit various application and budget requirements.

New Features in Version 5.0

Barcode Xpress 5.0 now provides the capability to read these additional Barcodes:

  • Australian Post 4-State Barcode
  • Royal Post 4-State Barcode
  • Intelligent Mail
  • QRcode

Additional Property:

ScanDistance Property - Gets and sets the scan distance in pixels between line sweeps when searching for 1D barcodes.

Additional Enumeration Values:

OrientationInfo Enumeration - Additional value options provide more flexibility for recognition.

HorizontalVertical - Searches for barcodes in horizontal and vertical directions.

HorizontalVerticalDiagonal - Searches for barcodes in horizontal, vertical and 45 degrees.

Changes from version 4.5:

SSXBarcode and SSXBarcodeException Class names have been changed to BarcodeXpress and BarcodeException Classes - Methods and properties remain the same.

Deprecated objects:

OrientationInfo enumeration: The AllOrientations option value is deprecated. Use HorizontalVertical in it's place.

Primary Features Include:

  • Detect, read and write 1D and 2D barcodes
  • Recognize barcodes located anywhere on a page
  • Report confidence values for detected barcodes
  • Provides image input, output and handling by the included ImagXpress component
  • Provides advanced pre-process functionality for image cleanup and modification prior to analysis
  • Seamless integration with Pegasus Imaging Form Processing Suite with streaming support
  • Supported barcode read types:

Show 1D linear barcodes and PatchCode

Add 2

Add 5

Australian Post 4 State Barcode

BCD Matrix

Codabar

Code 32

Code 39

Code 39 Extended

Code 93

Code 93 Extended

DataLogic 2 of 5

EAN-128

EAN-13 and JAN

EAN-8

IATA 2 of 5

Code 128

Industry 2 of 5

Intelligent Mail

Interleaved 2 of 5

Inverted 2 of 5

Matrix 2 of 5

PatchCode (not included as 1D barcode type)

PostNet (not included as 1D barcode type)

Royal Post 4-State Barcode

UPC-A

UPC-E

Show 2D barcodes

PDF417

DataMatrix

QRcode

Barcode Xpress Editions:

BarcodeXpress version 5 is offered in three editions, Standard, Professional, and Professional Plus 2D Write edition. BarcodeXpress Professional Plus 2D Write is the default edition which has the maximum functionality available.

  • BarcodeXpress Standard: is for developers deploying a moderate speed scanning solution, with up to a few barcodes per page.

Standard edition reads approximately 4 barcodes per second. This version suits most document imaging barcode applications.

  • BarcodeXpress Professional: is the unlimited speed barcode engine.

Professional edition is for high-end, high-volume imaging applications where speed is critical for the success of the application. It reads as fast as the processor can handle. It reads and writes common 1D barcodes and reads 2D barcodes PDF417, DataMatrix and QR barcodes. The Professional edition and Professional Plus 2D Write create all tree reading speeds, allowing integrators to sell various speed and price options.

  • BarcodeXpress Professional Plus 2D Write:

    In addition to all the features the regular Professional edition supports including unlimited speed, this new edition also includes the ability to write PDF417 and DataMatrix 2D barcodes.

    Caution: When using trial (unpaid) licensing, the words "UNLICENSED www.jpg.com" will appear in the middle of every DataMatrix and PDF417 barcode created, taking up 24 bytes of space including a space before and after. When testing the contents of generated barcodes, be aware of the extra space requirements.

Additional Pegasus Imaging components in Barcode Xpress include:

  • ScanFix Xpress Lite offering superior image clean up and enhancement capabilities.
  • ImagXpress™ for image import from various formats and advanced image enhancement and clean up.
  • TwainPRO™ to acquire images from TWAIN devices.

Note: Barcode Xpress v5 requires 1-bit black and white images. Conversion from color or grayscale images is available by using the included ImagXpress ColorDepth method or other methods within the included ImagXpress component.

For applications requiring image thresholding, superior results may be obtained by using the Binarize method in ScanFix Bitonal edition, or the Binarize method in ImagXpress Document edition. They use the same underlying technology.

ImagXpress Standard is included in the purchase of Barcode Xpress. Customers may upgrade to ImagXpress Document for more powerful document imaging features such as more advanced thresholding, multi-page file support, powerful annotation, thumbnail image support, advanced image cleanup, and advanced printing capabilities.

ScanFix Xpress Lite edition is included in the purchase of Barcode Xpress. ScanFix Xpress Lite edition offers image deskew, despeckle, negate, flip, rotate, mirror, line removal, dilate and erode, smooth zoom, and crop. Customers may upgrade to ScanFix Bitonal edition for advance image cleanup features, including automated and customer directed thresholding (binarization), dot shading removal, auto inverse text correction, (character) smoothing and completion, blank page detection, image scaling, two types of border removal, auto negate, comb removal, blob removal and the ability to set image resolution.

Contact Sales for upgrade pricing.

For information on how to register and license all your Pegasus Imaging components, see Licensing.

© 1997 - 2007, Pegasus Imaging Corporation, All Rights Reserved.


%%ItemTitle%%

Glossary Item Box

License Agreement

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Getting Support and Samples

Benefits of Registering your Pegasus Development Kit

Purchasers of development kits need to register with Pegasus in order to be notified of updates and receive support now or in the future. Registration is automatic when purchased directly from the Pegasus web site. If purchased through a Pegasus re-seller, please register your purchase by filling out the form at PegasusImaging.com/registration.htm.

Vehicles for Support

Samples

Samples are included in the downloaded installation.

The product installation program installs a common sample folder accessible via the Start Menu.

Samples for the .NET framework:

  • Microsoft VisualBasic.Net
  • Microsoft C#

Access the samples

  • Through the Windows Start menu: Start | Programs | Pegasus Imaging | BarcodeXpress | Samples
  • Sample image files included

Sample Code Newsgroups

Customers create samples of great benefit to other developers, so we created a Sample Code Newsgroup. This is a newsgroup for our customers and potential customers. They post and receive sample code from our development team and other developers to expedite their development. Go online at:

http://www.PegasusImaging.com/samplecode.htm

Web Support

Visit the Pegasus Imaging web site frequently asked questions page (http://www.PegasusImaging.com/faq.htm) for the fastest answers to common questions. The web site also provides other support options that are accessible at PegasusImaging.com/supportagree.htm.

E-mail Support

Both pre-sale and post-sale e-mail support is offered free of charge. Questions are answered on a First-Come-First-Served basis. Support@JPG.com responds instantly to e-mail received with a helpful set of locations to find additional information on Pegasus products including FAQ's, sample code, newsgroup locations and other current information pertaining to the use of the products. The support request is then added to the queue of outstanding requests. The goal of the support team to respond to each e-mail within 1 business day.

The sales team is always available as a backup to the support team. If you feel you have an urgent support or sales issue please contact Sales@JPG.com. They will assist you promptly.

Newsgroup Support

The Publicly accessible NNTP news groups located at News.PegasusImaging.com are available for each of the Controls as well as advanced imaging technology and a sample code group. We expect that the development community will freely access and search these newsgroups to find common questions and answers regarding specific uses of the controls.

On-Demand Phone Support

On-demand priority phone support can be purchased in 15 minute increments with a credit card via the Pegasus Imaging Corporation web site Support, General Info page. If you decide to purchase "on-demand" phone support, instructions will immediately be e-mailed upon receipt of your purchase.

Additionally, Pegasus offers three support plans for those customers whose commercial products or projects are sensitive or critical in nature, where immediate response and 'latest release' code are important.

1. Chariot Support

All Pegasus Imaging customers are given the opportunity to purchase a Chariot Support agreement. This is a maintenance and upgrade agreement that entitles customers to priority e-mail service, direct phone support from the support and development staff and free product upgrades for the covered products. Since upgrades are included for Chariot customers at no additional charge, Chariot customers can frequently save money, plus obtain the benefits of phone and expedited support. Pegasus Imaging reserves the right to change the terms of this service at any renewal period. Send e-mail to Sales@JPG.com for more information.

2. Galleon Support

Customers are given the opportunity to purchase Galleon Support for Pegasus Imaging products that are applications and for products that require runtime licensing. Galleon Support includes licensing of product upgrades for deployed installations at no additional license fee cost.Pegasus Imaging reserves the right to change the terms of this service at any renewal period. Send e-mail to Sales@JPG.com for more information.

3. Atlas Support

All Pegasus Imaging customers are given the opportunity to purchase an Atlas Support agreement on currently supported products. This is an agreement that entitles customers to priority e-mail service and direct phone support from the support and development staff. It differs from Chariot Support in that it does not include version upgrades free of charge. Pegasus Imaging reserves the right to change the terms of this service at any renewal period. E-mail Sales@JPG.com for more information.

To determine if you have the latest version of a Pegasus Imaging development toolkit, please download the PegConnect utility program. Please note that a Help File for each product may be found on the Start bar under Pegasus or in C:\Windows\Help.

For the latest and most up-to-date support information, access PegasusImaging.com/contact.htm

See Also

License Agreement


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Pegasus Imaging Corporation

Pegasus Imaging is uniquely positioned to serve as your leading imaging technology supplier. A full suite of document imaging toolkits, forms processing technology, medical image compression SDKs, photo editing and compression libraries, browser-based image viewers, and video codecs provide advanced technology designed to enhance imaging software solutions. Fully functional trial downloads and customer-acclaimed support allow you to be certain your requirements will be met before purchase. Work with the best. Choose Pegasus Imaging for all your imaging needs.

Visit www.pegasusimaging.com for full product descriptions, FAQ's, downloads, demos, and contact information.

Pegasus Imaging

4001 North Riverside Drive

Tampa, FL 33603

Sales: 813-875-7575

Fax: 813-875-7705

Copyrights & Trademarks

Pegasus and the Pegasus Horse Logo are registered marks (®) of Pegasus Imaging Corporation.

Barcode Xpress, CapturePRO, FilePrinter, FormAssist, FormDirector, FormSuite, ImagXpress, ISIS Xpress, The JPEG Wizard, MedXpress, NotateXpress, BarcodeXpress, PDF Xpress, PICTools, ePIC, PICVideo, PrintPRO, SmartScan Xpress, SmartZone, ThumbnailXpress, and TwainPRO are trademarks (™) of Pegasus Imaging Corporation.

FormFix, ScanFix, Prizm, ColorDrop, ColorEnhance, ColorFind, ColorForms, CompressDirector, Digital Mark Recognition (DMR), Image Detergent, ViewDirector and Virtual Scoring Center (VSC) by assignment are trademarks (™) or registered trademarks (®) of Pegasus Imaging Corporation.

Pegasus Imaging and/or its agents use these marks and brand names in connection with its goods and/or services, in the United States and other countries. Information in this document is subject to change without notice. No part of this document may be reproduced or transmitted in any form or by any means, electronic or mechanical, for any purpose, without the express written permission of Pegasus Imaging Corporation.

Microsoft, Microsoft.NET, Visual Basic, Visual Studio and Visual Studio.NET are trademarks of Microsoft Corporation in the USA and/or other countries. All other product and brand names are the property of their respective owners.


%%ItemTitle%%

Glossary Item Box

Getting Support and Samples

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Operating Requirements

Barcode Xpress Operating Requirements

Operating Systems

Barcode Xpress runs on 32-bit Microsoft Windows operating systems: Vista, 2000 Professional and Server, XP Home and Professional and Server 2003. It works with 32-bit Windows versions running on 32 and 64-bit processors. It runs in 32-bit executables running under 64-bit Windows 2000 Server and 2003 Server. Although it may run, it is not supported on previous Windows versions (for example, Windows 95 and Windows 98).

Threading

Pegasus considers thread-safe to be when an application using this component can use multiple controls running in the same process, where they don't interfere with each other. The thread creating the control owns the control and is the only thread that can interact with it.

Development environment

Microsoft .NET Framework 2.0

Microsoft Visual Studio 2005

Caching Data and Memory Usage

During normal operation Barcode Xpress caches data to temporary files on the hard drive. The size of the image and the amount of text on an image dictate how much hard drive space each page uses. Each page added to a document also increases the amount of hard drive space needed. To ensure effective operation, there should be 7 to 8 MB of hard drive space for each 8 1/2 by 11 inch 300dpi 24bpp page of full text at 12pt font size.

See Also

Getting Support and Samples


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Installing on a Development Machine

To Install Barcode Xpress Component

Run the downloaded setup program which installs the development kit on your development machine.

The downloaded development kit includes code samples for supported platforms. Samples are available through the Start|Programs|Pegasus Imaging|BarcodeXpress v5.0 menu.

By default this will register trial licensing which allows you to develop applications but not to distribute them. The trial license allows testing of all the functions and features.

Please see the topic 'Distributing with Your .NET Application' to understand the limits and details to converting licensing editions.
In order to distribute your finished application you must purchase and install a fully paid license from Pegasus Imaging Corporation. The paid licenses override trial licenses.

To Use Barcode Xpress Help Files

Stand-alone Help file "PegasusImaging.WinForms.BarcodeXpress5.chm"

Access the BarcodeXpress stand-alone help through the Windows Start menu: Start | Programs | Pegasus Imaging | BarcodeXpress v5.0

The stand-alone complied Help chm file is created with MS Help system version 1. To view Help 1 files, you must have:

  • Windows 2000 or higher (to view the file via the Windows HTML Help Viewer)
  • Internet Explorer 6.x or 7.0
  • MS HTML Help Viewer

From within your Visual Studio Development Environment, compiled collection help file "PegasusImaging.WinForms.BarcodeXpress5.hxs"

Help 2 collection files install into Visual Studio.NET (VS). To view Help 2 files, you must have:

  • Windows 2000 or higher
  • Internet Explorer 6 or higher
  • Visual Studio .NET 2002 or higher
  • MS Help version 2

When Barcode Xpress installs, if the system installation requirements for Help 2 files are met, the Help 2 file is included on the Start shortcut menu. If the installation requirements for Help 2 files are not met, then the Help 1 file installs on the Start shortcut.

Plugging Barcode Xpress Help into Visual Studio

Barcode Xpress Help 2 files integrate within the Help system in Visual Studio .NET. To access Barcode Xpress Help within Visual Studio, do the following:

  • Ensure that the MSDN Library is installed in your Visual Studio environment. If it is not installed, re-install it from your VS.NET disc.
  • Ensure that MS Help Integration Kit is installed in your Visual Studio environment. If you do not have it installed:

1. Download the Help Integration kit from MSDN

2. Close Visual Studio.

  • Re-open Visual Studio, select the Help Menu and the Contents submenu. Verify Help files for Pegasus Imaging controls are listed.

If Pegasus Help is not listed:

  1. Search for "VSCC" in Visual Studio Help, leaving the "Filtered by:" list box blank. Select the "Visual Studio .NET Combined Help Collection Manager" topic.
  2. Select the Help 2 collections available on your PC under the heading "Collections available for inclusion in VSCC."
  3. Take care when excluding Help collections from the default VSCC collection. These collections may be necessary to view required documentation. Instead, use the "Filtered by:" field on the Contents tab of the Help panel to focus searches on Pegasus Imaging topics. Leave the "Filtered by:" list box empty to view the entire Pegasus Imaging Help files.
  4. Select the Update VSCC button.
  5. Close all instances of Visual Studio and Microsoft Document Explorer. When you restart Visual Studio, the VSCC Help collection revises with your changes. (Note: this may take several minutes.)
  6. Check the Visual Studio Help/Contents tab again to see the Help collections available to you.
  • Select the Barcode Xpress Help file to view Help content.


%%ItemTitle%%

Glossary Item Box

EvaluationMode Property | LicenseEdition Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Trial Mode

Default Installation

The default installation installs Trial Mode licensing. This allows you to test features and functions and develop applications but not distribute them. Installing Barcode Xpress in trial mode provides you with access to all features and functionality of the Barcode Xpress product. E-mail support is available with the trial license.

When using the trial version of Barcode Xpress, an evaluation dialog box displays periodically.

Caution: When using trial (unpaid) licensing, the words "UNLICENSED www.jpg.com" will appear in the middle of every DataMatrix and PDF417 barcode created, taking up 24 bytes of space including a space before and after. When testing the contents of generated barcodes, be aware of the extra space requirements.

Applications built with a trial license can only be run on a computer that has Barcode Xpress Licensing installed on it.

Changing Trial Mode Behavior

You have the flexibility to change the behavior of Barcode Xpress in evaluation mode as follows:

  • To facilitate server/service mode evaluations, you can choose to halt the component processing after 5 minutes in lieu of displaying an evaluation dialog box periodically. This is the TimeOut setting for the License.EvaluationMode property.

Changing BarcodeXpress Edition

Installing Barcode Xpress in trial mode enables you to try out all the editions and add ons associated with Barcode Xpress, by setting the License.LicenseEdition property. Any edition for which you do not have paid licensing will display the evaluation dialog box or timeout. For example, if you have paid for and installed the licensing strings for the Barcode Xpress Professional, you can change the License.LicenseEdition property from Standard to Professional. The component will then run in Professional mode with trial behavior, including the periodic display of evalutaiton dialog boxes.

See Also

EvaluationMode Property | LicenseEdition Property


%%ItemTitle%%

Glossary Item Box

Trial Mode | License Agreement | Getting Support and Samples

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Development Mode

To suppress the evaluation dialog box and deploy your application, or attain technical support (beyond e-mail), as well as future product updates and upgrade notifications, you must update from a trial version to a paid version of the BarcodeXpress development kit.

1. Purchase Development Kit(s)

To purchase licensing of the Barcode Xpress development kit, use one of the following options:

  • Purchase online at http://www.PegasusImaging.com/. Contact Sales@jpg.com.
  • Contact a Pegasus Imaging Corporation reseller.

When the development kit is purchased, we e-mail a serial number & registration code to you. You need these codes to upgrade from trial to paid licensing.

2. Register the Barcode Xpress Product

When you purchase BarcodeXpress online or through Sales@jpg.com, your product ownership is automatically registered.

To register products purchased through a reseller, use the form found at http://www.PegasusImaging.com/registration.htm.

See Getting Support and Samples for a discussion of benefits to providing your name to Pegasus Imaging. We never sell our customer information.

If your registration information should change, visit http://www.PegasusImaging.com/contact.htm for forms to update registration information.

3. Update Your Barcode Xpress product version from trial to paid licensing

Updating your Barcode Xpress from trial to paid licensing will suppress the trial behavior, including the evaluation diaglog box or timeout. This must be done for each component within the Barcode Xpress toolkit that you are using (for example, Barcode Xpress, ScanFix Xpress, ImagXpress, NotateXpress or other included components). The email you receive when you purchase the product will include entries for each component included in the Barcode Xpress v5 product.

To update components from trial to paid licensing

  • Enter your new license codes using one of the following options:
    • Enter licensing information (serial number, registration code and personal registration information) during component installation while downloading the latest release from www.PegasusImaging.com (the recommended approach).
    • Alternatively, licensing information (serial number, registration code and personal registration information) can be entered through the Visual Development Environment in response to the dialog display.
  • Rebuild any applications that used the components with trial licensing

To distribute Barcode Xpress in an application, you must acquire runtime unlock codes (See Distributing with Your .NET Application).

See Also

Trial Mode | License Agreement | Getting Support and Samples


%%ItemTitle%%

Glossary Item Box

License Agreement | Development Mode | Trial Mode

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Runtime Licensing

Runtime & Deployment Licensing

All copyrights to Pegasus Imaging development kits and software are retained by Pegasus Imaging Corporation. ALL RIGHTS RESERVED. Your use of any of Pegasus Imaging software or run-times created with Pegasus Imaging software is allowed under license terms granted by Pegasus Imaging. It is the Licensee's responsibility to honor the terms of such license grants.

Locking Mechanism

Barcode Xpress contains a locking mechanism that does not permit you to distribute applications created with evaluation versions of Barcode Xpress. Prior to distributing an application that utilizes BarcodeXpress, you must purchase and enable run-time licensing. If the application will be delivered on the web, you must also purchase and enable web application licensing.

Obtaining Appropriate Licensing

The Licensee is required to purchase one copy of our development kit(s) for each developer in addition to obtaining the appropriate license agreement prior to deploying applications which contain Pegasus code.

Pegasus Imaging software applications and development tools are limited for use on a single CPU. Any runtimes or copies created must be granted by a direct license from Pegasus Imaging Corporation. These "end user" licenses provide the terms and limits of number and usage.

All prospective customers have every opportunity to evaluate Pegasus Imaging's products prior to purchasing. Product licensing is priced to cover what is considered to be normal (and even high) use. In addition, Pegasus Imaging fully supports and warrants its code and pricing reflects those costs as well. The larger and more valuable an application deployment is, the higher the support and warranty risk is for Pegasus.

Review the licensing categories, and select the one that matches your deployment. Special circumstances should be discussed with a Pegasus Imaging representative.

For more information on Runtime licensing, see the Pegasus Imaging website for more detailed information regarding Runtimes and Deployment Licensing.

See Also

License Agreement | Development Mode | Trial Mode


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

License Agreement

Pegasus Imaging Corporation

SOFTWARE LICENSE AGREEMENT

GRANT OF LICENSE

This Pegasus Imaging Corporation ("PEGASUS") Agreement ("License") permits Licensee ("LICENSEE") the right to use one copy of a properly registered Pegasus Development Toolkit ("TOOLKIT") for development purposes on any single computer, provided the TOOLKIT is in use on only one computer at any time. TOOLKIT is "in-use" on a computer when it loads into temporary memory (that is, RAM) or installed into the permanent memory (that is, hard disk, CD-ROM, or other storage device) of that computer.

REDISTRIBUTION OF THE TOOLKIT RUNTIMES

PEGASUS does not grant any runtime licenses with the TOOLKIT purchase, except by specific exemptions described on our licensing web pages. For Runtime Licensing information, please visit our web site (http://www.PegasusImaging.com/licensing.htm), or contact our sales staff. Any rights to distribute TOOLKIT run times as part of the LICENSEE's software application or derivative works ("PRODUCT"), require you to acknowledge and uphold this License Agreement and agree to notify PEGASUS immediately of any changes in status or violations. In cases where PEGASUS grants the LICENSEE a right to use, reproduce, display or otherwise distribute or transfer copies of TOOLKIT run times, LICENSEE agrees and affirms the following:

a) LICENSEE is not using PEGASUS' name, logo, or trademarks to market PRODUCT without prior written approval of PEGASUS.

b) LICENSEE agrees to indemnify, hold harmless and defend PEGASUS from and against any claims or lawsuits, including attorney's fees, that arise or result from the use or distribution of PRODUCT.

c) Only the TOOLKIT run times can be distributed. Distribution of the TOOLKIT development kit, documentation, source code, or the distribution unlock codes, is a violation of this agreement.

d) LICENSEE includes a statement substantially similar to the following within derivative work's documentation and about box: "This product contains portions of imaging code owned by Pegasus Imaging Corporation, Tampa, FL, (www.PegasusImaging.com). ALL RIGHTS RESERVED."

If ANY of the above terms are not applicable to LICENSEE'S situation, or any of the above cannot be complied with, or LICENSEE needs modifications to this license, for any reason; then LICENSEE shall obtain an expanded direct license from PEGASUS for derivative works, (available by phone at: 813-875-7575, x321, by e-mail at: Sales@jpg.com or by fax at: 813-875-7705).

PEGASUS reserves the right to charge the LICENSEE up to ten times the normal license price for the use of each unlicensed copy of PRODUCT. The license granted herein and all of your rights to use or maintain possession of TOOLKIT shall terminate immediately upon breach of any material provisions of this Agreement.

This license grants rights to LICENSEE for only the PEGASUS code (TOOLKIT) mentioned above and does not convey any other rights of use or distribution to PEGASUS technology.

COPYRIGHT

The Software is owned by PEGASUS or Pegasus Imaging Corporation and is protected by United States copyright laws and international treaty provisions. LICENSEE may not remove or alter the copyright notice from any copy of the Software or any copy of the written materials, accompanying the Software.

OTHER RESTRICTIONS

This PEGASUS License Agreement is LICENSEE's proof of license to exercise the rights granted herein and must be retained by LICENSEE. LICENSEE may not rent, lease or transfer TOOLKIT or parts thereof. LICENSEE may not reverse engineer, decompile or disassemble TOOLKIT.

NO WARRANTY

ANY USE BY LICENSEE OF THE SOFTWARE IS AT THE LICENSEE'S OWN RISK. THE SOFTWARE IS PROVIDED FOR USE ONLY WITH WINDOWS PRODUCTS AND RELATED APPLICATION SOFTWARE AND/OR HARDWARE PRODUCTS. THE SOFTWARE IS PROVIDED FOR USE "AS IS" WITHOUT WARRANTY OF ANY KIND. TO THE MAXIMUM EXTENT PERMITTED BY LAW, PEGASUS DISCLAIMS ALL WARRANTIES OF ANY KIND, EITHER EXPRESS OR IMPLIED, INCLUDING, WITHOUT LIMITATION, IMPLIED WARRANTIES OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT. PEGASUS IS NOT OBVLIGATED TO PROVIDE ANY UPDATES TO THE SOFTWARE.

NO LIABILITY FOR CONSEQUENTIAL DAMAGES

In no event shall PEGASUS be liable for any damages whatsoever (including, without limitation, incidental, direct, indirect and consequential damages, damages for loss of business profits, business interruption, loss of business information, or other pecuniary loss) arising out of the use or inability to use this PEGASUS product, even if PEGASUS has been advised of the possibility of such damages. Because some states/countries do not allow the exclusion or limitation of liability for consequential or incidental damages, the above limitation may not apply to LICENSEE.

INDEMNIFICATION BY LICENSEE

If LICENSEE distributes TOOLKIT in violation of this Agreement, LICENSEE agrees to indemnify, hold harmless and defend PEGASUS and its suppliers from and against any claims or lawsuits, including attorney's fees that arise or result from the use or distribution of TOOLKIT in violation of this Agreement.

This Agreement is governed by the laws of the State of Florida. The program and data contained in this TOOLKIT Product are provided with Restricted Rights. Use, duplication, or disclosure by the U.S. Government is subject to restrictions as set forth in FAR 52.227-14 (Alternate III) or subparagraph (c)(1)(II) of the rights in technical data and computer software clause at 252.227-7013. Manufacturer is Pegasus Imaging Corporation, 4001 Riverside Drive, Tampa, FL, 33603.

For questions concerning this Agreement, or to contact PEGASUS for any reason, please contact Pegasus Imaging Corporation by phone at 1-813-875-7575 x321 or email Sales@JPG.com.


%%ItemTitle%%

Glossary Item Box

Getting Support and Samples | License Agreement

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Verify You Are Using the Latest Service Pack

Service pack updates will not overwrite paid licensing. Your paid licensing will continue to work and you will not be required to re-enter your purchased registration codes.

Service pack updates do not include any changes that might "break" previously developed and/or deployed code.

Verify Latest Development Components

To verify you are using the latest version of a Pegasus Imaging Development Component or Components, please use the PegConnect utility program. Please note that a Help File for each product may be found on the Start Bar under Pegasus, or in C:\Windows\Help.

PegConnect is installed by all component product installers and is accessible through the Windows Start menu:

Start | Programs | Pegasus Imaging | Common | Utilities

PegConnect allows you to:

1) Check with Pegasus Imaging via online connection and verify that the installed version of the component includes all the most recent updates

2) Update to the latest version automatically with your permission

3) Determine if a control is registered or unregistered on the machine

4) Easily change the registration status from registered to non-registered, or non-registered to registered

Alternatively, you can see the currently released product build numbers at http://www.PegasusImaging.com/latestbuilds.htm.

If you require further assistance or have questions or comments, please see the topic on Getting Support for more detailed information.

See Also

Getting Support and Samples | License Agreement


%%ItemTitle%%

Glossary Item Box

Trial Mode | Runtime Licensing | Verify You Are Using the Latest Service Pack

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Distributing with Your .NET Application

Distributing Barcode Xpress

Check for Proper Licensing and Unlock Codes

Barcode Xpress contains a locking mechanism that does not permit you to distribute applications created with evaluation versions of Barcode Xpress. Prior to distributing an application that utilizes Barcode Xpress, you must purchase and enable run-time licensing. If the application will be delivered on the web, you must also enable web application licensing.

DLL Files to Distribute

Distribute the appropriate assembly DLL files with applications using the Barcode Xpress Product.

PegasusImaging.WinForms.BarcodeXpress5.dll - .NET component - .NET Control for barcode creation and recognition

PegasusImaging.WinForms.ScanFix5.dll - .NET component (Only required if ScanFix is used for image processing in your application)

PegasusImaging.WinForms.ImagXpress8.dll - .NET component (Only required if ImageXpress is used for image processing in your application)

See Also

Trial Mode | Runtime Licensing | Verify You Are Using the Latest Service Pack


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Definitions, Acronyms and Abbreviations

Pegasus Imaging Definitions:

PIC: Pegasus Imaging Corporation

Thread-safe: an application using this component can use multiple controls running in the same process, where they don't interfere with each other. The thread creating the control owns the control and is the only thread that can interact with it.

Industry Terms:

Module Size: a module is the smallest unit in a barcode symbology. In 1D and PDF417 barcodes it is the width of the smallest bar in the barcode pattern. In DataMatrix and QRcode, it is a square area defining one bit of a code word.

Quiet Zone: an area of uniform background surrounding a bar code. If the barcode ink color is black and the background white, then a white region around the barcode is the quiet zone. Quiet zones are required for accurate recognition.

Unicode: a character set that can support a wide range of international characters. Unicode requires 16-bits to encode a character, unlike ASCII, which requires only 8 but supports only a small subset of characters beyond latin.

UI (User Interface): the controls or API provided for user interaction with an application or component.


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Overview

Barcode Detection

Barcode Xpress makes it easy to add barcode detection to your Windows applications. Barcode Xpress automatically detects all barcodes in an image and it gives you complete details about each barcode.
Performance Enhancement: Although Barcode Xpress can automatically detect barcodes in an image, the speed of the detection process can be improved if you have prior knowledge of the type of barcodes you want to detect.

If possible, the following properties should be set before the detection process is started:
  • InkColor – The default barcode color is black.
  • Orientation – The default barcode orientation is all orientations.
  • BarcodeTypes – The type of barcodes you want to detect. The default is all 1D barcodes.

See the BarcodeTypes property for specific identification of barcode types that must be explicitly set to be recognized, and how to speed up barcode detection for known barcode types.

If the barcode image quality is poor (i.e. less than 300 dpi), set the BarcodeTypes property to the specific barcode type in order to obtain accurate results.

  • MaximumBarcodes – Sets the maximum number of barcodes that will be detected. The default is 100.

If you know how many barcodes you expect to find, set the MaxBarcodes to that value, and Barcode Xpress v5 will stop looking once that number is found.

Supports 1D linear barcodes and PatchCode

Show 1D linear barcodes and PatchCode

Add 2

Add 5

Australian Post 4-State Barcode (Error Correcting)

BCD Matrix

Codabar

Code 32

Code 39

Code 39 Extended

Code 93

Code 93 Extended

DataLogic 2 of 5

EAN-128

EAN-13 and JAN

EAN-8

IATA 2 of 5

Code 128

Industry 2 of 5

Intelligent Mail

Interleaved 2 of 5

Inverted 2 of 5

Matrix 2 of 5

PatchCode (not included as 1D barcode type)

PostNet (not included as 1D barcode type)

Royal Post 4-State Barcode

UPC-A

UPC-E

2D barcodes

  • The Professional Edition of Barcode Xpress supports reading PDF417, DataMatrix and QRcode barcodes.
  • The Professional plus 2D Write edition includes support of PDF417 and DataMatrix read and write capabilities.

[C#]

Show Minimum C# code to recognize barcodes in an image

using PegasusImaging.WinForms.BarcodeXpress5;

...

//create and unlock the BarcodeXpress component

BarcodeXpress bcx5 = new BarcodeXpress ();

bcx5.Licensing.UnlockRuntime(12345, 12345, 12345, 12345);

//load a 1BPP, black and white image into the ImagXpressT control

imageXView1.Image = PegasusImaging.WinForms.ImagXpress8.ImageX.FromFile("C:\testbarcodeimage.tif");

//set barcode types to search for

System.Array currentBarcodeTypes = new BarcodeType[2];

currentBarcodeTypes.SetValue(BarcodeType.Industry2of5Barcode, 0);

currentBarcodeTypes.SetValue(BarcodeType.Interleaved2of5Barcode, 1);

bcx5.reader.BarcodeTypes = currentBarcodeTypes;

//call AnalyzeBarcode to detect barcodes in image

//all detected barcodes result, will be returned to the Result object array.

Result[] results = bcx5.reader.Analyze(imageXView1.Image.ToHdib(false));

//get some results info, if any

for (short i = 0; i < results.Length; i++)

{

//get result for current barcode

Result curResult = (Result)results.GetValue(i);;

//do something with results

MessageBox.Show(curResult.BarcodeName);

MessageBox.Show(curResult.BarcodeValue);

}

// dispose of the barcode component

bcx5.Dispose();

Barcode Creation

Barcode Xpress 5 makes it easy to add barcode creation to your Windows applications. Barcode Xpress can create the following 1-D linear barcodes, PatchCode and 2D barcodes:

Show Barcodes created

Codabar

Code 39

Code 39 Extended

Code 93

Code 93 Extended

Code 128

DataMatrix

EAN-128

EAN-13

EAN-8

Industry 2 of 5

Interleaved 2 of 5

PatchCode

PDF417

UPC-A

UPC-E

There are only a few steps required for basic barcode writing.

  1. Setting the barcode value and type to create,
  2. Calling the Create method,
  3. and getting the resulting image.

[C#]

Show Basic steps for barcode writing

using PegasusImaging.WinForms.BarcodeXpress5;

...

//create and unlock the BarcodeXpress component

BarcodeXpress bcx5 = new BarcodeXpress();

bcx5.Licensing.UnlockRuntime(12345, 12345, 12345, 12345);

//set the required writer properties

bcx5.writer.BarcodeType = BarcodeType.Code39Barcode;

bcx5.writer.BarcodeValue = "CODE39";

//call Create and get resulting image

imageXView1.Image = PegasusImaging.WinForms.ImagXpress8.ImageX.FromHdib(new IntPtr(bcx5.writer.Create()));

// dispose of the barcode component

bcx5.Dispose();

Barcode Results

Since Barcode Xpress can return multiple barcode results from a single scan, the detected barcode results (both solved and unsolved) will be sorted using the following criteria. Note that all solved barcodes will be ordered before unsolved barcodes.

  1. First, the confidence factor is used to sort the barcode results from highest confidence to lowest.
  2. Next, for any barcodes with the same confidence, they will then be sorted by their location, from top to bottom, then left to right.

Barcode Confidence

All barcode confidence values begin at 100%. You obtain the recognized confidence from the Confidence property.

  • 1D barcodes - Confidence values are decreased as the widths of the bars vary over the barcode.
  • 2D barcodes - Confidence values decrease based on the amount of error correction used in decoding the barcode.
  • Barcodes which use checksums - If a checksum error is detected, the confidence is set to 50%.

Confidence values less than 30% are considered unreadable and any data returned is not considered reliable.


%%ItemTitle%%

Glossary Item Box

CheckSum Property | InvalidErrorCorrectionLevelException Class | AppendCheckSum Property | NumberCheckSumChars Property | ValidCheckSum Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Checksums

Barcode Checksums

Checksums are used to verify the correctness of data. Their use is usually in data transmission, or converting data from one form to another. A parity bit is a form of checksum error correction coding. The idea is that the whole unit of data can be identified by a single number, a checksum. And that if the checksum isn’t right, it doesn’t match, errors have occurred.

The simplest checksum is to add up the value of the individual bytes in the data. Given the data of "CAT", the ASCII values of the letters are 67 + 65 + 84 = 216 and the whole package might be given the notation "CAT(216)". So if we received "CAS(216)" we’d know that an error occurred somewhere along the way.

A simple sum of the characters can be fooled by switching the order but not the value of the data, e.g. "TAC" and "CAT" have the same checksum. So more sophisticated checksum methods have been developed which reduce (but never totally eliminate) the chance of incorrect data giving the correct checksum.

Many types of barcodes employ checksums. In several other types, checksums are optional. Clearly, those that incorporate checksums are more robust and reliable.

Note: The UPC and EAN codes always append the checksum character to the barcode results. This is done regardless of the AppendCheckSum property value.

More advanced barcodes use an error correction system. This allows for reliable reading even if the code has been slightly damaged.

Show Barcodes with no checksum

Add2
Add5
Codabar
DataLogic 2 of 5
Patch Code

Show Barcodes requiring a checksum

Code 128
Code 93
Code 93 Extended
IATA 2 of 5
EAN-128
EAN-13
EAN-8
Intelligent Mail
PostNet
Royal Post 4-State Barcode
UPC-A
UPC-E

Show Barcodes with optional check sum

Code 32
Code 39
Code 39 Extended
Industy 2 of 5
Interleaved 2 of 5
Inverted 2 of 5
BCD Matrix
Matrix 2 of 5

Show Barcodes with error correction

Australian Post 4 State Barcode
PDF417
DataMatrix
QRcode

See Also

CheckSum Property | InvalidErrorCorrectionLevelException Class | AppendCheckSum Property | NumberCheckSumChars Property | ValidCheckSum Property


%%ItemTitle%%

Glossary Item Box

Reader Class | Point1 Property | Point2 Property | Point3 Property | Point4 Property | Skew Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Boundary and Point Properties

When a barcode on an incoming image is detected, five Barcode Xpress properties of the Results class detect the outer parameters of the barcode. They mark both the boundary dimensions and the corner points of the barcode. Height, Width and Area properties describe the boundaries of the barcode rectangle. Barcode Xpress uses Point properties to identify corner points of the barcode on the image. Point properties 1 through 4 locate the corner points of linear 1D Barcodes.

  • When the barcode is in the horizontal orientation, Barcode Xpress reads it from left to right, assigning values to the Point 1 through 4 properties. The Point1 property is the upper-left corner point of the barcode.
  • The boundary and corner point properties describe a rectangle area for the barcode on the image. The Skew property returns the angle of the barcode.

With any rotation of the barcode on the image, the Point value assigned to the corners rotate with the barcode. No matter what the rotation is, the Point properties always identify the same corner point of the barcode. If the barcode is rotated 180 degrees (turn the sample below upside down), the Point value for the corner remains. Point1 is now the bottom-right corner; but its value is still 1.

See Also

Reader Class | Point1 Property | Point2 Property | Point3 Property | Point4 Property | Skew Property


%%ItemTitle%%

Glossary Item Box

Checksums | BarcodeTypes Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Add 2 and Add 5 Barcode Specifications

Add 2 and Add 5 Barcode Specifications Retail barcodes (UPC and EAN) are strictly limited in the amount and format of the data that they encode. Add 2 or Add 5 barcodes give the vendors another two or five digits to identify the specific product, model, or issue. It is usually printed just to the right of the product code. For periodicals, an Add2 often indicates the issue, while other publications include a volume number.

Below is an Add 2 barcode example:

Below is an Add 5 barcode example:

See Also

Checksums | BarcodeTypes Property


%%ItemTitle%%

Glossary Item Box

AustralianPostCustomDecodeMode Property | AustralianPostCustomDecodeType Enumeration

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Australian Post 4-State Barcode

Below is an example of the Australian 4-State Postal Code.

The Australian Post 4 State barcode is a 4-state barcode. It supports four different formats:

  • Standard
  • Customer Barcode 2
  • Customer Barcode 3
  • Reply Paid Barcode

The Customer Barcodes 2 & 3 include a customer field for encoding data. This barcode also supports the Reed-Solomon error correction scheme.

Format Control Field

The Format Control Field is a 2 digit field identifying the barcode type:

  • 11 - Standard Customer Barcode
  • 59 - Customer Barcode 2
  • 62 - Customer Barcode 3
  • 45 - Reply Paid Barcode

Sorting Code

The Sorting Code is an 8 character sorting code (Delivery Point ID)

Customer Information

There is a free format area available in the Customer Barcodes 2 & 3. This will be decoded using the AustrailianPostCustomDecodeType.

  • If the decode mode is "BarStates" then the output will be either bar state "F" full bar, "T" tracker bar, "A" ascending bar or "D" descending bar.
  • If the decode mode is "TableN" then the output will be decoded using the numeric decoding defined in the Australian Post specification.
  • If the decode mode is "TableC" then the output will be decoded using the character decoding defined in the Australian Post specification.

Note: If the FCC code is not valid, the confidence will be decreased by 10%.

See Also

AustralianPostCustomDecodeMode Property | AustralianPostCustomDecodeType Enumeration


%%ItemTitle%%

Glossary Item Box

Interleaved 2 of 5 | Industry 2 of 5 | Inverted 2 of 5

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BCD Matrix

BCD Matrix is a compact version of 2 of 5 barcodes, but its checking for the data patterns is not as robust. It does include a checksum character. It is not widely used.

See Also

Interleaved 2 of 5 | Industry 2 of 5 | Inverted 2 of 5


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Codabar

Codabar is used in libraries, blood banks, the overnight package delivery industry, and a variety of other information processing applications. Codabar is also known as USD-4, NW-7 and 2 of 7 code.

The Codabar character set includes the digits 0-9, six symbols including: minus "-", plus "+", period ".", dollar sign "$", slash "/", and colon ":", and the following start/stop characters A, B, C and D. The start/stop characters must be used in matching pairs and may not appear elsewhere in the barcode. If you omit the start/stop characters, Barcode XpressBarcode will use A and B respectively. Blood banks use the D stop character to indicate that the next barcode beginning with a D should be concatenated with the current barcode.

Note: By default, the read value of the Codabar barcode does not include the start and stop characters. To include the start and stop characters in the barcode result, the IncludeControlCharacters property must be set to true.

Traditional Codabar defines different element width for each of the characters in an effort to make all of the characters have the same width. Rationalized Codabar uses the same patterns, but assigns only 2 element width for wide and narrow.

Barcode Xpress implements Rationalized Codabar. Barcode Xpress generates an error if you have characters in your barcode value that are not allowed.

Codabar requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. Since Codabar is self-checking, there is no standard checksum.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

Code 39

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Code 32

Code 32 is an Italian pharmacy code. It is a variant version of Code 39: it uses the exact same symbol set, stop and start code and rules but restricts the characters that may be encoded to just digits and capital letters excluding the vowels (‘A’, ‘E’, ‘I’, ‘O’, ‘U’). Otherwise it shares all the other advantages of Code 39.

Since Code 32 is a subset of Code 39, Barcode Xpress assumes the barcode is a Code 39 type when detecting all 1D types. The barcode type should be set specifically to Code 32 to read this barcode type correctly.

Note: If you use Barcode Xpress to detect Code 32 barcodes, you should set the BarcodeTypes property to this type so that the barcode engine specifically looks for Code 32. If you don’t tell the barcode engine to specifically look for Code 32 barcodes, it might confuse a Code 32 barcode with a Code 39 barcode.

See Also

Code 39


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property | Checksums | CheckSum Property | BarcodeTypes Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Code 39

Code 39 is widely used in many industries across the world. It is the standard for many government barcode specifications, including the U.S. Department of Defense. Code 39 is also known as Code 3 of 9.

Code 39 was the first alphanumeric symbology. Its character set includes the digits 0-9, the letters A-Z (uppercase only), and the following symbols: space, minus "-", plus "+", period ".", dollar sign "$", slash "/", and percent "%". Barcode Xpress generates an error if you have characters in your barcode value that are not allowed.

Each data character is made up of 5 bars and 4 spaces for a total of 9 elements. Each character includes 3 wide and 6 narrow elements. Thus, 3 out of the 9 elements are always wide, which is the reason why the code is sometimes called "3 of 9".

The ratio of wide to narrow bar width can be in the range of 1.8 to 3.4. The Barcode Xpress Code 39 style uses a 2:1 wide to narrow bar width ratio.

Code 39 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. Since Code 39 is a self-checking barcode, it normally does not require a check sum. However, when necessary, an optional modulo 43 checksum may be used.

By default, Barcode Xpress does not write optional check sums. If a check sum is desired for Code 39, set the CheckSum property to 1(TRUE) and Barcode Xpress calculates and writes the check sum.

If you use Barcode Xpress to detect Code 39 barcodes, you should set the BarcodeTypes property to this type so that the barcode engine specifically looks for Code 39. If you don’t tell the barcode engine to specifically look for Code 39 barcodes, it might confuse a Code 39 barcode with a Code 32 barcode.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property | Checksums | CheckSum Property | BarcodeTypes Property


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property | Checksums | CheckSum Property | BarcodeType Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Code 39 Extended

Code 39 Extended was developed to provide a means of encoding additional characters that are not part of the Code 39 character set (for example, lowercase characters and additional symbols), and is essentially a superset of Code 39. Extended characters are encoded by using a pair of normal Code 39 characters. For example, a lowercase "a" is encoded by the character pair "+A". Code 39 Extended supports the full ASCII character set.

The ratio of wide to narrow bar width can be in the range of 1.8 to 3.4. The Barcode Xpress Code 39 style uses a 2:1 wide:narrow bar width ratio.

Code 39 Extended requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. Since Code 39 is a self-checking barcode, it normally does not require a check sum. However, when necessary, an optional modulo 43 checksum may be used.

By default, Barcode Xpress will not write optional check sums. If a check sum is desired for Code 39, set the CheckSum property to 1(TRUE) and Barcode XpressBarcode will calculate and write the check sum.

If you use Barcode Xpress to detect Code 39 barcodes, you should set the reader BarcodeType property to this type so that the barcode engine specifically looks for Code 39. If you don’t tell the barcode engine to specifically look for Code 39 barcodes, it might confuse a Code 39 barcode with a Code 32 barcode.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property | Checksums | CheckSum Property | BarcodeType Property


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Code 93

Code 93 is a bar code symbology which encodes 43 data characters (0-9, A-Z, 6 symbols, and Space), four shift characters, and a unique start/stop character. Code 93 derives its name from the fact that every character is constructed from 9 modules arranged into 3 bars with their adjacent spaces.

The Code 93 character set includes the digits 0-9, the letters A-Z (uppercase only), and the following symbols: space, minus "-", plus "+", period ".", dollar sign "$", slash "/", and percent "%". Barcode Xpress will generate an error if you have characters in your barcode value that are not allowed.

Code 93 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. Code 93 requires two checkum characters, sometimes referred to as the “C” and “K” characters.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Code 93 Extended

Similar to Code 39 Extended, Code 93 Extended is a superset of Code 93. Extended characters are encoded by using a pair of Code 93 characters. For example, a lowercase "a" is encoded by the character pair "+A". The difference in Code 93 Extended, when compared to Code 39 Extended, is that the shift character used to encode an extended character is a reserved character, and not one of the standard 43 characters in the Code 93 character set. Code 93 Extended supports the full ASCII character set.

Code 93 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. Code 93 requires two check sum characters, sometimes referred to as the “C” and “K” characters.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

Checksums | MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Code 128 and EAN 128

Code 128 provides excellent density for all-numeric data and good density for alphanumeric data. The symbol can be as long as necessary to store the encoded data. It is often selected over Code 39 in new applications because of its density and because it offers a much larger selection of characters. Code 128 is designed to encode all 128 ASCII characters.

A Code 128 can actually be divided into three subsets A, B and C. There are three separate start codes to indicate which subset is being used. In addition, each subset includes control characters to switch to another subset in the middle of a barcode.

  • A – Digits, uppercase characters, standard ASCII symbols and control codes.
  • B – Digits, upper and lower case characters, standard ASCII symbols and control codes.
  • C – Numeric only. Compresses two numeric digits into each character, providing excellent density. Barcode Xpress will add a leading "0" if there are an odd number of digits in the code.

When the BarcodeType property is set to write a Code 128 barcode, Barcode Xpress will automatically switch between the three character sets (A, B and C) to code the data in the shortest form.

  • EAN-128 – The UCC/EAN 128 barcode is a special form of Code 128. EAN-128 is based on Code 128 but it has a double start character.

Barcode Xpress will generate an error, if you have characters in your barcode value that are not allowed.

Each character is 11 times the width of the most narrow bar. Each character consists of 3 bars and 3 spaces. The bars always use an even number of elements and the spaces use an odd number. This provides the basis for a character-by-character consistency check during scanning. In addition, each Code 128 barcode includes a Modulo 103 checksum.

Code 128 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels.

See Also

Checksums | MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

Industry 2 of 5 | Interleaved 2 of 5 | Inverted 2 of 5

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

DataLogic 2 of 5

DataLogic 2 of 5 is a variation of the 2 of 5 barcodes using both white and black bars. It does not have a checksum character. It is not widely used.

See Also

Industry 2 of 5 | Interleaved 2 of 5 | Inverted 2 of 5


%%ItemTitle%%

Glossary Item Box

ErrorCorrectionLevel Property | ErrorCorrectionLevelUsed Property | Create Method | BarcodeData Property | RowsAndColumns Property | RowsAndColumnsCreated Property | RequiredHeight Property | RequiredWidth Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Data Matrix

DataMatrix is a widely used true 2D barcode. It allows for encoding large amounts of information (over 3000 characters) using a variety of character sets (ASCII, C40, TEXT and BASE256) allowing efficient data packing or binary data storage as needed. DataMatrix employs an error correction system allowing it to read codes that are as much as 40% damaged.

Barcode Xpress supports the ECC 200 standard. It does not support the ECC 100-140 standards. Barcode 5 does not support the automatic structured append feature. It returns results of each barcode, but the individual results have to be combined.

Performance Enhancement: Barcode Xpress is designed to optimize speed for the DataMatrix barcode recognition type as it takes advantage of the SSE2 (Streaming SIMD Extensions) technology provided in some computer processors with the initial release of the Pentium 4 architecture. This SSE2 technology allows for more efficient pixel processing, significantly improving image recognition time. Computer processors not supporting SSE2 will not provide this performance enhancement, and will automatically use the same processing algorithm as all prior releases.

An example DataMatrix barcode:

The Professional plus 2D Write edition supports creating PDF417 and DataMatrix barcodes which can then be written using the ImagXpress control or by writing to a Printer Device Context. Your application logic will set the barcode writing parameters and make a call to the Create method. The output image will then be returned in the call.

Included features to use with this functionality are:

  • BarcodeData - Barcode data returned as an array of bytes.
  • RowsAndColumns - This value is used to set the number of rows and columns.
  • RowsAndColumnsCreated - The number of rows and columns created.
  • RequiredHeight - An output height value is required to create the barcode image.
  • RequiredWidth - An output width value is required to create the barcode image.

Caution: When using trial (unpaid) licensing, the words " UNLICENSED www.jpg.com " will appear in the middle of every DataMatrix and PDF417 barcode created, taking up 24 bytes of space including the leading and trailing spaces. When testing the contents of generated barcodes, be aware of the extra space requirements.

Caution: An anomaly has been identified for DataMatrix 144 x 144 barcodes written by several competitors' components. For this size only, barcodes created using those components do not adhere to the DataMatrix barcode specification. Because Pegasus Imaging does adhere to the DataMatrix specification, those competitors' components will not correctly read 144 x 144 size DataMatrix written by Barcode Xpress.

When reading 144 x 144 DataMatrix barcodes, Barcode Xpress will assume that the barcodes adhere to the specification. If reading fails, the component will automatically attempt to apply the recognition algorithm that will work on barcodes written by the competitors components, and report the results. The barcode reader will not be notified that the barcode did not adhere to the specification. For these barcodes only, recognition speed will be impacted.

See Also

ErrorCorrectionLevel Property | ErrorCorrectionLevelUsed Property | Create Method | BarcodeData Property | RowsAndColumns Property | RowsAndColumnsCreated Property | RequiredHeight Property | RequiredWidth Property


%%ItemTitle%%

Glossary Item Box

EAN-13 and JAN | MinimumBarWidth Property | HorizontalWhiteSpace Property | TextNotchPercent Property | Checksums

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

EAN-8

The EAN (European Article Numbering) code is primarily used in supermarkets. EAN-8 is a shortened version of the EAN-13 code. It is a numeric-only code that includes a 2 or 3 digit country code, 4 or 5 data digits (depending on the length of the country code), and a checksum digit that is automatically added by Barcode Xpress.

Unlike the UPC-E symbol, which compresses data that could also be printed as a full-size UPC-A symbol by squeezing out zeros, the data digits in an EAN-8 symbol specifically identify a particular product and manufacturer. Since a limited number of EAN-8 codes are available in each country, they are issued only for products with insufficient space for a normal EAN-13 symbol.

Barcode Xpress will generate an error if you have characters in your barcode value that are not allowed. You can have 7 or 8 digits in the EAN-8 barcode value. You don’t have to include the 8th digit (checksum) since Barcode Xpress automatically adds it.

EAN-8 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels.

The EAN-8 barcode is also commonly written with 2 different bar heights. Typically, the height of the left and right guard bars are greater than the height of the bars encoding the actual barcode value, essentially creating a notch in the barcode where the text value can be written. Barcode XpressBarcode provides the user with control over the size of this notch with the TextNotchPercent property.

The TextNotchPercent property can be set to a value of 0 to 50. This number represents the percentage of the tall bar height the short bars will be shortened by. For example, if TextNotchPercent is 10, and the bar height is set to 100 pixels, the tall bars (left and right guard bars) will be 100 pixels tall, and the short bars (bars encoding the value) will be 90 pixels tall.

See Also

EAN-13 and JAN | MinimumBarWidth Property | HorizontalWhiteSpace Property | TextNotchPercent Property | Checksums


%%ItemTitle%%

Glossary Item Box

Checksums | MinimumBarWidth Property | HorizontalWhiteSpace Property | TextNotchPercent Property | CheckSum Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

EAN-13 and JAN

EAN-13 is used worldwide for marking retail goods. The symbol is numeric-only and encodes 13 digits. The first two or three digits are a country code which identify the country in which the manufacturer is registered (not necessarily where the product is actually made). The country code is followed by 9 or 10 data digits (depending on the length of the country code) and a single checksum digit that is automatically added by Barcode Xpress. There is a special form of EAN-13, called EAN-99 which just starts with "99".

Note: The JAN barcode is identical to the EAN-13 except with a country code of 49, designating that it was registered in Japan. The JAN barcode is treated exactly the same as the EAN-13 for reading and writing barcodes within Barcode Xpress.

As of January 1, 2005, all retail scanning systems in the United States must be able to accept the EAN-13 symbol as well as the standard UPC-A symbol. The United States has begun the process of moving to the EAN-13 symbol, which will be known as the UPC-13 symbol in the USA.

Barcode Xpress generates an error if you have characters in your barcode value that are not allowed. You can have 12 or 13 digits in the EAN-13 barcode value. You don’t have to include the 13th digit (checksum) since Barcode Xpress automatically adds it.

EAN-13 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels.

The EAN-13 barcode is also commonly written with 2 different bar heights. Typically, the height of the left, center and right guard bars are greater than the height of the bars encoding the actual barcode value, essentially creating a notch in the barcode where the text value can be written. SmartScan Xpress Barcode provides the user with control over the size of this notch with the TextNotchPercent property.

The TextNotchPercent property can be set to a value of 0 to 50. This number represents the percentage of the tall bar height the short bars will be shortened by. For example, if TextNotchPercent is 10, and the bar height is set to 100 pixels, the tall bars (left, center and right guard bars) will be 100 pixels tall, and the short bars (bars encoding the value) will be 90 pixels tall.

See Also

Checksums | MinimumBarWidth Property | HorizontalWhiteSpace Property | TextNotchPercent Property | CheckSum Property


%%ItemTitle%%

Glossary Item Box

Industry 2 of 5 | Checksums | AppendCheckSum

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

IATA 2 of 5

This is a numeric only code used by the Airline industry, and is a variation of Industrial 2 of 5.

Since IATA 2 of 5 requires a check sum, you must set the AppendCheckSum property to true and Barcode Xpress will calculate and write the check sum.

See Also

Industry 2 of 5 | Checksums | AppendCheckSum


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property | CheckSum Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Industry 2 of 5

Industry 2 of 5 barcodes have been in use since the late 1960’s for airline tickets, photo developing envelopes and warehouse sorting systems.

Industry 2 of 5 encodes all of the information in the bars. The spaces are fixed width and are used only to separate the bars. Consequently, it is a fairly inefficient code in terms of how much space is required to encode a single digit.

  • Since Industry 2 of 5 is a numeric-only code, Barcode Xpress generates an error if the barcode value contains characters that are not numeric. Industry 2 of 5 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels.
  • Since Industry 2 of 5 is a self-checking barcode, it normally does not require a check sum. However, when necessary, an optional modulo 10 checksum may be used. By default, Barcode Xpress will not write optional check sums. If a check sum is desired for Industry 2 of 5, set the CheckSum property to 1(TRUE) and Barcode Xpress will calculate and write the check sum.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property | CheckSum Property


%%ItemTitle%%

Glossary Item Box

Checksums | PostNet

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Intelligent Mail

The Intelligent Mail Barcode is also known as the UPSP OneCode Solution or USPS 4-State Customer Barcode (abbreviated 4CB, 4-CB, or USPS4CB). This barcode is adopting a new 4-state 1D barcode that includes more address information than the current code. A sample is shown below. Further information can be found at the USPS Web site: http://ribbs.usps.gov/onecodesolution/.

The Intelligent Mail barcode combines information currently found in the PostNet and Planet barcodes. The length of the barcode is fixed at 65 bars. It also contains a CRC-Checksum for verifying the barcode value. There is no error correction. The output of the barcode is a 20, 25, 29 or 31 digit string (0, 5, 9 or 11 digit zip code) containing the following data:

(© USPS-B-3200,Pages 4-5,file:SPUSPS-B3200B001.pdf)

Statistics

The Mailer ID is a field within the Intelligent Mail barcodes that is used to identify Mail Owners and/or Mailing Agents. The IDs are assigned by the USPS to each Mail Owner and/or Mailing Agent that requests them. A Mailer ID can be a 9-digit field or a 6-digit field. The USPS assigns 6-digit or 9-digit Mailer IDs based upon the mail volume of the mailer.

  • The barcode identifier is a 2 digit field assigned by the USPS. The first digit ranges from 0-9 and the second digit ranges from 0-4.

Note: All 6-digit MIDs (Mailer IDs), assigned by USPS will begin with 0 through 8. All 9-digit MIDs will begin with the number 9.

  • Special services include a 3 digit field assigned by the USPS for any special services which range from 000-999.
  • The customer identifier is a 6 digit field assigned by the USPS and is unique for each customer. The range is from 000000000-999999999.
  • The sequence number is a 9 digit field assigned by the mailer for tracking mail pieces which range from 000000000-999999999.
  • The zip code is a 0, 5, 9, or 11 digit zip code which range from none, 00000-99999, 000000000-999999999, 00000000000-99999999999.
See Also

Checksums | PostNet


%%ItemTitle%%

Glossary Item Box

CheckSum Property | MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Interleaved 2 of 5

Interleaved 2 of 5 is a numeric-only barcode that is widely used in warehouse and industrial applications.

The symbol can be as long as necessary to store the encoded data. The code is a high-density code.

The symbol is called "Interleaved" because a digit is encoded in the bars and the next digit is encoded in the spaces. There are five bars, two of which are wide; and five spaces, two of which are wide. Since the characters are interleaved in pairs, the barcode has to contain an even number of digits. If the barcode value contains an odd number of digits, Barcode XpressBarcode adds a leading "0" to the value.

Interleaved 2 of 5 requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. Since Interleaved 2 of 5 is a self-checking barcode, it normally does not require a check sum. However, when necessary, an optional modulo 10 checksum may be used. By default, Barcode Xpress will not write optional check sums. If a check sum is desired for Interleaved 2 of 5, set the CheckSum property to 1(TRUE) and Barcode Xpress calculates and writes the check sum.

See Also

CheckSum Property | MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

Industry 2 of 5

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Inverted 2 of 5

Inverted 2 of 5 is similar to Industry 2 of 5, except the data is encoded in the white bars. It is not widely used.

See Also

Industry 2 of 5


%%ItemTitle%%

Glossary Item Box

Checksums | DataLogic 2 of 5 | CheckSum Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Matrix 2 of 5

Matrix 2 of 5 is similar to DataLogic 2 of 5 with a checksum character. It is not widely used.

See Also

Checksums | DataLogic 2 of 5 | CheckSum Property


%%ItemTitle%%

Glossary Item Box

BarcodeType Property | BarcodeType Enumeration | BarcodeValue Property | MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Patch Code

Barcode Xpress supports the following patch codes:

  • Patch I
  • Patch II
  • Patch III
  • Patch IV
  • Patch VI
  • Patch T

To write a Patch Code using Barcode Xpress, set the writer BarcodeType property to PatchCode, then set the writer BarcodeValue property to a value of 1 through 6.

Patch Codes require a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels. There is no check sum for Patch Code.

See Also

BarcodeType Property | BarcodeType Enumeration | BarcodeValue Property | MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

WriterPDF417 Class | PDF417ErrorCorrectionLevel Enumeration

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417

PDF417 is often referred to as a stacked 1D barcode. Like DataMatrix it uses an error correction scheme and allows for encoding binary data.

An example PDF417:

If using the Professional plus 2D Write edition, 2D writes are supported for PDF417 using an external application. Typically this can be done using the ImagXpress control or by writing to a Printer Device Context. The external application will set the barcode writing parameters and make a call to the Create method. The output image will then be available in the image properties.

Included features to use for this functionality are:

  • BarcodeData - Barcode value returned as an array of bytes.
  • MinimumBarHeight property - PDF417 uses this value as a multiplier of the minimum barcode width to set the row module height.
  • Rows - This value is used to set the number of rows.
  • RowsCreated - The number of rows created.
  • Columns - This value is used to set the number of columns to create.
  • ColumnsCreated - The number of columns created.
  • ErrorCorrectionLevel - This value is used for the amount of error correction to add to a barcode which supports selected error correction level.
  • ErrorCorrectionLevelUsed - The value from the error correction level created.
  • PDF417ErrorCorrectionLevel enumeration - The range of possible values to use with ErrorCorrectionLevel property.
  • RequiredHeight - An output height value is required to create the barcode image.
  • RequiredWidth - An output width value is required to create the barcode image.

Caution: When using trial (unpaid) licensing, the words "UNLICENSED www.jpg.com" will appear in the middle of every DataMatrix and PDF417 barcode created, taking up 24 bytes of space. When testing the contents of generated barcodes, be aware of the extra space requirements.

See Also

WriterPDF417 Class | PDF417ErrorCorrectionLevel Enumeration


%%ItemTitle%%

Glossary Item Box

Checksums

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PostNet

Specific to the US Postal Service is the PostNet (Postal Numeric Encoding Technique) examples can be found on of mail in the United States. Unique in that it varies the height instead of the width of the bars. Except for the start and end bars they are in groups of five with two long, three short. A PostNet can encode five, nine, or eleven digits, nothing else. It includes a checksum.

See Also

Checksums


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

QRcode

QR code is one of very few barcode types that allow encoding of Kanji and Kana.

Statistics

  • The symbol size of the QRcode is 21 x 21 modules to 177 x 177 modules corresponding to Version 1-40, increasing in steps of 4.
  • The numeric data is maximum capacity 7089 digits.
  • The alphanumeric data maximum capacity is 4296 characters.
  • The byte data maximum capacity is 2953 bytes.
  • The Kanji data maximum capacity is 1817 characters.

Error Correction Level

This barcode type uses a Reed-Solomon error detection and correction scheme. There are four levels of error correction, each with increasing amount of error recover. Note: The higher the error level, the less data that can be stored in the barcode.

  • "L" - 7% error recovery
  • "M" - 15% error recovery
  • "Q" - 25% error recovery
  • "H" - 30% error recovery


%%ItemTitle%%

Glossary Item Box

BarcodeType Enumeration | Checksums

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Royal Post 4-State Barcode

The United Kingdom has implemented a new 4-state barcode referred to as the Royal Mail 4-State Customer Code (RM4SCC).

An example is shown below:

This barcode type is used by the Royal Post. It encodes 5, 6, or 7 character post codes along with a two character Delivery Point Suffix (DPS). A checksum character is included to verify the barcode read.

See Also

BarcodeType Enumeration | Checksums


%%ItemTitle%%

Glossary Item Box

MinimumBarWidth Property | HorizontalWhiteSpace Property | EAN-13 and JAN | TextNotchPercent Property | BarcodeType Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UPC-A

The UPC-A code is the standard version of the UPC code and has 12 digits. It is also called UPC-12 and is very similar to the EAN code. The UPC-A code is a numeric code, which is able to display digits from 0 to 9. Each character consists of two lines and two spaces.

UPC-A encodes 12 digits. The first digit of the UPC-A code indicates what the code contains as follows:

0. Regular UPC code

1. Reserved

2. Articles where the price varies by weight: for example meat.

3. National Drug Code (NDC) and National Health Related Items Code (HRI)

4. UPC code which can be used without format restrictions. For use in-store on non-food items 5. Coupons

6. Reserved

7. Regular UPC code

8. Reserved

9. Reserved

The second to sixth digits indicate the producer of the article (UPC ID number). This number is issued by the Uniform Code Council (UUC). The seventh to eleventh digits show the individual article number issued by the producer. The last digit is a Modulo 103 checksum digit, which is calculated by Barcode Xpress.

The height of the UPC-A symbol should be at least half of the length of the symbol.

Barcode Xpress generates an error if you have characters in your barcode value that are not allowed. You can have 11 or 12 digits in the UPC-A value. You don’t need to include the 12th digit (checksum) since Barcode Xpress calculates it anyway.

UPC-A requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels.

The UPC-A barcode is also commonly written with 2 different bar heights. Typically, the height of the left, center and right guard bars are greater than the height of the bars encoding the actual barcode value, essentially creating a notch in the barcode where the text value can be written. Barcode Xpress provides the user with control over the size of this notch with the TextNotchPercent property.

The TextNotchPercent property can be set to a value of 0 to 50. This number represents the percentage of the tall bar height the short bars will be shortened by. For example, if TextNotchPercent is 10, and the bar height is set to 100 pixels, the tall bars (left, center and right guard bars) will be 100 pixels tall, and the short bars (bars encoding the value) will be 90 pixels tall.

If you use Barcode Xpress to detect UPC-A barcodes, you should set the BarcodeType property to this barcode type so that the barcode engine specifically looks for UPC-A. If you don’t tell the barcode engine to specifically look for UPC-A barcodes, it might confuse a UPC-A barcode with a EAN-13 barcode.

See Also

MinimumBarWidth Property | HorizontalWhiteSpace Property | EAN-13 and JAN | TextNotchPercent Property | BarcodeType Property


%%ItemTitle%%

Glossary Item Box

UPC-A | Checksums | TextNotchPercent | MinimumBarWidth Property | HorizontalWhiteSpace Property

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UPC-E

UPC-E is a variation of the UPC-A symbol that is used for number system 0. The UPC-E code is a numeric-only code which is able to display digits from 0 to 9. UPC-E has 8 digits, where the last digit is a checksum digit automatically added by Barcode Xpress. The first digit is always "0" and it is also automatically added by Barcode Xpress.

The UPC-E code is a compressed barcode which is intended for use on small items. Compression works by squeezing extra zeros out of the barcode and then automatically re-inserting them at the scanner. Only barcodes containing zeros are candidates for the UPC-E symbol.

Barcode Xpress generates an error if you have characters in your barcode value that are not allowed. You can have 6, 10, 11 or 12 digits in the UPC-E value. If the barcode value has more than 6 digits, Barcode Xpress automatically compresses the value. There are four rules that determine what UPC codes can be created using the compressed UPC-E format:

  • If the last 3 digits of the manufacturer’s number are 000, 100, or 200, the valid product code numbers are 00000-00999 (1,000 numbers).
  • If the last 3 digits of the manufacturer’s number are 300, 400, 500, 600, 700, 800, or 900, the valid product code numbers are 00000-00099 (100 numbers).
  • If the last 2 digits of the manufacturer’s number are 10, 20, 30, 40, 50, 60, 70, 80 or 90, the valid product code numbers are 00000-00009 (10 numbers).
  • If the manufacturer’s number does not end in zero, the valid product code numbers are 00005-00009 (5 numbers).

UPC-E requires a quiet zone, which should be at least the width of 10 narrow bars. This means that if you set the MinimumBarWidth property to 3 pixels (narrow bar size), you should set the HorizontalWhiteSpace property to 30 pixels.

The UPC-E barcode is also commonly written with 2 different bar heights. Typically, the height of the left and right guard bars are greater than the height of the bars encoding the actual barcode value, essentially creating a notch in the barcode where the text value can be written.

Barcode Xpress provides the user with control over the size of this notch with the TextNotchPercent property. The TextNotchPercent property can be set to a value of 0 to 50. This number represents the percentage of the tall bar height the short bars will be shortened by.

For example, if TextNotchPercent is 10, and the bar height is set to 100 pixels, the tall bars (left and right guard bars) will be 100 pixels tall, and the short bars (bars encoding the value) will be 90 pixels tall.

See Also

UPC-A | Checksums | TextNotchPercent | MinimumBarWidth Property | HorizontalWhiteSpace Property


%%ItemTitle%%

Glossary Item Box

Recognize a Barcode | Access Results | Create a Barcode | Overview

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Acquire an Image for Barcode Recognition

Image Options

Barcode Xpress works with 1-bit black and white images. To convert color or grayscale image to 1-bit, use the ImagXpress ColorDepth method or other methods with the included ImagXpress component. For applications requiring image thresholding, superior results may be obtained by using the Binarize method in ScanFix Bitonal edition, or the Binarize method in ImagXpress Document edition. Each of these options may be purchased for an upgrade fee.

Checks before Barcode Recognition

If possible, the following properties should be set before the detection process is started:
  • InkColor – The default barcode color is black.
  • Orientation – The default barcode orientation is all orientations.
  • BarcodeTypes – The type of barcodes you want to detect. The default is all 1D barcodes.

See the BarcodeTypes property for specific identification of barcode types that must be explicitly set to be recognized, and how to speed up barcode detection for known barcode types.

If the barcode image quality is poor (i.e. less than 300 dpi), set the BarcodeTypes property to the specific barcode type in order to obtain accurate results.
  • MaximumBarcodes – Sets the maximum number of barcodes that will be detected. The default is 100.

If you know how many barcodes you expect to find, set the MaximumBarcodes to that value, and Barcode Xpress v5 will stop looking once that number is found.

See the Recognize a Barcode topic for information on recognition.

See the Overview topic for code examples on acquiring barcodes.

See Also

Recognize a Barcode | Access Results | Create a Barcode | Overview


%%ItemTitle%%

Glossary Item Box

Acquire an Image for Barcode Recognition | Access Results | Create a Barcode | Debug Your Application | Overview

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Recognize a Barcode

Once your image has been acquired, pre-image processing has been performed, and properties are set appropriately as per the Acquire Image topic, you are ready to recognize the barcode on the image.

Barcode Xpress automatically detects all barcodes in an image and gives you complete details about it.

If you know which barcodes you want to recognize, setting the Area values to define a smaller rectangular area on your image will speed up processing. By default these values are set to 0 which tells Barcode Xpress to search the entire image automatically.

Supported Barcodes for Recognition

Barcodes supported for recognition are listed in the Overview. The edition you have enabled will determine exact barcodes. To modify editions, see theTrial Mode | Changing BarcodeXpress Edition topic for more information.

Once the BarcodeTypes property has been determined as stated in the Acquire Image topic, use the following methods and properties to recognize the barcode.

Methods

  • Analyze(Bitmap) - This method detects barcodes within the given bitmap image.
  • Analyze(Int32) - This method detects barcodes within the given handle to a DIB (Device Independent Bitmap).

Properties

  • AppendCheckSum - This property gets and sets a value which determines if a checksum value is appended to the barcode during recognition.
  • Area - This property gets and sets the area of the image, in pixels, to analyze for barcode recognition.
  • AustralianPostCustomDecodeMode - This property gets and sets the AustrailianPostCustomDecodeType.
  • BarcodeTypes - This property gets and sets the type of barcodes to analyze during recognition processing.
  • IncludeControlCharacters - This property gets and sets the control characters in the barcode value during recognition processing.
  • InkColor - This property gets and sets the ink color of barcodes to search for during recognition processing.
  • MaximumBarcodes - This property gets and sets the maximum number of barcodes to recognize.
  • Orientation - This property gets and sets the orientation of the barcodes to analyze during recognition.
  • ReturnPossibleBarcodes - This property gets and sets a value to determine if possible barcodes are returned in the result list.

See the Overview topic for code examples on recognizing barcodes.

To obtain the results after analyzing the barcode on an image, See the Access Results topic.

See Also

Acquire an Image for Barcode Recognition | Access Results | Create a Barcode | Debug Your Application | Overview


%%ItemTitle%%

Glossary Item Box

Acquire an Image for Barcode Recognition | Recognize a Barcode | Create a Barcode | Overview | Debug Your Application

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Access Results

Get Barcode Results

Result Class

The Analyze method returns an array of Result objects. Each element of the Result array contains the results of a single recognized barcode (or unsolved barcode. See ReturnPossibleBarcodes).

The C# code below demonstrates how to get the recognition results:

using PegasusImaging.WinForms.BarcodeXpress5;

// call Analyze to detect barcodes in the image
// all detected barcodes will be returned to the
// Result object array.
Result[] results = bcXpress.reader.Analyze(hDib);

// get some results info, if any
for (short i = 1; i > results.Length; i++)
{
   // get result for current barcode
   Result curResult = (Result)results.GetValue(i);

   // do something with results
   MessageBox.Show(curResult.BarcodeName);
   MessageBox.Show(curResult.BarcodeValue);
}

Properties

  • Area - This property gets the bounding rectangular area of the recognized barcode.
  • BarcodeData - This property gets the recognized barcode value as a char array.
  • BarcodeDataAsByte - This property gets the recognized barcode data value in bytes.
  • BarcodeName - This property gets the name of the recognized barcode.
  • BarcodeType - This property gets the type of the recognized barcode.
  • BarcodeValue - This property gets the value of the recognized barcode.
  • Confidence - This property gets the confidence of the recognized barcode.
  • Length - This property gets the length of the result string.
  • NumberCheckSumChars - This property gets the number of characters in the recognized checksum.
  • Point1 - This property gets the top left coordinate of the recognized barcode.
  • Point2 - This property gets the top right coordinate of the recognized barcode.
  • Point3 - This property gets the bottom left coordinate of the recognized barcode.
  • Point4 - This property gets the bottom right coordinate of the recognized barcode.
  • Skew - This property gets the angle of skew for the recognized barcode analyzed.
  • ValidCheckSum - This property gets a valid checksum for a recognized barcode.

Order of Results

Since Barcode Xpress can return multiple barcode results from a single scan, the detected barcode results (both solved and unsolved) will be sorted using the following criteria. Note that all solved barcodes will be ordered before unsolved barcodes.

  1. First, the confidence factor is used to sort the barcode results from highest confidence to lowest. The Confidence property gets the confidence of the barcode that was recognized.
  2. Next, for any barcodes with the same confidence, they will then be sorted by their location, from top to bottom, then left to right.

See the Overview topic for code examples on recognition results.

See Also

Acquire an Image for Barcode Recognition | Recognize a Barcode | Create a Barcode | Overview | Debug Your Application


%%ItemTitle%%

Glossary Item Box

Acquire an Image for Barcode Recognition | Recognize a Barcode | Access Results | Overview

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Create a Barcode

Basic Steps to Create a Barcode

Set the barcode value and type you want to create

  • BarcodeType - This property gets and sets the type of barcode to create from the BarcodeType enumeration.
  • BarcodeValue - This property gets and sets the value of the barcode to be created.
  • BarcodeData - This property gets and sets the current barcode value as an array of bytes used only if non-ASCII text values are needed.

Call the Create or CreateBitmap method from the WriterBase class to create a barcode and return the image.

  • Create - This method is the main method for creating barcodes.
  • CreateBitmap - This method creates bitmap barcodes.

Note: There are many additional properties within the Writer and WriterBase classes to use as needed in creating barcodes. See the class overview for more information.

See the Overview topic for code examples on writing barcodes.

Barcode Xpress provides many additional methods and properties to use in barcode creation. See the PegasusImaging.WinForms.BarcodeXpress5 Namespace topic for API information on methods and properties.

See Also

Acquire an Image for Barcode Recognition | Recognize a Barcode | Access Results | Overview


%%ItemTitle%%

Glossary Item Box

Getting Support and Samples

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Debug Your Application

Because debugging and writing debug information to a log file is time consuming and expensive, Barcode Xpress provides the ability to control the level of information written to the debug log as well as the ability to turn off writing to a file completely.

Use the objects below to adjust the settings of your debugging, event handling, memory and IDispose for optimal performance.

Control Debugging Information

  • Debug - Turns on or off the ability to write to the debug log file.
  • DebugLogFile - A filename which stores the debug log information.
  • ErrorLevel - Controls the amount of information that is written to the debug log file.

Note: When ErrorLevel is set to Detailed, BarcodeXpress will log most of your calls to the component including the occurrence of exceptions, the result of most major operations and the operation of each event it raises.

Troubleshooting

  • Color or Grayscale Images - Barcode Xpress works with 1-bit black and white images. To convert color or grayscale images to 1-bit, use the ColorDepth or other methods with the included ImagXpress component. Note: In some situations better results may be obtained using the Binarize method, available in both the ScanFix Xpress Bitonal edition and ImagXpress Document edition. Contact sales@jpg.com for pricing information.
  • Not able to read Barcodes when you know they exist due to poor image quality - There is no set process for cleanup of images. What may work on one image for clean-up, may not work on another. The included ScanFix component can perform many different clean-up operations such as SmoothandZoom, Dilation, and Erosion which all assist in recognition of the barcodes, but there is no set order in which to perform these operations that will ensure each image barcode will be detected.
  • Issues with barcode recognition - Some reasons why your barcode may not be detected could be due to poor resolution, resolutions of horizontal and vertical are not the same, the barcode wasn't made correctly according to the standard, bad scanning quality, bad image quality (see bullet two above), or the barcode is a type that Barcode Xpress doesn't read. Attempt to solve any image quality, resolution, and scanning properties using the included ImagXpress and ScanFix components.
  • Confidence values - Confidence values are programmed into the component. Barcode Xpress is conservative on confidence values compared to other competitive components so the developer understands when a barcode may not be 100% accurate. This ensures the barcode recognized is producing accurate data.

Event Handling

Barcode Xpress may throw a number of exceptions if it comes across errors or events that need to be handled by the application. These exceptions are listed below:

  • ColumnCountException - Thrown if the input columns are outside the valid range for a 2D barcode type to be created.
  • ErrorCorrectionLevelTooHighException - thrown if the input barcode data will fit in the 2D barcode but the error correction words will not fit because there are more error words than will fit in the remainder of the symbol.
  • ImageNotAvailableException - thrown whenever there is no image available for an operation that requires one.
  • InsufficientHeightException - thrown if the Height value set by the user is smaller than the required height of the barcode.
  • InsufficientWidthException - thrown if the barcode Width value set by the user is smaller than the required width of the barcode.
  • InternalErrorException - thrown whenever an unhandled exception is encountered.
  • InvalidAreaException - thrown whenever an invalid area is used in barcode recognition.
  • InvalidBarcodeValueException - thrown if the BarcodeValue is NULL, or if the barcode value set is invalid for the current barcode type.
  • InvalidBitmapException - thrown if an invalid bitmap is detected.
  • InvalidErrorCorrectionLevelException - thrown if the error correction level is not in the valid range for the 2D barcode type.
  • InvalidIndexException - thrown if a request for results is outside the valid range.
  • InvalidLicenseException - thrown if an invalid license is detected.
  • InvalidParameterException - thrown if a parameter is invalid.
  • LargeDataSizeException - thrown if the barcode data will not fit in the current symbols rows and columns.
  • OutOfMemoryException - thrown if the creation of the bitmap to draw the barcode fails.
  • ParameterOutOfRangeException - thrown if a parameter is out of range.
  • PDF417EncodingException - thrown if an internal exception has occurred while trying to encode the barcode data.
  • RowCountException - thrown if the input columns are outside the valid range of the 2D barcode type to be created.
  • TimeoutErrorException - this exception is not used.
  • UnableCreateUPCEException - thrown if the function to expand a UPC-E value to a UPC-A value fails.
  • UnableReadBarcodeTypeException - thrown if an unsupported barcode type is detected.
  • UnsupportedBarcodeTypeException - thrown if an unsupported barcode type is detected.

Error Codes

Listed below is a cross reference of error codes and their corresponding descriptions.

Error Codes | Error | Description
9000 | OutOfMemoryException | There is not enough memory to continue the operation.
9001 | InvalidParameterException | Invalid parameter.
9002 | ParameterOutOfRangeException | Parameter out of range.
9003 | InvalidBitmapException | Invalid bitmap.
9004 | UnableReadbitmapException | Unable to read bitmap.
9005 | UnsupportBarcodeTypeException | Unsupported barcode type.
9006 | InvalidIndexException | Invalid index.
9007 | InvalidBarcodeValueException | Invalid barcode value set.
9008 | InsufficientWidthException | Insufficient barcode width.
9009 | InsufficientHeightException | Insufficient barcode height.
9010 | UnableCreateUPCEException | Unable to create UPC-E Barcode.
9011 | InvalidLicenseException | Invalid license.
9012 | TimeoutErrorException | Timeout Error.
9013 | ImageNotAvailableException | Image not available.
9014 | InternalErrorException | Internal error.
9015 | InvalidAreaException | Area is outside required range.
9100 | PDF417EncodingException | PDF417 encoding error.
9101 | RowCountException | Invalid row count for the barcode type.
9102 | ColumnCountException | Invalid column count for the barcode type.
9104 | LargeDataSizeException | Barcode data too large for the barcode symbol size.
9105 | InvalidErrorCorrectionLevelException | Error correction level is invalid.
9106 | ErrorCorrectionLevelTooHighException | Error correction level is too high, will not fit in barcode symbol with the data.

See Also

Getting Support and Samples


%%ItemTitle%%

See Also

PegasusImaging.WinForms.BarcodeXpress5 Assembly

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Inheritance Hierarchy

Classes

Class | Description
BarcodeException | Summary description for BarcodeExceptions.
BarcodeXpress | The main object for this component.
ColumnCountException | This exception is thrown if the input columns are outside the valid range for a 2D barcode type to be created.
ErrorCorrectionLevelTooHighException | This exception is thrown if the input barcode data will fit in the 2D barcode but the error correction words will not fit because there are more error words than will fit in the remainder of the symbol.
ImageNotAvailableException | An exception object that this component will throw whenever there is no image available for an operation that requires one.
InsufficientHeightException | This exception is thrown if the Height value set by the user is smaller than the required height of the barcode.
InsufficientWidthException | This exception is thrown if the barcode Width value set by the user is smaller than the required width of the barcode.
InternalErrorException | An exception object that this component will throw whenever an unhandled exception is encountered.
InvalidAreaException | An exception object that this component will throw whenever an invalid area is used in barcode recognition.
InvalidBarcodeValueException | This exception is thrown if the BarcodeValue is NULL, or if the barcode value set is invalid for the current barcode type.
InvalidBitmapException | This exception is thrown if an invalid bitmap is detected.
InvalidErrorCorrectionLevelException | This exception is thrown if the error correction level is not in the valid range for the 2D barcode type.
InvalidIndexException | This exception is thrown if a request for results is outside the valid range.
InvalidLicenseException | This exception is thrown if an invalid license is detected.
InvalidParameterException | This exception is thrown if a parameter is invalid.
LargeDataSizeException | This exception is thrown if the barcode data will not fit in the current symbol's rows and columns.
Licensing | Provides methods for setting the license information for the component.
OutOfMemoryException | This exception is thrown if the creation of the bitmap to draw the barcode fails.
ParameterOutOfRangeException | This exception is thrown if a parameter is out of range.
PDF417EncodingException | This exception is thrown if an internal exception has occurred while trying to encode the barcode data.
Reader | The Reader Class includes methods and properties to be used in recognizing barcodes.
Result | The Results Class includes properties used to return barcode recognition results.
RowCountException | This exception is thrown if the input columns are outside the valid range of the 2D barcode type to be created.
TimeoutErrorException | This exception is not used.
UnableCreateUPCEException | This exception is thrown if the function to expand a UPC-E value to a UPC-A value fails.
UnableReadBitmapException | This exception is thrown if the bitmap is unreadable.
UnsupportBarcodeTypeException | This exception is thrown if an unsupported barcode type is detected.
Writer | The Writer Class is inherited from the WriterBase Class and is used to create barcodes.
WriterBase | The WriterBase Class includes properties used to write barcode recognition results.
WriterDataMatrix | WriterDataMatrix extends the writer class to include the writing of DataMatrix barcodes.
WriterPDF417 | WriterPDF417 extends the writer class to include the writing of PDF417 barcodes.

Enumerations

Enumeration | Description
AustralianPostCustomDecodeType | The Australian Post 4 State barocde supports a custom section in both the Customer Barcode 2 and Customer Barcode 3 formats.
BarcodeStatus | Indicates the barcode image is either acceptable, possibly out of range or invalid.
BarcodeType | Specifies a barcode type.
DataMatrixSizes | The rows and columns are encoded in the value of the enumerations using this equation: RowsXColumnsY = X * 256 + Y. AutoRowsAndColumns is -1.
ErrorLevelInfo | Defines the amount of error information to write to the DebugLogFile.
EvaluationChoice | The evaluation choice of the component.
InkColorInfo | Specifies the ink color for barcodes search.
LicenseChoice | The license edition of the component.
OrientationInfo | Specifies the orientation for the barcode search.
PDF417ErrorCorrectionLevel | PDF417 Error correction levels.
ShowTextInfo | Specifies the text to display adjacent to the created barcode.

See Also

PegasusImaging.WinForms.BarcodeXpress5 Assembly


%%PageItemTitle%%

BarcodeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeException Class

Summary description for BarcodeExceptions.

For a list of all members of this type, see BarcodeException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.UnsupportBarcodeTypeException
PegasusImaging.WinForms.BarcodeXpress5.UnableReadBitmapException
PegasusImaging.WinForms.BarcodeXpress5.UnableCreateUPCEException
PegasusImaging.WinForms.BarcodeXpress5.TimeoutErrorException
PegasusImaging.WinForms.BarcodeXpress5.RowCountException
PegasusImaging.WinForms.BarcodeXpress5.PDF417EncodingException
PegasusImaging.WinForms.BarcodeXpress5.ParameterOutOfRangeException
PegasusImaging.WinForms.BarcodeXpress5.OutOfMemoryException
PegasusImaging.WinForms.BarcodeXpress5.LargeDataSizeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidParameterException
PegasusImaging.WinForms.BarcodeXpress5.InvalidLicenseException
PegasusImaging.WinForms.BarcodeXpress5.InvalidIndexException
PegasusImaging.WinForms.BarcodeXpress5.InvalidErrorCorrectionLevelException
PegasusImaging.WinForms.BarcodeXpress5.InvalidBitmapException
PegasusImaging.WinForms.BarcodeXpress5.InvalidBarcodeValueException
PegasusImaging.WinForms.BarcodeXpress5.InvalidAreaException
PegasusImaging.WinForms.BarcodeXpress5.InternalErrorException
PegasusImaging.WinForms.BarcodeXpress5.InsufficientWidthException
PegasusImaging.WinForms.BarcodeXpress5.InsufficientHeightException
PegasusImaging.WinForms.BarcodeXpress5.ImageNotAvailableException
PegasusImaging.WinForms.BarcodeXpress5.ErrorCorrectionLevelTooHighException
PegasusImaging.WinForms.BarcodeXpress5.ColumnCountException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public Class BarcodeException
   Inherits Exception
[C#]
[SerializableAttribute()]
public class BarcodeException : Exception
[C++]
[SerializableAttribute()]
public __gc class BarcodeException : public Exception
[C++/CLI]
[SerializableAttribute()]
public ref class BarcodeException : public Exception

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

BarcodeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

BarcodeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeException Class

BarcodeException overview

Public Constructors

Public Constructor BarcodeException Constructor Overloaded. General base exception to assist in debugging the root cause.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

BarcodeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class : BarcodeException Constructor (BarcodeException)

General base exception to assist in debugging the root cause.

Overload List

General base exception to assist in debugging the root cause.

[Visual Basic] Public Sub New()

[C#] public BarcodeException();

[C++] public BarcodeException();

[C++/CLI] public BarcodeException();

Generates an exception based on the given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public BarcodeException(int);

[C++] public BarcodeException(int);

[C++/CLI] public BarcodeException(int);

Generates an exception based on the given string.

[Visual Basic] Public Sub New(String)

[C#] public BarcodeException(string);

[C++] public BarcodeException(string*);

[C++/CLI] public BarcodeException(String^);

Generates an exception based on the given error number and string.

[Visual Basic] Public Sub New(Integer,String)

[C#] public BarcodeException(int,string);

[C++] public BarcodeException(int,string*);

[C++/CLI] public BarcodeException(int,String^);

Generates an exception based on the given string and a given inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public BarcodeException(string,Exception);

[C++] public BarcodeException(string*,Exception*);

[C++/CLI] public BarcodeException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class > BarcodeException Constructor : BarcodeException Constructor()

General base exception to assist in debugging the root cause.

[Visual Basic]
Public Function New()
[C#]
public BarcodeException();
[C++]
public: BarcodeException();
[C++/CLI]
public:
BarcodeException();

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members | Overload List


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class > BarcodeException Constructor : BarcodeException Constructor(Int32)

Generates an exception based on the given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public BarcodeException(
   int errorNumber
);
[C++]
public: BarcodeException(
   int errorNumber
)
[C++/CLI]
public:
BarcodeException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members | Overload List


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class > BarcodeException Constructor : BarcodeException Constructor(Int32,String)

Generates an exception based on the given error number and string.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public BarcodeException(
   int errorNumber,
   string message
);
[C++]
public: BarcodeException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
BarcodeException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members | Overload List


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the error message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class > BarcodeException Constructor : BarcodeException Constructor(String)

Generates an exception based on the given string.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public BarcodeException(
   string message
);
[C++]
public: BarcodeException(
   string* message
)
[C++/CLI]
public:
BarcodeException(
   String^ message
)

Parameters

message
A string which represents the error message.

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members | Overload List


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
A given inner exception.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class > BarcodeException Constructor : BarcodeException Constructor(String,Exception)

Generates an exception based on the given string and a given inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public BarcodeException(
   string message,
   Exception innerException
);
[C++]
public: BarcodeException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
BarcodeException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
A given inner exception.

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members | Overload List


%%PageItemTitle%% $$Properties$$

BarcodeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeException Class

For a list of all members of this type, see BarcodeException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

BarcodeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

BarcodeException Class | BarcodeException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Number Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeException Class : Number Property

Gets the number of the last error.

[Visual Basic]
Public ReadOnly Property Number As Integer
[C#]
public int Number {get;}
[C++]
public: __property int get_Number();
[C++/CLI]
public:
property int Number {
   int get();
}

Requirements

Platforms: See Getting Started section

See Also

BarcodeException Class | BarcodeException Members


%%PageItemTitle%%

BarcodeXpress Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeXpress Class

The main object for this component.

For a list of all members of this type, see BarcodeXpress members.

Object Model

Inheritance Hierarchy

System.Object
System.MarshalByRefObject
System.ComponentModel.Component
PegasusImaging.WinForms.BarcodeXpress5.BarcodeXpress

Syntax

[Visual Basic]
<ToolboxBitmapAttribute()>
Public Class BarcodeXpress
   Inherits Component
[C#]
[ToolboxBitmapAttribute()]
public class BarcodeXpress : Component
[C++]
[ToolboxBitmapAttribute()]
public __gc class BarcodeXpress : public Component
[C++/CLI]
[ToolboxBitmapAttribute()]
public ref class BarcodeXpress : public Component

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

BarcodeXpress Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeXpress Class

BarcodeXpress overview

Public Constructors

Public Constructor BarcodeXpress Constructor The main constructor for this component.

Public Fields

Public Field reader | Used to recognize barcodes.
Public Field writer | Used to create barcodes.

Public Properties

Public Property Container (Inherited from System.ComponentModel.Component) | Gets the IContainer that contains the Component.
Public Property Debug | Gets and sets an indicator which determines if the component writes information to a DebugLogFile or not.
Public Property DebugLogFile | Gets and sets the filename of the debug log file.
Public Property ErrorLevel | Gets and sets the error level of items that the component should write to the debug log file.
Public Property Licensing | Provides access to an object you can use to provide licensing information to the component.
Public Property Performance | Gets the barcode capability and performance for the system.
Public Property Site (Inherited from System.ComponentModel.Component) | Gets or sets the ISite of the Component.

Public Methods

Public Method AboutBox | Displays a dialog box that contains information about the component.
Public Method CreateObjRef (Inherited from System.MarshalByRefObject) | Creates an object that contains all the relevant information required to generate a proxy used to communicate with a remote object.
Public Method Dispose (Inherited from System.ComponentModel.Component) | Removes any unused memory. Releases all resources used by the Component.
Public Method GetLifetimeService (Inherited from System.MarshalByRefObject) | Retrieves the current lifetime service object that controls the lifetime policy for this instance.
Public Method InitializeLifetimeService (Inherited from System.MarshalByRefObject) | Obtains a lifetime service object to control the lifetime policy for this instance.
Public Method ReadFromStream | Reads a specially-formatted stream and places the values into properties of this object.
Public Method ToString (Inherited from System.ComponentModel.Component) | Returns a String containing the name of the Component, if any. This method should not be overridden.
Public Method WriteToStream | Writes some properties of this object to a specially-formatted stream.

Public Events

Public Event Disposed (Inherited from System.ComponentModel.Component) Adds an event handler to listen to the Disposed event on the component.

See Also

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : BarcodeXpress Constructor (BarcodeXpress)

The main constructor for this component.

[Visual Basic]
Public Function New()
[C#]
public BarcodeXpress();
[C++]
public: BarcodeXpress();
[C++/CLI]
public:
BarcodeXpress();

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

AboutBox Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : AboutBox Method

Displays a dialog box that contains information about the component.

[Visual Basic]
<CategoryAttribute("BarcodeXpress")>
Public Sub AboutBox()
[C#]
[CategoryAttribute("BarcodeXpress")]
public void AboutBox();
[C++]
[CategoryAttribute("BarcodeXpress")]
public: void AboutBox();
[C++/CLI]
[CategoryAttribute("BarcodeXpress")]
public:
void AboutBox();

Remarks

This method displays an about box for the component. It includes useful information, such as the name and version of the component, copyright dates and links to Pegasus Imaging Corporation's web site.

Example

...

// Call the AboutBox method

bcXpress.AboutBox();

...

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

streamIn
A stream that the method created
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ReadFromStream Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : ReadFromStream Method

Reads a specially-formatted stream and places the values into properties of this object.

[Visual Basic]
<BrowsableAttribute(True)>
Public Sub ReadFromStream( _
   ByVal streamIn As String _
)
[C#]
[BrowsableAttribute(true)]
public void ReadFromStream(
   string streamIn
);
[C++]
[BrowsableAttribute(true)]
public: void ReadFromStream(
   string* streamIn
)
[C++/CLI]
[BrowsableAttribute(true)]
public:
void ReadFromStream(
   String^ streamIn
)

Parameters

streamIn
A stream that the method created

Remarks

This method reads a stream, which contains the values of roperties for this object. It provides a convenient way to store and retrieve the values and preserves as much future compatibility as possible.

This method should read any stream that the WriteToStream method created, even if an older version of this component created it.

Note: You should retrieve the value for the stream from the Construction property of a FormDirector FormDefinition object. When the Type property of that object is "BarcodeXpress", the Content property contains a string that you should send to this method.

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriteToStream Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : WriteToStream Method

Writes some properties of this object to a specially-formatted stream.

[Visual Basic]
<BrowsableAttribute(True)>
Public Function WriteToStream() As String
[C#]
[BrowsableAttribute(true)]
public string WriteToStream();
[C++]
[BrowsableAttribute(true)]
public: string* WriteToStream();
[C++/CLI]
[BrowsableAttribute(true)]
public:
String^ WriteToStream();

Return Type

A stream that can reloaded using the ReadFromStream method.

Remarks

This method writes certain properties of this object to a stream. The stream is intended for use only by the ReadFromStream method and its format may change in a future release of this component. However, even if the format changes, future versions of this components will be able to read streams that this method generates.

Note: You should save the stream in the Construction property of a FormDirector FormDefinition object. You should set the Type to "BarcodeXpress" and the Content to the value that this method returns.

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%% $$Properties$$

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeXpress Class

For a list of all members of this type, see BarcodeXpress members.

Public Properties

Public Property Container (Inherited from System.ComponentModel.Component) | Gets the IContainer that contains the Component.
Public Property Debug | Gets and sets an indicator which determines if the component writes information to a DebugLogFile or not.
Public Property DebugLogFile | Gets and sets the filename of the debug log file.
Public Property ErrorLevel | Gets and sets the error level of items that the component should write to the debug log file.
Public Property Licensing | Provides access to an object you can use to provide licensing information to the component.
Public Property Performance | Gets the barcode capability and performance for the system.
Public Property Site (Inherited from System.ComponentModel.Component) | Gets or sets the ISite of the Component.

See Also

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Debug Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : Debug Property

Gets and sets an indicator which determines if the component writes information to a DebugLogFile or not.

[Visual Basic]
<DesignerSerializationVisibilityAttribute()>
<BrowsableAttribute(False)>
Public Property Debug As Boolean
[C#]
[DesignerSerializationVisibilityAttribute()]
[BrowsableAttribute(false)]
public bool Debug {get; set;}
[C++]
[DesignerSerializationVisibilityAttribute()]
[BrowsableAttribute(false)]
public: __property bool get_Debug();
public: __property void set_Debug(
   bool value
);
[C++/CLI]
[DesignerSerializationVisibilityAttribute()]
[BrowsableAttribute(false)]
public:
property bool Debug {
   bool get();
   void set (bool value);
}

Remarks

This method allows you to turn the debug log file on or off without changing any of the other debug settings. When this value is true , the component will write items to the debug log file, as specified by the DebugLogFile.

Example

...

// Set Debug to true for logging to be performed

bcXpress.Debug = true;

...

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

DebugLogFile Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : DebugLogFile Property

Gets and sets the filename of the debug log file.

[Visual Basic]
<DesignerSerializationVisibilityAttribute()>
<BrowsableAttribute(False)>
Public Property DebugLogFile As String
[C#]
[DesignerSerializationVisibilityAttribute()]
[BrowsableAttribute(false)]
public string DebugLogFile {get; set;}
[C++]
[DesignerSerializationVisibilityAttribute()]
[BrowsableAttribute(false)]
public: __property string* get_DebugLogFile();
public: __property void set_DebugLogFile(
   string* value
);
[C++/CLI]
[DesignerSerializationVisibilityAttribute()]
[BrowsableAttribute(false)]
public:
property String^ DebugLogFile {
   String^ get();
   void set (String^ value);
}

Remarks

This property allows you to control the location of the debug log file.

Valid value: Any valid filename.

Default value: "temp\BarcodeXpress5.log"

Note: This property will have no effect if you set the Debug property to false.

Example

...

// Set the DebugLogFile path and name

bcXpress.DebugLogFile = "c:\logFile.txt";

...

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorLevel Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : ErrorLevel Property

Gets and sets the error level of items that the component should write to the debug log file.

[Visual Basic]
<BrowsableAttribute(True)>
Public Property ErrorLevel As ErrorLevelInfo
[C#]
[BrowsableAttribute(true)]
public ErrorLevelInfo ErrorLevel {get; set;}
[C++]
[BrowsableAttribute(true)]
public: __property ErrorLevelInfo get_ErrorLevel();
public: __property void set_ErrorLevel(
   ErrorLevelInfo value
);
[C++/CLI]
[BrowsableAttribute(true)]
public:
property ErrorLevelInfo ErrorLevel {
   ErrorLevelInfo get();
   void set (ErrorLevelInfo value);
}

Remarks

This property allows you to control the amount of information that the component places into the DebugLogFile. Since it is expensive to generate and write debug log items, set this property to write the least amount of information that you will find useful.

Valid values: Production, Development and Detailed.

Default value: Production

Note: This property will have no effect if the Debug property is set to false.

Example

...

// Set the ErrorLevel of the debugging to Development

bcXpress.ErrorLevel = PegasusImaging.WinForms.BarcodeXpress5.ErrorLevel.Development;

...

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Licensing Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : Licensing Property (BarcodeXpress)

Provides access to an object you can use to provide licensing information to the component.

[Visual Basic]
<BrowsableAttribute(False)>
Public ReadOnly Property Licensing As Licensing
[C#]
[BrowsableAttribute(false)]
public Licensing Licensing {get;}
[C++]
[BrowsableAttribute(false)]
public: __property Licensing* get_Licensing();
[C++/CLI]
[BrowsableAttribute(false)]
public:
property Licensing^ Licensing {
   Licensing^ get();
}

Remarks

This property holds a reference to a Licensing object. You can use that object to send your licensing information to the component.

Example

...

// Set the Licensing EvaluationChoice

bcXpress.Licensing = PegasusImaging.WinForms.BarcodeXpress5.EvaluationMode.TrialDialog;

// Set the LicenseChoice

bcXpress.Licensing = PegasusImaging.WinForms.BarcodeXpress5.LicenseChoice.ProfessionalPlus2DWriteEdition;

...

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Performance Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : Performance Property

Gets the barcode capability and performance for the system.

[Visual Basic]
<BrowsableAttribute(True)>
Public ReadOnly Property Performance As String
[C#]
[BrowsableAttribute(true)]
public string Performance {get;}
[C++]
[BrowsableAttribute(true)]
public: __property string* get_Performance();
[C++/CLI]
[BrowsableAttribute(true)]
public:
property String^ Performance {
   String^ get();
}

Remarks

This property returns the number of barcodes detected as well as the total recognition time, in milliseconds.

Note: The performance value is only valid after the Analyze method has been called.

Example

...

// Get the Performance and put in the string perf

string perf = bcXpress.Performance

...

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%% $$Fields$$

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Class Fields

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeXpress Class

For a list of all members of this type, see BarcodeXpress members.

Public Fields

Public Field reader | Used to recognize barcodes.
Public Field writer | Used to create barcodes.

See Also

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

reader Field

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : reader Field (BarcodeXpress)

Used to recognize barcodes.

[Visual Basic]
Public reader As Reader
[C#]
public Reader reader
[C++]
public: Reader* reader
[C++/CLI]
public:
Reader^ reader

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

BarcodeXpress Class | BarcodeXpress Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

writer Field

PegasusImaging.WinForms.BarcodeXpress5 Namespace > BarcodeXpress Class : writer Field (BarcodeXpress)

Used to create barcodes.

[Visual Basic]
Public writer As Writer
[C#]
public Writer writer
[C++]
public: Writer* writer
[C++/CLI]
public:
Writer^ writer

Requirements

Platforms: See Getting Started section

See Also

BarcodeXpress Class | BarcodeXpress Members


%%PageItemTitle%%

ColumnCountException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ColumnCountException Class

This exception is thrown if the input columns are outside the valid range for a 2D barcode type to be created.

For a list of all members of this type, see ColumnCountException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.ColumnCountException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class ColumnCountException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class ColumnCountException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class ColumnCountException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class ColumnCountException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

ColumnCountException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

ColumnCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ColumnCountException Class

ColumnCountException overview

Public Constructors

Public Constructor ColumnCountException Constructor Overloaded. Generated base exception for a column count error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ColumnCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

ColumnCountException Class | ColumnCountException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ColumnCountException Class : ColumnCountException Constructor (ColumnCountException)

Generated base exception for a column count error.

Overload List

Generated base exception for a column count error.

[Visual Basic] Public Sub New()

[C#] public ColumnCountException();

[C++] public ColumnCountException();

[C++/CLI] public ColumnCountException();

Generated exception for a column count error with aa given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public ColumnCountException(int);

[C++] public ColumnCountException(int);

[C++/CLI] public ColumnCountException(int);

Generated exception for a column count error with a given message.

[Visual Basic] Public Sub New(String)

[C#] public ColumnCountException(string);

[C++] public ColumnCountException(string*);

[C++/CLI] public ColumnCountException(String^);

Generated exception for a column count error with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public ColumnCountException(int,string);

[C++] public ColumnCountException(int,string*);

[C++/CLI] public ColumnCountException(int,String^);

Generated exception for a column count error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public ColumnCountException(string,Exception);

[C++] public ColumnCountException(string*,Exception*);

[C++/CLI] public ColumnCountException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

ColumnCountException Class | ColumnCountException Members


%%PageItemTitle%%

ColumnCountException Class | ColumnCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ColumnCountException Class > ColumnCountException Constructor : ColumnCountException Constructor()

Generated base exception for a column count error.

[Visual Basic]
Public Function New()
[C#]
public ColumnCountException();
[C++]
public: ColumnCountException();
[C++/CLI]
public:
ColumnCountException();

Requirements

Platforms: See Getting Started section

See Also

ColumnCountException Class | ColumnCountException Members | Overload List


%%PageItemTitle%%

ColumnCountException Class | ColumnCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ColumnCountException Class > ColumnCountException Constructor : ColumnCountException Constructor(Int32)

Generated exception for a column count error with aa given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public ColumnCountException(
   int errorNumber
);
[C++]
public: ColumnCountException(
   int errorNumber
)
[C++/CLI]
public:
ColumnCountException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

ColumnCountException Class | ColumnCountException Members | Overload List


%%PageItemTitle%%

ColumnCountException Class | ColumnCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ColumnCountException Class > ColumnCountException Constructor : ColumnCountException Constructor(Int32,String)

Generated exception for a column count error with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public ColumnCountException(
   int errorNumber,
   string message
);
[C++]
public: ColumnCountException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
ColumnCountException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ColumnCountException Class | ColumnCountException Members | Overload List


%%PageItemTitle%%

ColumnCountException Class | ColumnCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ColumnCountException Class > ColumnCountException Constructor : ColumnCountException Constructor(String)

Generated exception for a column count error with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public ColumnCountException(
   string message
);
[C++]
public: ColumnCountException(
   string* message
)
[C++/CLI]
public:
ColumnCountException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ColumnCountException Class | ColumnCountException Members | Overload List


%%PageItemTitle%%

ColumnCountException Class | ColumnCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ColumnCountException Class > ColumnCountException Constructor : ColumnCountException Constructor(String,Exception)

Generated exception for a column count error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public ColumnCountException(
   string message,
   Exception innerException
);
[C++]
public: ColumnCountException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
ColumnCountException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

ColumnCountException Class | ColumnCountException Members | Overload List


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ErrorCorrectionLevelTooHighException Class

This exception is thrown if the input barcode data will fit in the 2D barcode but the error correction words will not fit because there are more error words than will fit in the remainder of the symbol.

For a list of all members of this type, see ErrorCorrectionLevelTooHighException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.ErrorCorrectionLevelTooHighException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class ErrorCorrectionLevelTooHighException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class ErrorCorrectionLevelTooHighException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class ErrorCorrectionLevelTooHighException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class ErrorCorrectionLevelTooHighException sealed : public BarcodeException

Remarks

To solve this issue, either decrease the error level for the specific barcode or increase the symbol size with the rows and columns.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

ErrorCorrectionLevelTooHighException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

ErrorCorrectionLevelTooHighException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ErrorCorrectionLevelTooHighException Class

ErrorCorrectionLevelTooHighException overview

Public Constructors

Public Constructor ErrorCorrectionLevelTooHighException Constructor Overloaded. Generated base exception for an error correction level too high.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ErrorCorrectionLevelTooHighException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ErrorCorrectionLevelTooHighException Class : ErrorCorrectionLevelTooHighException Constructor (ErrorCorrectionLevelTooHighException)

Generated base exception for an error correction level too high.

Overload List

Generated base exception for an error correction level too high.

[Visual Basic] Public Sub New()

[C#] public ErrorCorrectionLevelTooHighException();

[C++] public ErrorCorrectionLevelTooHighException();

[C++/CLI] public ErrorCorrectionLevelTooHighException();

Generated exception for an error correction level too high with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public ErrorCorrectionLevelTooHighException(int);

[C++] public ErrorCorrectionLevelTooHighException(int);

[C++/CLI] public ErrorCorrectionLevelTooHighException(int);

Generated exception for an error correction level too high with a given message.

[Visual Basic] Public Sub New(String)

[C#] public ErrorCorrectionLevelTooHighException(string);

[C++] public ErrorCorrectionLevelTooHighException(string*);

[C++/CLI] public ErrorCorrectionLevelTooHighException(String^);

Generated exception for an error correction level too high with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public ErrorCorrectionLevelTooHighException(int,string);

[C++] public ErrorCorrectionLevelTooHighException(int,string*);

[C++/CLI] public ErrorCorrectionLevelTooHighException(int,String^);

Generated exception for an error correction level too high with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public ErrorCorrectionLevelTooHighException(string,Exception);

[C++] public ErrorCorrectionLevelTooHighException(string*,Exception*);

[C++/CLI] public ErrorCorrectionLevelTooHighException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ErrorCorrectionLevelTooHighException Class > ErrorCorrectionLevelTooHighException Constructor : ErrorCorrectionLevelTooHighException Constructor()

Generated base exception for an error correction level too high.

[Visual Basic]
Public Function New()
[C#]
public ErrorCorrectionLevelTooHighException();
[C++]
public: ErrorCorrectionLevelTooHighException();
[C++/CLI]
public:
ErrorCorrectionLevelTooHighException();

Requirements

Platforms: See Getting Started section

See Also

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ErrorCorrectionLevelTooHighException Class > ErrorCorrectionLevelTooHighException Constructor : ErrorCorrectionLevelTooHighException Constructor(Int32)

Generated exception for an error correction level too high with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public ErrorCorrectionLevelTooHighException(
   int errorNumber
);
[C++]
public: ErrorCorrectionLevelTooHighException(
   int errorNumber
)
[C++/CLI]
public:
ErrorCorrectionLevelTooHighException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ErrorCorrectionLevelTooHighException Class > ErrorCorrectionLevelTooHighException Constructor : ErrorCorrectionLevelTooHighException Constructor(Int32,String)

Generated exception for an error correction level too high with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public ErrorCorrectionLevelTooHighException(
   int errorNumber,
   string message
);
[C++]
public: ErrorCorrectionLevelTooHighException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
ErrorCorrectionLevelTooHighException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ErrorCorrectionLevelTooHighException Class > ErrorCorrectionLevelTooHighException Constructor : ErrorCorrectionLevelTooHighException Constructor(String)

Generated exception for an error correction level too high with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public ErrorCorrectionLevelTooHighException(
   string message
);
[C++]
public: ErrorCorrectionLevelTooHighException(
   string* message
)
[C++/CLI]
public:
ErrorCorrectionLevelTooHighException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List


%%PageItemTitle%%

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ErrorCorrectionLevelTooHighException Class > ErrorCorrectionLevelTooHighException Constructor : ErrorCorrectionLevelTooHighException Constructor(String,Exception)

Generated exception for an error correction level too high with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public ErrorCorrectionLevelTooHighException(
   string message,
   Exception innerException
);
[C++]
public: ErrorCorrectionLevelTooHighException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
ErrorCorrectionLevelTooHighException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

ErrorCorrectionLevelTooHighException Class | ErrorCorrectionLevelTooHighException Members | Overload List


%%PageItemTitle%%

ImageNotAvailableException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ImageNotAvailableException Class

An exception object that this component will throw whenever there is no image available for an operation that requires one.

For a list of all members of this type, see ImageNotAvailableException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.ImageNotAvailableException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class ImageNotAvailableException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class ImageNotAvailableException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class ImageNotAvailableException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class ImageNotAvailableException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

ImageNotAvailableException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

ImageNotAvailableException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ImageNotAvailableException Class

ImageNotAvailableException overview

Public Constructors

Public Constructor ImageNotAvailableException Constructor Overloaded. Generated base exception for an image not available.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ImageNotAvailableException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

ImageNotAvailableException Class | ImageNotAvailableException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ImageNotAvailableException Class : ImageNotAvailableException Constructor (ImageNotAvailableException)

Generated base exception for an image not available.

Overload List

Generated base exception for an image not available.

[Visual Basic] Public Sub New()

[C#] public ImageNotAvailableException();

[C++] public ImageNotAvailableException();

[C++/CLI] public ImageNotAvailableException();

Generated exception when an image is not available with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public ImageNotAvailableException(int);

[C++] public ImageNotAvailableException(int);

[C++/CLI] public ImageNotAvailableException(int);

Generated exception when an image is not available with a given message.

[Visual Basic] Public Sub New(String)

[C#] public ImageNotAvailableException(string);

[C++] public ImageNotAvailableException(string*);

[C++/CLI] public ImageNotAvailableException(String^);

Generated exception when an image is not available with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public ImageNotAvailableException(int,string);

[C++] public ImageNotAvailableException(int,string*);

[C++/CLI] public ImageNotAvailableException(int,String^);

Generated exception when an image is not available with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public ImageNotAvailableException(string,Exception);

[C++] public ImageNotAvailableException(string*,Exception*);

[C++/CLI] public ImageNotAvailableException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

ImageNotAvailableException Class | ImageNotAvailableException Members


%%PageItemTitle%%

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ImageNotAvailableException Class > ImageNotAvailableException Constructor : ImageNotAvailableException Constructor()

Generated base exception for an image not available.

[Visual Basic]
Public Function New()
[C#]
public ImageNotAvailableException();
[C++]
public: ImageNotAvailableException();
[C++/CLI]
public:
ImageNotAvailableException();

Requirements

Platforms: See Getting Started section

See Also

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List


%%PageItemTitle%%

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ImageNotAvailableException Class > ImageNotAvailableException Constructor : ImageNotAvailableException Constructor(Int32)

Generated exception when an image is not available with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public ImageNotAvailableException(
   int errorNumber
);
[C++]
public: ImageNotAvailableException(
   int errorNumber
)
[C++/CLI]
public:
ImageNotAvailableException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List


%%PageItemTitle%%

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ImageNotAvailableException Class > ImageNotAvailableException Constructor : ImageNotAvailableException Constructor(Int32,String)

Generated exception when an image is not available with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public ImageNotAvailableException(
   int errorNumber,
   string message
);
[C++]
public: ImageNotAvailableException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
ImageNotAvailableException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List


%%PageItemTitle%%

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents a message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ImageNotAvailableException Class > ImageNotAvailableException Constructor : ImageNotAvailableException Constructor(String)

Generated exception when an image is not available with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public ImageNotAvailableException(
   string message
);
[C++]
public: ImageNotAvailableException(
   string* message
)
[C++/CLI]
public:
ImageNotAvailableException(
   String^ message
)

Parameters

message
A string which represents a message.

Requirements

Platforms: See Getting Started section

See Also

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List


%%PageItemTitle%%

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ImageNotAvailableException Class > ImageNotAvailableException Constructor : ImageNotAvailableException Constructor(String,Exception)

Generated exception when an image is not available with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public ImageNotAvailableException(
   string message,
   Exception innerException
);
[C++]
public: ImageNotAvailableException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
ImageNotAvailableException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

ImageNotAvailableException Class | ImageNotAvailableException Members | Overload List


%%PageItemTitle%%

InsufficientHeightException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientHeightException Class

This exception is thrown if the Height value set by the user is smaller than the required height of the barcode.

For a list of all members of this type, see InsufficientHeightException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InsufficientHeightException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InsufficientHeightException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InsufficientHeightException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InsufficientHeightException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InsufficientHeightException sealed : public BarcodeException

Remarks

The required height is a value calculated from the sum of the total bar height, top and bottom border (VerticalWhiteSpace), and the height of value text, plus specified text gap (VerticalTextGap).

Note: If AutoSize is set to True, this error is not returned even if the above is True. Instead, the height is resized automatically to fit the barcode.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InsufficientHeightException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InsufficientHeightException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientHeightException Class

InsufficientHeightException overview

Public Constructors

Public Constructor InsufficientHeightException Constructor Overloaded. Generated base exception for an insufficient height.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InsufficientHeightException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InsufficientHeightException Class | InsufficientHeightException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientHeightException Class : InsufficientHeightException Constructor (InsufficientHeightException)

Generated base exception for an insufficient height.

Overload List

Generated base exception for an insufficient height.

[Visual Basic] Public Sub New()

[C#] public InsufficientHeightException();

[C++] public InsufficientHeightException();

[C++/CLI] public InsufficientHeightException();

Generated exception for an insufficient height with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InsufficientHeightException(int);

[C++] public InsufficientHeightException(int);

[C++/CLI] public InsufficientHeightException(int);

Generated exception for an insufficient height with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InsufficientHeightException(string);

[C++] public InsufficientHeightException(string*);

[C++/CLI] public InsufficientHeightException(String^);

Generated exception for an insufficient height with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InsufficientHeightException(int,string);

[C++] public InsufficientHeightException(int,string*);

[C++/CLI] public InsufficientHeightException(int,String^);

Generated exception for an insufficient height with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InsufficientHeightException(string,Exception);

[C++] public InsufficientHeightException(string*,Exception*);

[C++/CLI] public InsufficientHeightException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InsufficientHeightException Class | InsufficientHeightException Members


%%PageItemTitle%%

InsufficientHeightException Class | InsufficientHeightException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientHeightException Class > InsufficientHeightException Constructor : InsufficientHeightException Constructor()

Generated base exception for an insufficient height.

[Visual Basic]
Public Function New()
[C#]
public InsufficientHeightException();
[C++]
public: InsufficientHeightException();
[C++/CLI]
public:
InsufficientHeightException();

Requirements

Platforms: See Getting Started section

See Also

InsufficientHeightException Class | InsufficientHeightException Members | Overload List


%%PageItemTitle%%

InsufficientHeightException Class | InsufficientHeightException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientHeightException Class > InsufficientHeightException Constructor : InsufficientHeightException Constructor(Int32)

Generated exception for an insufficient height with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InsufficientHeightException(
   int errorNumber
);
[C++]
public: InsufficientHeightException(
   int errorNumber
)
[C++/CLI]
public:
InsufficientHeightException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InsufficientHeightException Class | InsufficientHeightException Members | Overload List


%%PageItemTitle%%

InsufficientHeightException Class | InsufficientHeightException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientHeightException Class > InsufficientHeightException Constructor : InsufficientHeightException Constructor(Int32,String)

Generated exception for an insufficient height with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InsufficientHeightException(
   int errorNumber,
   string message
);
[C++]
public: InsufficientHeightException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InsufficientHeightException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InsufficientHeightException Class | InsufficientHeightException Members | Overload List


%%PageItemTitle%%

InsufficientHeightException Class | InsufficientHeightException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientHeightException Class > InsufficientHeightException Constructor : InsufficientHeightException Constructor(String)

Generated exception for an insufficient height with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InsufficientHeightException(
   string message
);
[C++]
public: InsufficientHeightException(
   string* message
)
[C++/CLI]
public:
InsufficientHeightException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InsufficientHeightException Class | InsufficientHeightException Members | Overload List


%%PageItemTitle%%

InsufficientHeightException Class | InsufficientHeightException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientHeightException Class > InsufficientHeightException Constructor : InsufficientHeightException Constructor(String,Exception)

Generated exception for an insufficient height with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InsufficientHeightException(
   string message,
   Exception innerException
);
[C++]
public: InsufficientHeightException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InsufficientHeightException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InsufficientHeightException Class | InsufficientHeightException Members | Overload List


%%PageItemTitle%%

InsufficientWidthException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientWidthException Class

This exception is thrown if the barcode Width value set by the user is smaller than the required width of the barcode.

For a list of all members of this type, see InsufficientWidthException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InsufficientWidthException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InsufficientWidthException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InsufficientWidthException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InsufficientWidthException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InsufficientWidthException sealed : public BarcodeException

Remarks

The required width is a value calculated from the sum of the total bar width, left and right borders (HorizontalWhiteSpace), and the width of any outside text i.e. UPC symbols, plus specified text gap (HorizontalTextGap).

Note: If AutoSize is set to True, this error is not returned even is the above is True. Instead, the width is resized automatically to fit the barcode.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InsufficientWidthException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InsufficientWidthException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientWidthException Class

InsufficientWidthException overview

Public Constructors

Public Constructor InsufficientWidthException Constructor Overloaded. Generated base exception for an insufficient width.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InsufficientWidthException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InsufficientWidthException Class | InsufficientWidthException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientWidthException Class : InsufficientWidthException Constructor (InsufficientWidthException)

Generated base exception for an insufficient width.

Overload List

Generated base exception for an insufficient width.

[Visual Basic] Public Sub New()

[C#] public InsufficientWidthException();

[C++] public InsufficientWidthException();

[C++/CLI] public InsufficientWidthException();

Generated exception for an insufficient width with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InsufficientWidthException(int);

[C++] public InsufficientWidthException(int);

[C++/CLI] public InsufficientWidthException(int);

Generated exception for an insufficient width with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InsufficientWidthException(string);

[C++] public InsufficientWidthException(string*);

[C++/CLI] public InsufficientWidthException(String^);

Generated exception for an insufficient width with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InsufficientWidthException(int,string);

[C++] public InsufficientWidthException(int,string*);

[C++/CLI] public InsufficientWidthException(int,String^);

Generated exception for an insufficient width with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InsufficientWidthException(string,Exception);

[C++] public InsufficientWidthException(string*,Exception*);

[C++/CLI] public InsufficientWidthException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InsufficientWidthException Class | InsufficientWidthException Members


%%PageItemTitle%%

InsufficientWidthException Class | InsufficientWidthException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientWidthException Class > InsufficientWidthException Constructor : InsufficientWidthException Constructor()

Generated base exception for an insufficient width.

[Visual Basic]
Public Function New()
[C#]
public InsufficientWidthException();
[C++]
public: InsufficientWidthException();
[C++/CLI]
public:
InsufficientWidthException();

Requirements

Platforms: See Getting Started section

See Also

InsufficientWidthException Class | InsufficientWidthException Members | Overload List


%%PageItemTitle%%

InsufficientWidthException Class | InsufficientWidthException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientWidthException Class > InsufficientWidthException Constructor : InsufficientWidthException Constructor(Int32)

Generated exception for an insufficient width with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InsufficientWidthException(
   int errorNumber
);
[C++]
public: InsufficientWidthException(
   int errorNumber
)
[C++/CLI]
public:
InsufficientWidthException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InsufficientWidthException Class | InsufficientWidthException Members | Overload List


%%PageItemTitle%%

InsufficientWidthException Class | InsufficientWidthException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents a message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientWidthException Class > InsufficientWidthException Constructor : InsufficientWidthException Constructor(Int32,String)

Generated exception for an insufficient width with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InsufficientWidthException(
   int errorNumber,
   string message
);
[C++]
public: InsufficientWidthException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InsufficientWidthException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents a message.

Requirements

Platforms: See Getting Started section

See Also

InsufficientWidthException Class | InsufficientWidthException Members | Overload List


%%PageItemTitle%%

InsufficientWidthException Class | InsufficientWidthException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents a message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientWidthException Class > InsufficientWidthException Constructor : InsufficientWidthException Constructor(String)

Generated exception for an insufficient width with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InsufficientWidthException(
   string message
);
[C++]
public: InsufficientWidthException(
   string* message
)
[C++/CLI]
public:
InsufficientWidthException(
   String^ message
)

Parameters

message
A string which represents a message.

Requirements

Platforms: See Getting Started section

See Also

InsufficientWidthException Class | InsufficientWidthException Members | Overload List


%%PageItemTitle%%

InsufficientWidthException Class | InsufficientWidthException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents a message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InsufficientWidthException Class > InsufficientWidthException Constructor : InsufficientWidthException Constructor(String,Exception)

Generated exception for an insufficient width with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InsufficientWidthException(
   string message,
   Exception innerException
);
[C++]
public: InsufficientWidthException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InsufficientWidthException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents a message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InsufficientWidthException Class | InsufficientWidthException Members | Overload List


%%PageItemTitle%%

InternalErrorException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InternalErrorException Class

An exception object that this component will throw whenever an unhandled exception is encountered.

For a list of all members of this type, see InternalErrorException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InternalErrorException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InternalErrorException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InternalErrorException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InternalErrorException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InternalErrorException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InternalErrorException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InternalErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InternalErrorException Class

InternalErrorException overview

Public Constructors

Public Constructor InternalErrorException Constructor Overloaded. Generated base exception for an internal error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InternalErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InternalErrorException Class | InternalErrorException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InternalErrorException Class : InternalErrorException Constructor (InternalErrorException)

Generated base exception for an internal error.

Overload List

Generated base exception for an internal error.

[Visual Basic] Public Sub New()

[C#] public InternalErrorException();

[C++] public InternalErrorException();

[C++/CLI] public InternalErrorException();

Generated exception for an internal error with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InternalErrorException(int);

[C++] public InternalErrorException(int);

[C++/CLI] public InternalErrorException(int);

Generated exception for an internal error with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InternalErrorException(string);

[C++] public InternalErrorException(string*);

[C++/CLI] public InternalErrorException(String^);

Generated exception for an internal error with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InternalErrorException(int,string);

[C++] public InternalErrorException(int,string*);

[C++/CLI] public InternalErrorException(int,String^);

Generated exception for an internal error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InternalErrorException(string,Exception);

[C++] public InternalErrorException(string*,Exception*);

[C++/CLI] public InternalErrorException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InternalErrorException Class | InternalErrorException Members


%%PageItemTitle%%

InternalErrorException Class | InternalErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InternalErrorException Class > InternalErrorException Constructor : InternalErrorException Constructor()

Generated base exception for an internal error.

[Visual Basic]
Public Function New()
[C#]
public InternalErrorException();
[C++]
public: InternalErrorException();
[C++/CLI]
public:
InternalErrorException();

Requirements

Platforms: See Getting Started section

See Also

InternalErrorException Class | InternalErrorException Members | Overload List


%%PageItemTitle%%

InternalErrorException Class | InternalErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InternalErrorException Class > InternalErrorException Constructor : InternalErrorException Constructor(Int32)

Generated exception for an internal error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InternalErrorException(
   int errorNumber
);
[C++]
public: InternalErrorException(
   int errorNumber
)
[C++/CLI]
public:
InternalErrorException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InternalErrorException Class | InternalErrorException Members | Overload List


%%PageItemTitle%%

InternalErrorException Class | InternalErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InternalErrorException Class > InternalErrorException Constructor : InternalErrorException Constructor(Int32,String)

Generated exception for an internal error with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InternalErrorException(
   int errorNumber,
   string message
);
[C++]
public: InternalErrorException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InternalErrorException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InternalErrorException Class | InternalErrorException Members | Overload List


%%PageItemTitle%%

InternalErrorException Class | InternalErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InternalErrorException Class > InternalErrorException Constructor : InternalErrorException Constructor(String)

Generated exception for an internal error with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InternalErrorException(
   string message
);
[C++]
public: InternalErrorException(
   string* message
)
[C++/CLI]
public:
InternalErrorException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InternalErrorException Class | InternalErrorException Members | Overload List


%%PageItemTitle%%

InternalErrorException Class | InternalErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InternalErrorException Class > InternalErrorException Constructor : InternalErrorException Constructor(String,Exception)

Generated exception for an internal error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InternalErrorException(
   string message,
   Exception innerException
);
[C++]
public: InternalErrorException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InternalErrorException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InternalErrorException Class | InternalErrorException Members | Overload List


%%PageItemTitle%%

InvalidAreaException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidAreaException Class

An exception object that this component will throw whenever an invalid area is used in barcode recognition.

For a list of all members of this type, see InvalidAreaException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidAreaException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidAreaException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidAreaException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidAreaException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidAreaException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidAreaException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidAreaException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidAreaException Class

InvalidAreaException overview

Public Constructors

Public Constructor InvalidAreaException Constructor Overloaded. Generated base exception for an invalid area.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidAreaException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidAreaException Class | InvalidAreaException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidAreaException Class : InvalidAreaException Constructor (InvalidAreaException)

Generated base exception for an invalid area.

Overload List

Generated base exception for an invalid area.

[Visual Basic] Public Sub New()

[C#] public InvalidAreaException();

[C++] public InvalidAreaException();

[C++/CLI] public InvalidAreaException();

Generated exception for an invalid area with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidAreaException(int);

[C++] public InvalidAreaException(int);

[C++/CLI] public InvalidAreaException(int);

Generated exception for an invalid area with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidAreaException(string);

[C++] public InvalidAreaException(string*);

[C++/CLI] public InvalidAreaException(String^);

Generated exception for an invalid area with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidAreaException(int,string);

[C++] public InvalidAreaException(int,string*);

[C++/CLI] public InvalidAreaException(int,String^);

Generated exception for an invalid area with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidAreaException(string,Exception);

[C++] public InvalidAreaException(string*,Exception*);

[C++/CLI] public InvalidAreaException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidAreaException Class | InvalidAreaException Members


%%PageItemTitle%%

InvalidAreaException Class | InvalidAreaException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidAreaException Class > InvalidAreaException Constructor : InvalidAreaException Constructor()

Generated base exception for an invalid area.

[Visual Basic]
Public Function New()
[C#]
public InvalidAreaException();
[C++]
public: InvalidAreaException();
[C++/CLI]
public:
InvalidAreaException();

Requirements

Platforms: See Getting Started section

See Also

InvalidAreaException Class | InvalidAreaException Members | Overload List


%%PageItemTitle%%

InvalidAreaException Class | InvalidAreaException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidAreaException Class > InvalidAreaException Constructor : InvalidAreaException Constructor(Int32)

Generated exception for an invalid area with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidAreaException(
   int errorNumber
);
[C++]
public: InvalidAreaException(
   int errorNumber
)
[C++/CLI]
public:
InvalidAreaException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidAreaException Class | InvalidAreaException Members | Overload List


%%PageItemTitle%%

InvalidAreaException Class | InvalidAreaException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidAreaException Class > InvalidAreaException Constructor : InvalidAreaException Constructor(Int32,String)

Generated exception for an invalid area with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidAreaException(
   int errorNumber,
   string message
);
[C++]
public: InvalidAreaException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidAreaException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidAreaException Class | InvalidAreaException Members | Overload List


%%PageItemTitle%%

InvalidAreaException Class | InvalidAreaException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidAreaException Class > InvalidAreaException Constructor : InvalidAreaException Constructor(String)

Generated exception for an invalid area with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidAreaException(
   string message
);
[C++]
public: InvalidAreaException(
   string* message
)
[C++/CLI]
public:
InvalidAreaException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidAreaException Class | InvalidAreaException Members | Overload List


%%PageItemTitle%%

InvalidAreaException Class | InvalidAreaException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidAreaException Class > InvalidAreaException Constructor : InvalidAreaException Constructor(String,Exception)

Generated exception for an invalid area with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidAreaException(
   string message,
   Exception innerException
);
[C++]
public: InvalidAreaException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidAreaException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidAreaException Class | InvalidAreaException Members | Overload List


%%PageItemTitle%%

InvalidBarcodeValueException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBarcodeValueException Class

This exception is thrown if the BarcodeValue is NULL, or if the barcode value set is invalid for the current barcode type.

For a list of all members of this type, see InvalidBarcodeValueException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidBarcodeValueException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidBarcodeValueException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidBarcodeValueException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidBarcodeValueException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidBarcodeValueException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidBarcodeValueException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidBarcodeValueException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBarcodeValueException Class

InvalidBarcodeValueException overview

Public Constructors

Public Constructor InvalidBarcodeValueException Constructor Overloaded. Generated base exception for an invalid barcode value.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidBarcodeValueException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBarcodeValueException Class : InvalidBarcodeValueException Constructor (InvalidBarcodeValueException)

Generated base exception for an invalid barcode value.

Overload List

Generated base exception for an invalid barcode value.

[Visual Basic] Public Sub New()

[C#] public InvalidBarcodeValueException();

[C++] public InvalidBarcodeValueException();

[C++/CLI] public InvalidBarcodeValueException();

Generated exception for an invalid barcode value with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidBarcodeValueException(int);

[C++] public InvalidBarcodeValueException(int);

[C++/CLI] public InvalidBarcodeValueException(int);

Generated exception for an invalid barcode value with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidBarcodeValueException(string);

[C++] public InvalidBarcodeValueException(string*);

[C++/CLI] public InvalidBarcodeValueException(String^);

Generated exception for an invalid barcode value with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidBarcodeValueException(int,string);

[C++] public InvalidBarcodeValueException(int,string*);

[C++/CLI] public InvalidBarcodeValueException(int,String^);

Generated exception for an invalid barcode value with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidBarcodeValueException(string,Exception);

[C++] public InvalidBarcodeValueException(string*,Exception*);

[C++/CLI] public InvalidBarcodeValueException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members


%%PageItemTitle%%

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBarcodeValueException Class > InvalidBarcodeValueException Constructor : InvalidBarcodeValueException Constructor()

Generated base exception for an invalid barcode value.

[Visual Basic]
Public Function New()
[C#]
public InvalidBarcodeValueException();
[C++]
public: InvalidBarcodeValueException();
[C++/CLI]
public:
InvalidBarcodeValueException();

Requirements

Platforms: See Getting Started section

See Also

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List


%%PageItemTitle%%

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBarcodeValueException Class > InvalidBarcodeValueException Constructor : InvalidBarcodeValueException Constructor(Int32)

Generated exception for an invalid barcode value with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidBarcodeValueException(
   int errorNumber
);
[C++]
public: InvalidBarcodeValueException(
   int errorNumber
)
[C++/CLI]
public:
InvalidBarcodeValueException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List


%%PageItemTitle%%

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBarcodeValueException Class > InvalidBarcodeValueException Constructor : InvalidBarcodeValueException Constructor(Int32,String)

Generated exception for an invalid barcode value with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidBarcodeValueException(
   int errorNumber,
   string message
);
[C++]
public: InvalidBarcodeValueException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidBarcodeValueException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List


%%PageItemTitle%%

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBarcodeValueException Class > InvalidBarcodeValueException Constructor : InvalidBarcodeValueException Constructor(String)

Generated exception for an invalid barcode value with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidBarcodeValueException(
   string message
);
[C++]
public: InvalidBarcodeValueException(
   string* message
)
[C++/CLI]
public:
InvalidBarcodeValueException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List


%%PageItemTitle%%

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents a message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBarcodeValueException Class > InvalidBarcodeValueException Constructor : InvalidBarcodeValueException Constructor(String,Exception)

Generated exception for an invalid barcode value with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidBarcodeValueException(
   string message,
   Exception innerException
);
[C++]
public: InvalidBarcodeValueException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidBarcodeValueException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents a message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidBarcodeValueException Class | InvalidBarcodeValueException Members | Overload List


%%PageItemTitle%%

InvalidBitmapException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBitmapException Class

This exception is thrown if an invalid bitmap is detected.

For a list of all members of this type, see InvalidBitmapException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidBitmapException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidBitmapException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidBitmapException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidBitmapException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidBitmapException sealed : public BarcodeException

Remarks

If the bitmap passed in by the Analyze method has more than one place, or is not a one bit per pixel image, it can trigger this exception.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidBitmapException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBitmapException Class

InvalidBitmapException overview

Public Constructors

Public Constructor InvalidBitmapException Constructor Overloaded. Generated base exception from an invalid bitmap.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidBitmapException Class | InvalidBitmapException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBitmapException Class : InvalidBitmapException Constructor (InvalidBitmapException)

Generated base exception from an invalid bitmap.

Overload List

Generated base exception from an invalid bitmap.

[Visual Basic] Public Sub New()

[C#] public InvalidBitmapException();

[C++] public InvalidBitmapException();

[C++/CLI] public InvalidBitmapException();

Generated exception from an invalid bitmap with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidBitmapException(int);

[C++] public InvalidBitmapException(int);

[C++/CLI] public InvalidBitmapException(int);

Generated exception from an invalid bitmap with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidBitmapException(string);

[C++] public InvalidBitmapException(string*);

[C++/CLI] public InvalidBitmapException(String^);

Generated exception from an invalid bitmap with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidBitmapException(int,string);

[C++] public InvalidBitmapException(int,string*);

[C++/CLI] public InvalidBitmapException(int,String^);

Generated exception from an invalid bitmap with a given message and an inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidBitmapException(string,Exception);

[C++] public InvalidBitmapException(string*,Exception*);

[C++/CLI] public InvalidBitmapException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidBitmapException Class | InvalidBitmapException Members


%%PageItemTitle%%

InvalidBitmapException Class | InvalidBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBitmapException Class > InvalidBitmapException Constructor : InvalidBitmapException Constructor()

Generated base exception from an invalid bitmap.

[Visual Basic]
Public Function New()
[C#]
public InvalidBitmapException();
[C++]
public: InvalidBitmapException();
[C++/CLI]
public:
InvalidBitmapException();

Requirements

Platforms: See Getting Started section

See Also

InvalidBitmapException Class | InvalidBitmapException Members | Overload List


%%PageItemTitle%%

InvalidBitmapException Class | InvalidBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBitmapException Class > InvalidBitmapException Constructor : InvalidBitmapException Constructor(Int32)

Generated exception from an invalid bitmap with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidBitmapException(
   int errorNumber
);
[C++]
public: InvalidBitmapException(
   int errorNumber
)
[C++/CLI]
public:
InvalidBitmapException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidBitmapException Class | InvalidBitmapException Members | Overload List


%%PageItemTitle%%

InvalidBitmapException Class | InvalidBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBitmapException Class > InvalidBitmapException Constructor : InvalidBitmapException Constructor(Int32,String)

Generated exception from an invalid bitmap with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidBitmapException(
   int errorNumber,
   string message
);
[C++]
public: InvalidBitmapException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidBitmapException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidBitmapException Class | InvalidBitmapException Members | Overload List


%%PageItemTitle%%

InvalidBitmapException Class | InvalidBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represent the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBitmapException Class > InvalidBitmapException Constructor : InvalidBitmapException Constructor(String)

Generated exception from an invalid bitmap with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidBitmapException(
   string message
);
[C++]
public: InvalidBitmapException(
   string* message
)
[C++/CLI]
public:
InvalidBitmapException(
   String^ message
)

Parameters

message
A string which represent the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidBitmapException Class | InvalidBitmapException Members | Overload List


%%PageItemTitle%%

InvalidBitmapException Class | InvalidBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidBitmapException Class > InvalidBitmapException Constructor : InvalidBitmapException Constructor(String,Exception)

Generated exception from an invalid bitmap with a given message and an inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidBitmapException(
   string message,
   Exception innerException
);
[C++]
public: InvalidBitmapException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidBitmapException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidBitmapException Class | InvalidBitmapException Members | Overload List


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidErrorCorrectionLevelException Class

This exception is thrown if the error correction level is not in the valid range for the 2D barcode type.

For a list of all members of this type, see InvalidErrorCorrectionLevelException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidErrorCorrectionLevelException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidErrorCorrectionLevelException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidErrorCorrectionLevelException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidErrorCorrectionLevelException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidErrorCorrectionLevelException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidErrorCorrectionLevelException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidErrorCorrectionLevelException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidErrorCorrectionLevelException Class

InvalidErrorCorrectionLevelException overview

Public Constructors

Public Constructor InvalidErrorCorrectionLevelException Constructor Overloaded. Generated base exception for an invalid error correction level.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidErrorCorrectionLevelException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidErrorCorrectionLevelException Class : InvalidErrorCorrectionLevelException Constructor (InvalidErrorCorrectionLevelException)

Generated base exception for an invalid error correction level.

Overload List

Generated base exception for an invalid error correction level.

[Visual Basic] Public Sub New()

[C#] public InvalidErrorCorrectionLevelException();

[C++] public InvalidErrorCorrectionLevelException();

[C++/CLI] public InvalidErrorCorrectionLevelException();

Generated exception for an invalid error correction level with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidErrorCorrectionLevelException(int);

[C++] public InvalidErrorCorrectionLevelException(int);

[C++/CLI] public InvalidErrorCorrectionLevelException(int);

Generated exception for an invalid error correction level with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidErrorCorrectionLevelException(string);

[C++] public InvalidErrorCorrectionLevelException(string*);

[C++/CLI] public InvalidErrorCorrectionLevelException(String^);

Generated exception for an invalid error correction level with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidErrorCorrectionLevelException(int,string);

[C++] public InvalidErrorCorrectionLevelException(int,string*);

[C++/CLI] public InvalidErrorCorrectionLevelException(int,String^);

Generated exception for an invalid error correction level with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidErrorCorrectionLevelException(string,Exception);

[C++] public InvalidErrorCorrectionLevelException(string*,Exception*);

[C++/CLI] public InvalidErrorCorrectionLevelException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidErrorCorrectionLevelException Class > InvalidErrorCorrectionLevelException Constructor : InvalidErrorCorrectionLevelException Constructor()

Generated base exception for an invalid error correction level.

[Visual Basic]
Public Function New()
[C#]
public InvalidErrorCorrectionLevelException();
[C++]
public: InvalidErrorCorrectionLevelException();
[C++/CLI]
public:
InvalidErrorCorrectionLevelException();

Requirements

Platforms: See Getting Started section

See Also

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidErrorCorrectionLevelException Class > InvalidErrorCorrectionLevelException Constructor : InvalidErrorCorrectionLevelException Constructor(Int32)

Generated exception for an invalid error correction level with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidErrorCorrectionLevelException(
   int errorNumber
);
[C++]
public: InvalidErrorCorrectionLevelException(
   int errorNumber
)
[C++/CLI]
public:
InvalidErrorCorrectionLevelException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidErrorCorrectionLevelException Class > InvalidErrorCorrectionLevelException Constructor : InvalidErrorCorrectionLevelException Constructor(Int32,String)

Generated exception for an invalid error correction level with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidErrorCorrectionLevelException(
   int errorNumber,
   string message
);
[C++]
public: InvalidErrorCorrectionLevelException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidErrorCorrectionLevelException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidErrorCorrectionLevelException Class > InvalidErrorCorrectionLevelException Constructor : InvalidErrorCorrectionLevelException Constructor(String)

Generated exception for an invalid error correction level with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidErrorCorrectionLevelException(
   string message
);
[C++]
public: InvalidErrorCorrectionLevelException(
   string* message
)
[C++/CLI]
public:
InvalidErrorCorrectionLevelException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List


%%PageItemTitle%%

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidErrorCorrectionLevelException Class > InvalidErrorCorrectionLevelException Constructor : InvalidErrorCorrectionLevelException Constructor(String,Exception)

Generated exception for an invalid error correction level with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidErrorCorrectionLevelException(
   string message,
   Exception innerException
);
[C++]
public: InvalidErrorCorrectionLevelException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidErrorCorrectionLevelException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidErrorCorrectionLevelException Class | InvalidErrorCorrectionLevelException Members | Overload List


%%PageItemTitle%%

InvalidIndexException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidIndexException Class

This exception is thrown if a request for results is outside the valid range.

For a list of all members of this type, see InvalidIndexException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidIndexException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidIndexException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidIndexException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidIndexException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidIndexException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidIndexException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidIndexException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidIndexException Class

InvalidIndexException overview

Public Constructors

Public Constructor InvalidIndexException Constructor Overloaded. Generated base exception from an invalid index.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidIndexException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidIndexException Class | InvalidIndexException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidIndexException Class : InvalidIndexException Constructor (InvalidIndexException)

Generated base exception from an invalid index.

Overload List

Generated base exception from an invalid index.

[Visual Basic] Public Sub New()

[C#] public InvalidIndexException();

[C++] public InvalidIndexException();

[C++/CLI] public InvalidIndexException();

Generated exception from an invalid index with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidIndexException(int);

[C++] public InvalidIndexException(int);

[C++/CLI] public InvalidIndexException(int);

Generated exception from an invalid index with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidIndexException(string);

[C++] public InvalidIndexException(string*);

[C++/CLI] public InvalidIndexException(String^);

Generated exception from an invalid index with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidIndexException(int,string);

[C++] public InvalidIndexException(int,string*);

[C++/CLI] public InvalidIndexException(int,String^);

Generated exception from an invalid index with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidIndexException(string,Exception);

[C++] public InvalidIndexException(string*,Exception*);

[C++/CLI] public InvalidIndexException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidIndexException Class | InvalidIndexException Members


%%PageItemTitle%%

InvalidIndexException Class | InvalidIndexException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidIndexException Class > InvalidIndexException Constructor : InvalidIndexException Constructor()

Generated base exception from an invalid index.

[Visual Basic]
Public Function New()
[C#]
public InvalidIndexException();
[C++]
public: InvalidIndexException();
[C++/CLI]
public:
InvalidIndexException();

Requirements

Platforms: See Getting Started section

See Also

InvalidIndexException Class | InvalidIndexException Members | Overload List


%%PageItemTitle%%

InvalidIndexException Class | InvalidIndexException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidIndexException Class > InvalidIndexException Constructor : InvalidIndexException Constructor(Int32)

Generated exception from an invalid index with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidIndexException(
   int errorNumber
);
[C++]
public: InvalidIndexException(
   int errorNumber
)
[C++/CLI]
public:
InvalidIndexException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidIndexException Class | InvalidIndexException Members | Overload List


%%PageItemTitle%%

InvalidIndexException Class | InvalidIndexException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents a message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidIndexException Class > InvalidIndexException Constructor : InvalidIndexException Constructor(Int32,String)

Generated exception from an invalid index with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidIndexException(
   int errorNumber,
   string message
);
[C++]
public: InvalidIndexException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidIndexException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents a message.

Requirements

Platforms: See Getting Started section

See Also

InvalidIndexException Class | InvalidIndexException Members | Overload List


%%PageItemTitle%%

InvalidIndexException Class | InvalidIndexException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidIndexException Class > InvalidIndexException Constructor : InvalidIndexException Constructor(String)

Generated exception from an invalid index with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidIndexException(
   string message
);
[C++]
public: InvalidIndexException(
   string* message
)
[C++/CLI]
public:
InvalidIndexException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidIndexException Class | InvalidIndexException Members | Overload List


%%PageItemTitle%%

InvalidIndexException Class | InvalidIndexException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents a message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidIndexException Class > InvalidIndexException Constructor : InvalidIndexException Constructor(String,Exception)

Generated exception from an invalid index with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidIndexException(
   string message,
   Exception innerException
);
[C++]
public: InvalidIndexException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidIndexException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents a message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidIndexException Class | InvalidIndexException Members | Overload List


%%PageItemTitle%%

InvalidLicenseException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidLicenseException Class

This exception is thrown if an invalid license is detected.

For a list of all members of this type, see InvalidLicenseException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidLicenseException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidLicenseException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidLicenseException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidLicenseException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidLicenseException sealed : public BarcodeException

Remarks

The following is a list of possible actions that can trigger this exception:

  • Analyze is called without a proper license. PDF417 and DataMatrix requires a LicenseEdition.
  • Create is called without a proper license.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidLicenseException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidLicenseException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidLicenseException Class

InvalidLicenseException overview

Public Constructors

Public Constructor InvalidLicenseException Constructor Overloaded. Generates the base exception for an invalid license.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidLicenseException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidLicenseException Class | InvalidLicenseException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidLicenseException Class : InvalidLicenseException Constructor (InvalidLicenseException)

Generates the base exception for an invalid license.

Overload List

Generates the base exception for an invalid license.

[Visual Basic] Public Sub New()

[C#] public InvalidLicenseException();

[C++] public InvalidLicenseException();

[C++/CLI] public InvalidLicenseException();

Generated exception for an invalid license with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidLicenseException(int);

[C++] public InvalidLicenseException(int);

[C++/CLI] public InvalidLicenseException(int);

Generated exception for an invalid license with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidLicenseException(string);

[C++] public InvalidLicenseException(string*);

[C++/CLI] public InvalidLicenseException(String^);

Generated exception for an invalid license with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidLicenseException(int,string);

[C++] public InvalidLicenseException(int,string*);

[C++/CLI] public InvalidLicenseException(int,String^);

Generated exception for an invalid license with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidLicenseException(string,Exception);

[C++] public InvalidLicenseException(string*,Exception*);

[C++/CLI] public InvalidLicenseException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidLicenseException Class | InvalidLicenseException Members


%%PageItemTitle%%

InvalidLicenseException Class | InvalidLicenseException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidLicenseException Class > InvalidLicenseException Constructor : InvalidLicenseException Constructor()

Generates the base exception for an invalid license.

[Visual Basic]
Public Function New()
[C#]
public InvalidLicenseException();
[C++]
public: InvalidLicenseException();
[C++/CLI]
public:
InvalidLicenseException();

Requirements

Platforms: See Getting Started section

See Also

InvalidLicenseException Class | InvalidLicenseException Members | Overload List


%%PageItemTitle%%

InvalidLicenseException Class | InvalidLicenseException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidLicenseException Class > InvalidLicenseException Constructor : InvalidLicenseException Constructor(Int32)

Generated exception for an invalid license with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidLicenseException(
   int errorNumber
);
[C++]
public: InvalidLicenseException(
   int errorNumber
)
[C++/CLI]
public:
InvalidLicenseException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidLicenseException Class | InvalidLicenseException Members | Overload List


%%PageItemTitle%%

InvalidLicenseException Class | InvalidLicenseException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidLicenseException Class > InvalidLicenseException Constructor : InvalidLicenseException Constructor(Int32,String)

Generated exception for an invalid license with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidLicenseException(
   int errorNumber,
   string message
);
[C++]
public: InvalidLicenseException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidLicenseException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidLicenseException Class | InvalidLicenseException Members | Overload List


%%PageItemTitle%%

InvalidLicenseException Class | InvalidLicenseException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidLicenseException Class > InvalidLicenseException Constructor : InvalidLicenseException Constructor(String)

Generated exception for an invalid license with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidLicenseException(
   string message
);
[C++]
public: InvalidLicenseException(
   string* message
)
[C++/CLI]
public:
InvalidLicenseException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidLicenseException Class | InvalidLicenseException Members | Overload List


%%PageItemTitle%%

InvalidLicenseException Class | InvalidLicenseException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidLicenseException Class > InvalidLicenseException Constructor : InvalidLicenseException Constructor(String,Exception)

Generated exception for an invalid license with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidLicenseException(
   string message,
   Exception innerException
);
[C++]
public: InvalidLicenseException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidLicenseException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidLicenseException Class | InvalidLicenseException Members | Overload List


%%PageItemTitle%%

InvalidParameterException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidParameterException Class

This exception is thrown if a parameter is invalid.

For a list of all members of this type, see InvalidParameterException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.InvalidParameterException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class InvalidParameterException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class InvalidParameterException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class InvalidParameterException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class InvalidParameterException sealed : public BarcodeException

Remarks

The following is a list of possible actions that can trigger this exception:

  • Orientation is set to an invalid OrientationInfo Enumeration.
  • InkColor is set to an invalid InkColorInfo Enumeration.
  • BarcodeTypes is set to an invalid BarcodeType Enumeration.
  • Area is set to a range outside the bounds of the image provided.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

InvalidParameterException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

InvalidParameterException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidParameterException Class

InvalidParameterException overview

Public Constructors

Public Constructor InvalidParameterException Constructor Overloaded. Generated base exception from an invalid parameter.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidParameterException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

InvalidParameterException Class | InvalidParameterException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidParameterException Class : InvalidParameterException Constructor (InvalidParameterException)

Generated base exception from an invalid parameter.

Overload List

Generated base exception from an invalid parameter.

[Visual Basic] Public Sub New()

[C#] public InvalidParameterException();

[C++] public InvalidParameterException();

[C++/CLI] public InvalidParameterException();

Generated exception from an invalid parameter with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public InvalidParameterException(int);

[C++] public InvalidParameterException(int);

[C++/CLI] public InvalidParameterException(int);

Generated exception from an invalid parameter with a given message.

[Visual Basic] Public Sub New(String)

[C#] public InvalidParameterException(string);

[C++] public InvalidParameterException(string*);

[C++/CLI] public InvalidParameterException(String^);

Generated exception from an invalid parameter with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public InvalidParameterException(int,string);

[C++] public InvalidParameterException(int,string*);

[C++/CLI] public InvalidParameterException(int,String^);

Generated exception from an invalid parameter with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public InvalidParameterException(string,Exception);

[C++] public InvalidParameterException(string*,Exception*);

[C++/CLI] public InvalidParameterException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

InvalidParameterException Class | InvalidParameterException Members


%%PageItemTitle%%

InvalidParameterException Class | InvalidParameterException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidParameterException Class > InvalidParameterException Constructor : InvalidParameterException Constructor()

Generated base exception from an invalid parameter.

[Visual Basic]
Public Function New()
[C#]
public InvalidParameterException();
[C++]
public: InvalidParameterException();
[C++/CLI]
public:
InvalidParameterException();

Requirements

Platforms: See Getting Started section

See Also

InvalidParameterException Class | InvalidParameterException Members | Overload List


%%PageItemTitle%%

InvalidParameterException Class | InvalidParameterException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidParameterException Class > InvalidParameterException Constructor : InvalidParameterException Constructor(Int32)

Generated exception from an invalid parameter with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public InvalidParameterException(
   int errorNumber
);
[C++]
public: InvalidParameterException(
   int errorNumber
)
[C++/CLI]
public:
InvalidParameterException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

InvalidParameterException Class | InvalidParameterException Members | Overload List


%%PageItemTitle%%

InvalidParameterException Class | InvalidParameterException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidParameterException Class > InvalidParameterException Constructor : InvalidParameterException Constructor(Int32,String)

Generated exception from an invalid parameter with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public InvalidParameterException(
   int errorNumber,
   string message
);
[C++]
public: InvalidParameterException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
InvalidParameterException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidParameterException Class | InvalidParameterException Members | Overload List


%%PageItemTitle%%

InvalidParameterException Class | InvalidParameterException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidParameterException Class > InvalidParameterException Constructor : InvalidParameterException Constructor(String)

Generated exception from an invalid parameter with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public InvalidParameterException(
   string message
);
[C++]
public: InvalidParameterException(
   string* message
)
[C++/CLI]
public:
InvalidParameterException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

InvalidParameterException Class | InvalidParameterException Members | Overload List


%%PageItemTitle%%

InvalidParameterException Class | InvalidParameterException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > InvalidParameterException Class > InvalidParameterException Constructor : InvalidParameterException Constructor(String,Exception)

Generated exception from an invalid parameter with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public InvalidParameterException(
   string message,
   Exception innerException
);
[C++]
public: InvalidParameterException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
InvalidParameterException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

InvalidParameterException Class | InvalidParameterException Members | Overload List


%%PageItemTitle%%

LargeDataSizeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : LargeDataSizeException Class

This exception is thrown if the barcode data will not fit in the current symbol's rows and columns.

For a list of all members of this type, see LargeDataSizeException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.LargeDataSizeException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class LargeDataSizeException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class LargeDataSizeException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class LargeDataSizeException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class LargeDataSizeException sealed : public BarcodeException

Remarks

To avoid this exception, either decrease the amount of data in the barcode or increase the barcodes symbol rows and columns.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

LargeDataSizeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

LargeDataSizeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : LargeDataSizeException Class

LargeDataSizeException overview

Public Constructors

Public Constructor LargeDataSizeException Constructor Overloaded. Generated base exception for a large data size error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

LargeDataSizeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

LargeDataSizeException Class | LargeDataSizeException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > LargeDataSizeException Class : LargeDataSizeException Constructor (LargeDataSizeException)

Generated base exception for a large data size error.

Overload List

Generated base exception for a large data size error.

[Visual Basic] Public Sub New()

[C#] public LargeDataSizeException();

[C++] public LargeDataSizeException();

[C++/CLI] public LargeDataSizeException();

Generated exception for a large data size error with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public LargeDataSizeException(int);

[C++] public LargeDataSizeException(int);

[C++/CLI] public LargeDataSizeException(int);

Generated exception for a large data size error with a given message.

[Visual Basic] Public Sub New(String)

[C#] public LargeDataSizeException(string);

[C++] public LargeDataSizeException(string*);

[C++/CLI] public LargeDataSizeException(String^);

Generated exception for a large data size error with a given error number.

[Visual Basic] Public Sub New(Integer,String)

[C#] public LargeDataSizeException(int,string);

[C++] public LargeDataSizeException(int,string*);

[C++/CLI] public LargeDataSizeException(int,String^);

Generated exception for a large data size error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public LargeDataSizeException(string,Exception);

[C++] public LargeDataSizeException(string*,Exception*);

[C++/CLI] public LargeDataSizeException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

LargeDataSizeException Class | LargeDataSizeException Members


%%PageItemTitle%%

LargeDataSizeException Class | LargeDataSizeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > LargeDataSizeException Class > LargeDataSizeException Constructor : LargeDataSizeException Constructor()

Generated base exception for a large data size error.

[Visual Basic]
Public Function New()
[C#]
public LargeDataSizeException();
[C++]
public: LargeDataSizeException();
[C++/CLI]
public:
LargeDataSizeException();

Requirements

Platforms: See Getting Started section

See Also

LargeDataSizeException Class | LargeDataSizeException Members | Overload List


%%PageItemTitle%%

LargeDataSizeException Class | LargeDataSizeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > LargeDataSizeException Class > LargeDataSizeException Constructor : LargeDataSizeException Constructor(Int32)

Generated exception for a large data size error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public LargeDataSizeException(
   int errorNumber
);
[C++]
public: LargeDataSizeException(
   int errorNumber
)
[C++/CLI]
public:
LargeDataSizeException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

LargeDataSizeException Class | LargeDataSizeException Members | Overload List


%%PageItemTitle%%

LargeDataSizeException Class | LargeDataSizeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > LargeDataSizeException Class > LargeDataSizeException Constructor : LargeDataSizeException Constructor(Int32,String)

Generated exception for a large data size error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public LargeDataSizeException(
   int errorNumber,
   string message
);
[C++]
public: LargeDataSizeException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
LargeDataSizeException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

LargeDataSizeException Class | LargeDataSizeException Members | Overload List


%%PageItemTitle%%

LargeDataSizeException Class | LargeDataSizeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > LargeDataSizeException Class > LargeDataSizeException Constructor : LargeDataSizeException Constructor(String)

Generated exception for a large data size error with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public LargeDataSizeException(
   string message
);
[C++]
public: LargeDataSizeException(
   string* message
)
[C++/CLI]
public:
LargeDataSizeException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

LargeDataSizeException Class | LargeDataSizeException Members | Overload List


%%PageItemTitle%%

LargeDataSizeException Class | LargeDataSizeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > LargeDataSizeException Class > LargeDataSizeException Constructor : LargeDataSizeException Constructor(String,Exception)

Generated exception for a large data size error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public LargeDataSizeException(
   string message,
   Exception innerException
);
[C++]
public: LargeDataSizeException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
LargeDataSizeException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

LargeDataSizeException Class | LargeDataSizeException Members | Overload List


%%PageItemTitle%%

Licensing Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Licensing Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Licensing Class (PegasusImaging.WinForms.BarcodeXpress5)

Provides methods for setting the license information for the component.

For a list of all members of this type, see Licensing members.

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.Licensing

Syntax

[Visual Basic]
Public Class Licensing
[C#]
public class Licensing
[C++]
public __gc class Licensing
[C++/CLI]
public ref class Licensing

Remarks

This object exposes the licensing methods you need to call to license the component.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

Licensing Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

Licensing Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Licensing Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Licensing Class (PegasusImaging.WinForms.BarcodeXpress5)

Licensing overview

Public Constructors

Public Constructor Licensing Constructor The constructor for the Licensing class.

Public Properties

Public Property EvaluationMode | Indicates the way in which this component is limited in evaluation mode.
Public Property LicenseEdition | Indicates the License Edition for the component.

Public Methods

Public Method UnlockRuntime | Unlocks the component for use in runtime environments.
Public Method UnlockWeb | Unlocks the component for use in web servers.

See Also

Licensing Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Licensing Class | Licensing Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

instanceId
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Licensing Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Licensing Class : Licensing Constructor (Licensing)

The constructor for the Licensing class.

[Visual Basic]
Public Function New( _
   ByVal instanceId As IntPtr _
)
[C#]
public Licensing(
   IntPtr instanceId
);
[C++]
public: Licensing(
   IntPtr instanceId
)
[C++/CLI]
public:
Licensing(
   IntPtr instanceId
)

Parameters

instanceId

Requirements

Platforms: See Getting Started section

See Also

Licensing Class | Licensing Members


%%PageItemTitle%%

Licensing Class | Licensing Members | UnlockWeb Method

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

code1

One of the unlock codes.

code2

One of the unlock codes.

code3

One of the unlock codes.

code4

One of the unlock codes.

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnlockRuntime Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Licensing Class : UnlockRuntime Method

Unlocks the component for use in runtime environments.

[Visual Basic]
Public Sub UnlockRuntime( _
   ByVal code1 As Integer, _
   ByVal code2 As Integer, _
   ByVal code3 As Integer, _
   ByVal code4 As Integer _
)
[C#]
public void UnlockRuntime(
   int code1,
   int code2,
   int code3,
   int code4
);
[C++]
public: void UnlockRuntime(
   int code1,
   int code2,
   int code3,
   int code4
)
[C++/CLI]
public:
void UnlockRuntime(
   int code1,
   int code2,
   int code3,
   int code4
)

Parameters

code1

One of the unlock codes.

code2

One of the unlock codes.

code3

One of the unlock codes.

code4

One of the unlock codes.

Remarks

You must call this method before your application uses this component. It unlocks the component for your use, according to the license that you have purchased. If you do not call this function, your application will only work on a machine with the component development environment installed on it.

If you lose your unlock codes, you can retrieve them on our website: http://www.pegasusimaging.com/lostcodes.htm

Requirements

Platforms: See Getting Started section

See Also

Licensing Class | Licensing Members | UnlockWeb Method


%%PageItemTitle%%

Licensing Class | Licensing Members | UnlockRuntime Method

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

code
The unlock web string.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnlockWeb Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Licensing Class : UnlockWeb Method

Unlocks the component for use in web servers.

[Visual Basic]
Public Sub UnlockWeb( _
   ByVal code As String _
)
[C#]
public void UnlockWeb(
   string code
);
[C++]
public: void UnlockWeb(
   string* code
)
[C++/CLI]
public:
void UnlockWeb(
   String^ code
)

Parameters

code
The unlock web string.

Remarks

You must call this method before your application uses this component. It unlocks the component for your use, according to the license that you have purchased. If you do not call this function, your application will only work on a machine with the component development environment installed on it.

If you lose your unlock string, you can retrieve it on our website: http://www.pegasusimaging.com/lostcodes.htm

Requirements

Platforms: See Getting Started section

See Also

Licensing Class | Licensing Members | UnlockRuntime Method


%%PageItemTitle%% $$Properties$$

Licensing Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Licensing Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Licensing Class (PegasusImaging.WinForms.BarcodeXpress5)

For a list of all members of this type, see Licensing members.

Public Properties

Public Property EvaluationMode | Indicates the way in which this component is limited in evaluation mode.
Public Property LicenseEdition | Indicates the License Edition for the component.

See Also

Licensing Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Licensing Class | Licensing Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

EvaluationMode Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Licensing Class : EvaluationMode Property

Indicates the way in which this component is limited in evaluation mode.

[Visual Basic]
Public Property EvaluationMode As EvaluationChoice
[C#]
public EvaluationChoice EvaluationMode {get; set;}
[C++]
public: __property EvaluationChoice get_EvaluationMode();
public: __property void set_EvaluationMode(
   EvaluationChoice value
);
[C++/CLI]
public:
property EvaluationChoice EvaluationMode {
   EvaluationChoice get();
   void set (EvaluationChoice value);
}

Requirements

Platforms: See Getting Started section

See Also

Licensing Class | Licensing Members


%%PageItemTitle%%

Licensing Class | Licensing Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LicenseEdition Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Licensing Class : LicenseEdition Property

Indicates the License Edition for the component.

[Visual Basic]
Public Property LicenseEdition As LicenseChoice
[C#]
public LicenseChoice LicenseEdition {get; set;}
[C++]
public: __property LicenseChoice get_LicenseEdition();
public: __property void set_LicenseEdition(
   LicenseChoice value
);
[C++/CLI]
public:
property LicenseChoice LicenseEdition {
   LicenseChoice get();
   void set (LicenseChoice value);
}

Requirements

Platforms: See Getting Started section

See Also

Licensing Class | Licensing Members


%%PageItemTitle%%

OutOfMemoryException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : OutOfMemoryException Class

This exception is thrown if the creation of the bitmap to draw the barcode fails.

For a list of all members of this type, see OutOfMemoryException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.OutOfMemoryException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class OutOfMemoryException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class OutOfMemoryException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class OutOfMemoryException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class OutOfMemoryException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

OutOfMemoryException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

OutOfMemoryException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : OutOfMemoryException Class

OutOfMemoryException overview

Public Constructors

Public Constructor OutOfMemoryException Constructor Overloaded. An exception generated for an out of memory error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

OutOfMemoryException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

OutOfMemoryException Class | OutOfMemoryException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > OutOfMemoryException Class : OutOfMemoryException Constructor (OutOfMemoryException)

An exception generated for an out of memory error.

Overload List

An exception generated for an out of memory error.

[Visual Basic] Public Sub New()

[C#] public OutOfMemoryException();

[C++] public OutOfMemoryException();

[C++/CLI] public OutOfMemoryException();

Generated exception for an out of memory error with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public OutOfMemoryException(int);

[C++] public OutOfMemoryException(int);

[C++/CLI] public OutOfMemoryException(int);

Generated exception for an out of memory error with a given string.

[Visual Basic] Public Sub New(String)

[C#] public OutOfMemoryException(string);

[C++] public OutOfMemoryException(string*);

[C++/CLI] public OutOfMemoryException(String^);

Generated exception for an out of memory error with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public OutOfMemoryException(int,string);

[C++] public OutOfMemoryException(int,string*);

[C++/CLI] public OutOfMemoryException(int,String^);

Generated exception for an out of memory error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public OutOfMemoryException(string,Exception);

[C++] public OutOfMemoryException(string*,Exception*);

[C++/CLI] public OutOfMemoryException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

OutOfMemoryException Class | OutOfMemoryException Members


%%PageItemTitle%%

OutOfMemoryException Class | OutOfMemoryException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > OutOfMemoryException Class > OutOfMemoryException Constructor : OutOfMemoryException Constructor()

An exception generated for an out of memory error.

[Visual Basic]
Public Function New()
[C#]
public OutOfMemoryException();
[C++]
public: OutOfMemoryException();
[C++/CLI]
public:
OutOfMemoryException();

Requirements

Platforms: See Getting Started section

See Also

OutOfMemoryException Class | OutOfMemoryException Members | Overload List


%%PageItemTitle%%

OutOfMemoryException Class | OutOfMemoryException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > OutOfMemoryException Class > OutOfMemoryException Constructor : OutOfMemoryException Constructor(Int32)

Generated exception for an out of memory error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public OutOfMemoryException(
   int errorNumber
);
[C++]
public: OutOfMemoryException(
   int errorNumber
)
[C++/CLI]
public:
OutOfMemoryException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

OutOfMemoryException Class | OutOfMemoryException Members | Overload List


%%PageItemTitle%%

OutOfMemoryException Class | OutOfMemoryException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > OutOfMemoryException Class > OutOfMemoryException Constructor : OutOfMemoryException Constructor(Int32,String)

Generated exception for an out of memory error with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public OutOfMemoryException(
   int errorNumber,
   string message
);
[C++]
public: OutOfMemoryException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
OutOfMemoryException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

OutOfMemoryException Class | OutOfMemoryException Members | Overload List


%%PageItemTitle%%

OutOfMemoryException Class | OutOfMemoryException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the error message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > OutOfMemoryException Class > OutOfMemoryException Constructor : OutOfMemoryException Constructor(String)

Generated exception for an out of memory error with a given string.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public OutOfMemoryException(
   string message
);
[C++]
public: OutOfMemoryException(
   string* message
)
[C++/CLI]
public:
OutOfMemoryException(
   String^ message
)

Parameters

message
A string which represents the error message.

Requirements

Platforms: See Getting Started section

See Also

OutOfMemoryException Class | OutOfMemoryException Members | Overload List


%%PageItemTitle%%

OutOfMemoryException Class | OutOfMemoryException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base contructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > OutOfMemoryException Class > OutOfMemoryException Constructor : OutOfMemoryException Constructor(String,Exception)

Generated exception for an out of memory error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public OutOfMemoryException(
   string message,
   Exception innerException
);
[C++]
public: OutOfMemoryException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
OutOfMemoryException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base contructor.

Requirements

Platforms: See Getting Started section

See Also

OutOfMemoryException Class | OutOfMemoryException Members | Overload List


%%PageItemTitle%%

ParameterOutOfRangeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ParameterOutOfRangeException Class

This exception is thrown if a parameter is out of range.

For a list of all members of this type, see ParameterOutOfRangeException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.ParameterOutOfRangeException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class ParameterOutOfRangeException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class ParameterOutOfRangeException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class ParameterOutOfRangeException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class ParameterOutOfRangeException sealed : public BarcodeException

Remarks

The following is a list of possible actions that can trigger this exception:

  • CheckSum is set to a value other than 0 or 1.
  • TextNotchPercent is set to a value less than 0 or greater than 50.
  • MaximumBarcodes is set to a value less than 1.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

ParameterOutOfRangeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

ParameterOutOfRangeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ParameterOutOfRangeException Class

ParameterOutOfRangeException overview

Public Constructors

Public Constructor ParameterOutOfRangeException Constructor Overloaded. Generated base exception for a parameter out of range.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ParameterOutOfRangeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ParameterOutOfRangeException Class : ParameterOutOfRangeException Constructor (ParameterOutOfRangeException)

Generated base exception for a parameter out of range.

Overload List

Generated base exception for a parameter out of range.

[Visual Basic] Public Sub New()

[C#] public ParameterOutOfRangeException();

[C++] public ParameterOutOfRangeException();

[C++/CLI] public ParameterOutOfRangeException();

Generated exception for a parameter out of range with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public ParameterOutOfRangeException(int);

[C++] public ParameterOutOfRangeException(int);

[C++/CLI] public ParameterOutOfRangeException(int);

Generated exception for a parameter out of range with a given message.

[Visual Basic] Public Sub New(String)

[C#] public ParameterOutOfRangeException(string);

[C++] public ParameterOutOfRangeException(string*);

[C++/CLI] public ParameterOutOfRangeException(String^);

Generated exception for a parameter out of range with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public ParameterOutOfRangeException(int,string);

[C++] public ParameterOutOfRangeException(int,string*);

[C++/CLI] public ParameterOutOfRangeException(int,String^);

Generated excepion for a parameter out of range with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public ParameterOutOfRangeException(string,Exception);

[C++] public ParameterOutOfRangeException(string*,Exception*);

[C++/CLI] public ParameterOutOfRangeException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members


%%PageItemTitle%%

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ParameterOutOfRangeException Class > ParameterOutOfRangeException Constructor : ParameterOutOfRangeException Constructor()

Generated base exception for a parameter out of range.

[Visual Basic]
Public Function New()
[C#]
public ParameterOutOfRangeException();
[C++]
public: ParameterOutOfRangeException();
[C++/CLI]
public:
ParameterOutOfRangeException();

Requirements

Platforms: See Getting Started section

See Also

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List


%%PageItemTitle%%

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ParameterOutOfRangeException Class > ParameterOutOfRangeException Constructor : ParameterOutOfRangeException Constructor(Int32)

Generated exception for a parameter out of range with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public ParameterOutOfRangeException(
   int errorNumber
);
[C++]
public: ParameterOutOfRangeException(
   int errorNumber
)
[C++/CLI]
public:
ParameterOutOfRangeException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List


%%PageItemTitle%%

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ParameterOutOfRangeException Class > ParameterOutOfRangeException Constructor : ParameterOutOfRangeException Constructor(Int32,String)

Generated exception for a parameter out of range with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public ParameterOutOfRangeException(
   int errorNumber,
   string message
);
[C++]
public: ParameterOutOfRangeException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
ParameterOutOfRangeException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List


%%PageItemTitle%%

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ParameterOutOfRangeException Class > ParameterOutOfRangeException Constructor : ParameterOutOfRangeException Constructor(String)

Generated exception for a parameter out of range with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public ParameterOutOfRangeException(
   string message
);
[C++]
public: ParameterOutOfRangeException(
   string* message
)
[C++/CLI]
public:
ParameterOutOfRangeException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List


%%PageItemTitle%%

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > ParameterOutOfRangeException Class > ParameterOutOfRangeException Constructor : ParameterOutOfRangeException Constructor(String,Exception)

Generated excepion for a parameter out of range with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public ParameterOutOfRangeException(
   string message,
   Exception innerException
);
[C++]
public: ParameterOutOfRangeException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
ParameterOutOfRangeException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

ParameterOutOfRangeException Class | ParameterOutOfRangeException Members | Overload List


%%PageItemTitle%%

PDF417EncodingException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : PDF417EncodingException Class

This exception is thrown if an internal exception has occurred while trying to encode the barcode data.

For a list of all members of this type, see PDF417EncodingException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.PDF417EncodingException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class PDF417EncodingException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class PDF417EncodingException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class PDF417EncodingException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class PDF417EncodingException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PDF417EncodingException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

PDF417EncodingException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : PDF417EncodingException Class

PDF417EncodingException overview

Public Constructors

Public Constructor PDF417EncodingException Constructor Overloaded. Generated base exception for a PDF417 encoding error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

PDF417EncodingException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PDF417EncodingException Class | PDF417EncodingException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > PDF417EncodingException Class : PDF417EncodingException Constructor (PDF417EncodingException)

Generated base exception for a PDF417 encoding error.

Overload List

Generated base exception for a PDF417 encoding error.

[Visual Basic] Public Sub New()

[C#] public PDF417EncodingException();

[C++] public PDF417EncodingException();

[C++/CLI] public PDF417EncodingException();

Generated exception for a PDF417 encoding error with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public PDF417EncodingException(int);

[C++] public PDF417EncodingException(int);

[C++/CLI] public PDF417EncodingException(int);

Generated exception for a PDF417 encoding error with a given message.

[Visual Basic] Public Sub New(String)

[C#] public PDF417EncodingException(string);

[C++] public PDF417EncodingException(string*);

[C++/CLI] public PDF417EncodingException(String^);

Generated exception for a PDF417 encoding error with a given error number.

[Visual Basic] Public Sub New(Integer,String)

[C#] public PDF417EncodingException(int,string);

[C++] public PDF417EncodingException(int,string*);

[C++/CLI] public PDF417EncodingException(int,String^);

Generated exception for a PDF417 encoding error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public PDF417EncodingException(string,Exception);

[C++] public PDF417EncodingException(string*,Exception*);

[C++/CLI] public PDF417EncodingException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

PDF417EncodingException Class | PDF417EncodingException Members


%%PageItemTitle%%

PDF417EncodingException Class | PDF417EncodingException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > PDF417EncodingException Class > PDF417EncodingException Constructor : PDF417EncodingException Constructor()

Generated base exception for a PDF417 encoding error.

[Visual Basic]
Public Function New()
[C#]
public PDF417EncodingException();
[C++]
public: PDF417EncodingException();
[C++/CLI]
public:
PDF417EncodingException();

Requirements

Platforms: See Getting Started section

See Also

PDF417EncodingException Class | PDF417EncodingException Members | Overload List


%%PageItemTitle%%

PDF417EncodingException Class | PDF417EncodingException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > PDF417EncodingException Class > PDF417EncodingException Constructor : PDF417EncodingException Constructor(Int32)

Generated exception for a PDF417 encoding error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public PDF417EncodingException(
   int errorNumber
);
[C++]
public: PDF417EncodingException(
   int errorNumber
)
[C++/CLI]
public:
PDF417EncodingException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

PDF417EncodingException Class | PDF417EncodingException Members | Overload List


%%PageItemTitle%%

PDF417EncodingException Class | PDF417EncodingException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > PDF417EncodingException Class > PDF417EncodingException Constructor : PDF417EncodingException Constructor(Int32,String)

Generated exception for a PDF417 encoding error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public PDF417EncodingException(
   int errorNumber,
   string message
);
[C++]
public: PDF417EncodingException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
PDF417EncodingException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

PDF417EncodingException Class | PDF417EncodingException Members | Overload List


%%PageItemTitle%%

PDF417EncodingException Class | PDF417EncodingException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > PDF417EncodingException Class > PDF417EncodingException Constructor : PDF417EncodingException Constructor(String)

Generated exception for a PDF417 encoding error with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public PDF417EncodingException(
   string message
);
[C++]
public: PDF417EncodingException(
   string* message
)
[C++/CLI]
public:
PDF417EncodingException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

PDF417EncodingException Class | PDF417EncodingException Members | Overload List


%%PageItemTitle%%

PDF417EncodingException Class | PDF417EncodingException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > PDF417EncodingException Class > PDF417EncodingException Constructor : PDF417EncodingException Constructor(String,Exception)

Generated exception for a PDF417 encoding error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public PDF417EncodingException(
   string message,
   Exception innerException
);
[C++]
public: PDF417EncodingException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
PDF417EncodingException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

PDF417EncodingException Class | PDF417EncodingException Members | Overload List


%%PageItemTitle%%

Reader Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Reader Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Reader Class (PegasusImaging.WinForms.BarcodeXpress5)

The Reader Class includes methods and properties to be used in recognizing barcodes.

For a list of all members of this type, see Reader members.

Object Model

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.Reader

Syntax

[Visual Basic]
Public Class Reader
[C#]
public class Reader
[C++]
public __gc class Reader
[C++/CLI]
public ref class Reader

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

Reader Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

Reader Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Reader Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Reader Class (PegasusImaging.WinForms.BarcodeXpress5)

Reader overview

Public Constructors

Public Constructor Reader Constructor The main constructor which takes in the instanceID.

Public Properties

Public Property AppendCheckSum | Gets and sets a value which determines if a check sum value is appended to the barcode during recognition.
Public Property Area | Gets and sets the area of the image, in pixels, to analyze for barcode recognition.
Public Property AustralianPostCustomDecodeMode | Gets and sets the AustralianPostCustomDecodeType.
Public Property BarcodeTypes | Gets and sets the type of barcodes to analyze during recognition processing.
Public Property IncludeControlCharacters | Gets and sets the control chracters in the barcode value during recognition processing.
Public Property InkColor | Gets and sets the ink color of barcodes to search for during recognition processing.
Public Property MaximumBarcodes | Gets and sets the maximum number of barcodes to recognize.
Public Property Orientation | Gets and sets the orientation of the barcodes to analyze during recognition.
Public Property ReturnPossibleBarcodes | Gets and sets a value to determine if possible barcodes are returned in the result list.
Public Property ScanDistance | Gets and sets the scan distance in pixels between line sweeps when searching for 1D barcodes.

Public Methods

Public Method Analyze Overloaded. Detects barcodes on the given bitmap image.

See Also

Reader Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

instanceID
An integer which represents the instanceID.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Reader Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : Reader Constructor (Reader)

The main constructor which takes in the instanceID.

[Visual Basic]
Public Function New( _
   ByVal instanceID As IntPtr _
)
[C#]
public Reader(
   IntPtr instanceID
);
[C++]
public: Reader(
   IntPtr instanceID
)
[C++/CLI]
public:
Reader(
   IntPtr instanceID
)

Parameters

instanceID
An integer which represents the instanceID.

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Analyze Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : Analyze Method

Detects barcodes on the given bitmap image.

Overload List

Detects barcodes on the given bitmap image.

[Visual Basic] Overloads Public Function Analyze(Bitmap) As Result()

[C#] public Result[] Analyze(Bitmap);

[C++] public Result*[]* Analyze(Bitmap);

[C++/CLI] public array<Result^>^ Analyze(Bitmap);

Detects barcodes on the given hDIB image.

[Visual Basic] Overloads Public Function Analyze(Integer) As Result()

[C#] public Result[] Analyze(int);

[C++] public Result*[]* Analyze(int);

[C++/CLI] public array<Result^>^ Analyze(int);

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

bitmap
A bitmap containing the image to be analyzed.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Analyze(Bitmap) Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class > Analyze Method : Analyze(Bitmap) Method

Detects barcodes on the given bitmap image.

[Visual Basic]
Overloads Public Function Analyze( _
   ByVal bitmap As Bitmap _
) As Result()
[C#]
public Result[] Analyze(
   Bitmap bitmap
);
[C++]
public: Result*[]* Analyze(
   Bitmap bitmap
)
[C++/CLI]
public:
array<Result^>^ Analyze(
   Bitmap bitmap
)

Parameters

bitmap
A bitmap containing the image to be analyzed.

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members | Overload List


%%PageItemTitle%%

Reader Class | Reader Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

hdIB
A handle to a DIB containing the image to be analyzed.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Analyze(Int32) Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class > Analyze Method : Analyze(Int32) Method

Detects barcodes on the given hDIB image.

[Visual Basic]
Overloads Public Function Analyze( _
   ByVal hdIB As Integer _
) As Result()
[C#]
public Result[] Analyze(
   int hdIB
);
[C++]
public: Result*[]* Analyze(
   int hdIB
)
[C++/CLI]
public:
array<Result^>^ Analyze(
   int hdIB
)

Parameters

hdIB
A handle to a DIB containing the image to be analyzed.

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members | Overload List


%%PageItemTitle%% $$Properties$$

Reader Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Reader Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Reader Class (PegasusImaging.WinForms.BarcodeXpress5)

For a list of all members of this type, see Reader members.

Public Properties

Public Property AppendCheckSum | Gets and sets a value which determines if a check sum value is appended to the barcode during recognition.
Public Property Area | Gets and sets the area of the image, in pixels, to analyze for barcode recognition.
Public Property AustralianPostCustomDecodeMode | Gets and sets the AustralianPostCustomDecodeType.
Public Property BarcodeTypes | Gets and sets the type of barcodes to analyze during recognition processing.
Public Property IncludeControlCharacters | Gets and sets the control chracters in the barcode value during recognition processing.
Public Property InkColor | Gets and sets the ink color of barcodes to search for during recognition processing.
Public Property MaximumBarcodes | Gets and sets the maximum number of barcodes to recognize.
Public Property Orientation | Gets and sets the orientation of the barcodes to analyze during recognition.
Public Property ReturnPossibleBarcodes | Gets and sets a value to determine if possible barcodes are returned in the result list.
Public Property ScanDistance | Gets and sets the scan distance in pixels between line sweeps when searching for 1D barcodes.

See Also

Reader Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

AppendCheckSum Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : AppendCheckSum Property

Gets and sets a value which determines if a check sum value is appended to the barcode during recognition.

[Visual Basic]
Public Property AppendCheckSum As Boolean
[C#]
public bool AppendCheckSum {get; set;}
[C++]
public: __property bool get_AppendCheckSum();
public: __property void set_AppendCheckSum(
   bool value
);
[C++/CLI]
public:
property bool AppendCheckSum {
   bool get();
   void set (bool value);
}

Remarks

If this property is set to true, checksum values will be appended for barcode types that require a check sum. This property does not have any effect for barcode types which do not have a checksum or the checksum is optional.

Note: The UPC and EAN codes always append the checksum character to the barcode results. This is done regardless of this properties value.

Default value: false

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Area Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : Area Property (Reader)

Gets and sets the area of the image, in pixels, to analyze for barcode recognition.

[Visual Basic]
Public Property Area As Rectangle
[C#]
public Rectangle Area {get; set;}
[C++]
public: __property Rectangle get_Area();
public: __property void set_Area(
   Rectangle value
);
[C++/CLI]
public:
property Rectangle Area {
   Rectangle get();
   void set (Rectangle value);
}

Remarks

If it is desired to analyze the entire image, set the Area property values (x, y, width and height) to zero.

Default value: 0,0,0,0

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

AustralianPostCustomDecodeMode Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : AustralianPostCustomDecodeMode Property

Gets and sets the AustralianPostCustomDecodeType.

[Visual Basic]
Public Property AustralianPostCustomDecodeMode As AustralianPostCustomDecodeType
[C#]
public AustralianPostCustomDecodeType AustralianPostCustomDecodeMode {get; set;}
[C++]
public: __property AustralianPostCustomDecodeType get_AustralianPostCustomDecodeMode();
public: __property void set_AustralianPostCustomDecodeMode(
   AustralianPostCustomDecodeType value
);
[C++/CLI]
public:
property AustralianPostCustomDecodeType AustralianPostCustomDecodeMode {
   AustralianPostCustomDecodeType get();
   void set (AustralianPostCustomDecodeType value);
}

Remarks

This property gets and sets the custom section in both the Customer Barcode 2 and Customer Barcode 3 formats. The AustralianPostCustomDecodeType enumeration is used to set this value.

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeTypes Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : BarcodeTypes Property

Gets and sets the type of barcodes to analyze during recognition processing.

[Visual Basic]
Public Property BarcodeTypes As Array
[C#]
public Array BarcodeTypes {get; set;}
[C++]
public: __property Array* get_BarcodeTypes();
public: __property void set_BarcodeTypes(
   Array* value
);
[C++/CLI]
public:
property Array^ BarcodeTypes {
   Array^ get();
   void set (Array^ value);
}

Remarks

By default, the barcode engine searches for all 1D barcodes. The 1D barcode set includes all types, except PatchCode, Australian Post, PostNet, Royal Post, Intelligent Mail, PDF417, DataMatrix and QRcode.

Barcode types can be combined. The C# example below demonstrates creating an array of BarcodeTypes.

Default value: UnknownBarcode

Example

// Create BarcodeType Array

System.Array currentBarcodeTypes = new BarcodeType[2];

// Add barcode types

currentBarcodeTypes.SetValue(BarcodeType.Industry2of5Barcode, 0);

currentBarcodeTypes.SetValue(BarcodeType.Interleaved2of5Barcode, 1);

// Set the BarcodeTypes property

barcode5.reader.BarcodeTypes = currentBarcodeTypes;

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

IncludeControlCharacters Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : IncludeControlCharacters Property

Gets and sets the control chracters in the barcode value during recognition processing.

[Visual Basic]
Public Property IncludeControlCharacters As Boolean
[C#]
public bool IncludeControlCharacters {get; set;}
[C++]
public: __property bool get_IncludeControlCharacters();
public: __property void set_IncludeControlCharacters(
   bool value
);
[C++/CLI]
public:
property bool IncludeControlCharacters {
   bool get();
   void set (bool value);
}

Remarks

If this property is set to True, the barcode control characters are included in the barcode read value. This has no effect for barcodes which do not support control characters.

Codabar barcode returns the Start and Stop characters.

Default value: False

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InkColor Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : InkColor Property

Gets and sets the ink color of barcodes to search for during recognition processing.

[Visual Basic]
Public Property InkColor As InkColorInfo
[C#]
public InkColorInfo InkColor {get; set;}
[C++]
public: __property InkColorInfo get_InkColor();
public: __property void set_InkColor(
   InkColorInfo value
);
[C++/CLI]
public:
property InkColorInfo InkColor {
   InkColorInfo get();
   void set (InkColorInfo value);
}

Remarks

The barcode recognition engine is capable of detecting barcodes in an image without any prior knowledge of the barcode color. However, you can speed up the recognition process by specifying a barcode color.

Default value: Black

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

MaximumBarcodes Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : MaximumBarcodes Property

Gets and sets the maximum number of barcodes to recognize.

[Visual Basic]
Public Property MaximumBarcodes As Integer
[C#]
public int MaximumBarcodes {get; set;}
[C++]
public: __property int get_MaximumBarcodes();
public: __property void set_MaximumBarcodes(
   int value
);
[C++/CLI]
public:
property int MaximumBarcodes {
   int get();
   void set (int value);
}

Remarks

Note: Processing will halt after this number of barcodes have been found.

Default value: 100

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Orientation Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : Orientation Property

Gets and sets the orientation of the barcodes to analyze during recognition.

[Visual Basic]
Public Property Orientation As OrientationInfo
[C#]
public OrientationInfo Orientation {get; set;}
[C++]
public: __property OrientationInfo get_Orientation();
public: __property void set_Orientation(
   OrientationInfo value
);
[C++/CLI]
public:
property OrientationInfo Orientation {
   OrientationInfo get();
   void set (OrientationInfo value);
}

Remarks

The barcode recognition engine is capable of detecting barcodes in an image without any prior knowledge of the barcode orientation. However, you can speed up the recognition process by specifying a barcode orientation.

Default value: AllOrientations

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ReturnPossibleBarcodes Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : ReturnPossibleBarcodes Property

Gets and sets a value to determine if possible barcodes are returned in the result list.

[Visual Basic]
Public Property ReturnPossibleBarcodes As Boolean
[C#]
public bool ReturnPossibleBarcodes {get; set;}
[C++]
public: __property bool get_ReturnPossibleBarcodes();
public: __property void set_ReturnPossibleBarcodes(
   bool value
);
[C++/CLI]
public:
property bool ReturnPossibleBarcodes {
   bool get();
   void set (bool value);
}

Remarks

The default value is false.

When this property is set to True, the barcode engine returns candidate barcodes which could not be decoded in the results list.

For 1D barcodes, any unsolved regions of interest in the barcode result list have a BarcodeType of UnknownBarcode and the BarcodeValue property will be NULL.

For 2D barcodes DataMatrix, PDF417, QRcode, PostNet, Intelligent Mail, Australian Post and Royal Post 4, the currently selected BarcodeType is returned as the candidate region type.

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Reader Class | Reader Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ScanDistance Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Reader Class : ScanDistance Property

Gets and sets the scan distance in pixels between line sweeps when searching for 1D barcodes.

[Visual Basic]
Public Property ScanDistance As Integer
[C#]
public int ScanDistance {get; set;}
[C++]
public: __property int get_ScanDistance();
public: __property void set_ScanDistance(
   int value
);
[C++/CLI]
public:
property int ScanDistance {
   int get();
   void set (int value);
}

Remarks

Reducing this value can help in finding barcodes which are short relative to their height.

This value effects the run time of the barcode search. Smaller values will require more processing of the image.

Default value: 5

Valid values are 1 through 10.

Requirements

Platforms: See Getting Started section

See Also

Reader Class | Reader Members


%%PageItemTitle%%

Result Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Result Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Result Class

The Results Class includes properties used to return barcode recognition results.

For a list of all members of this type, see Result members.

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.Result

Syntax

[Visual Basic]
Public Class Result
[C#]
public class Result
[C++]
public __gc class Result
[C++/CLI]
public ref class Result

Remarks

The Analyze method returns an array of Result objects. Each element of the Result array contains the results of a single recognized barcode (or unsolved barcode. See ReturnPossibleBarcodes).

Since BarcodeXpress can return multiple barcode results from a single scan, the detected barcode results (both solved and unsolved) are sorted using the following criteria.

Note: All solved barcodes are ordered before unsolved barcodes.

  • The confidence factor is used to sort the barcode results from the highest confidence to the lowest confidence.
  • For any barcodes with the same confidence value, they are sorted by their location, from top to bottom, then left to right.

Four points describe the location of the barcode on the image:

  • Point1
  • Point2
  • Point3
  • Point4

Example

The C# code below demonstrates how to get the recognition results:

[C#]

using PegasusImaging.WinForms.BarcodeXpress5;

// call Analyze to detect barcodes in the image
// all detected barcodes will be returned to the
// Result object array.
Result[] results = bcXpress.reader.Analyze(hDib);

// get some results info, if any
for (short i = 1; i > results.Length; i++)
{
   // get result for current barcode
   Result curResult = (Result)results.GetValue(i);

   // do something with results
   MessageBox.Show(curResult.BarcodeName);
   MessageBox.Show(curResult.BarcodeValue);
}

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

Result Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

Result Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Result Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Result Class

Result overview

Public Constructors

Public Constructor Result Constructor The constructor for the Result class.

Public Properties

Public Property Area | Gets the bounding rectangular area of the recognized barcode.
Public Property BarcodeData | Gets the recognized barcode value as a char array.
Public Property BarcodeDataAsByte | Gets the recognized barcode data value in bytes.
Public Property BarcodeName | Gets the name of the recognized barcode.
Public Property BarcodeType | Gets the type of the recognized barcode.
Public Property BarcodeValue | Gets the value of the recognized barcode.
Public Property Confidence | Gets the confidence of the recognized barcode.
Public Property Length | Gets the length of the result string.
Public Property NumberCheckSumChars | Gets the number of characters in the recognized check sum.
Public Property Point1 | Gets the top-left point of the recognized barcode.
Public Property Point2 | Gets the top-right point of the recognized barcode.
Public Property Point3 | Gets the bottom-left point of the recognized barcode.
Public Property Point4 | Gets the bottom-right point of the recognized barcode.
Public Property Skew | Gets the angle of skew for the recognized barcode analyzed.
Public Property ValidCheckSum | Gets a valid check sum for a recognized barcode.

See Also

Result Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Result Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Result Constructor (Result)

The constructor for the Result class.

[Visual Basic]
Public Function New()
[C#]
public Result();
[C++]
public: Result();
[C++/CLI]
public:
Result();

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%% $$Properties$$

Result Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Result Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Result Class

For a list of all members of this type, see Result members.

Public Properties

Public Property Area | Gets the bounding rectangular area of the recognized barcode.
Public Property BarcodeData | Gets the recognized barcode value as a char array.
Public Property BarcodeDataAsByte | Gets the recognized barcode data value in bytes.
Public Property BarcodeName | Gets the name of the recognized barcode.
Public Property BarcodeType | Gets the type of the recognized barcode.
Public Property BarcodeValue | Gets the value of the recognized barcode.
Public Property Confidence | Gets the confidence of the recognized barcode.
Public Property Length | Gets the length of the result string.
Public Property NumberCheckSumChars | Gets the number of characters in the recognized check sum.
Public Property Point1 | Gets the top-left point of the recognized barcode.
Public Property Point2 | Gets the top-right point of the recognized barcode.
Public Property Point3 | Gets the bottom-left point of the recognized barcode.
Public Property Point4 | Gets the bottom-right point of the recognized barcode.
Public Property Skew | Gets the angle of skew for the recognized barcode analyzed.
Public Property ValidCheckSum | Gets a valid check sum for a recognized barcode.

See Also

Result Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Area Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Area Property (Result)

Gets the bounding rectangular area of the recognized barcode.

[Visual Basic]
Public ReadOnly Property Area As Rectangle
[C#]
public Rectangle Area {get;}
[C++]
public: __property Rectangle get_Area();
[C++/CLI]
public:
property Rectangle Area {
   Rectangle get();
}

Remarks

The rectangular area consists of the Rectangle object which contains the coordinates x, y, width and height that the area surrounding the barcode analyzed.

See the Result Class desription for general information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeData Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : BarcodeData Property (Result)

Gets the recognized barcode value as a char array.

[Visual Basic]
Public ReadOnly Property BarcodeData As Char()
[C#]
public char[] BarcodeData {get;}
[C++]
public: __property char[]* get_BarcodeData();
[C++/CLI]
public:
property array<char>^ BarcodeData {
   array<char>^ get();
}

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeDataAsByte Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : BarcodeDataAsByte Property

Gets the recognized barcode data value in bytes.

[Visual Basic]
Public ReadOnly Property BarcodeDataAsByte As Byte()
[C#]
public byte[] BarcodeDataAsByte {get;}
[C++]
public: __property byte[]* get_BarcodeDataAsByte();
[C++/CLI]
public:
property array<byte>^ BarcodeDataAsByte {
   array<byte>^ get();
}

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeName Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : BarcodeName Property

Gets the name of the recognized barcode.

[Visual Basic]
Public ReadOnly Property BarcodeName As String
[C#]
public string BarcodeName {get;}
[C++]
public: __property string* get_BarcodeName();
[C++/CLI]
public:
property String^ BarcodeName {
   String^ get();
}

Remarks

This property gets the name of the barcode (e.g. "Code39"), not the value of the barcode. The BarcodeValue property returns the value of the barcode.

If ReturnPossibleBarcodes is True, and only a region of interest is returned in the results, then the barcode name is a null string.

See the Result for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeType Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : BarcodeType Property (Result)

Gets the type of the recognized barcode.

[Visual Basic]
Public ReadOnly Property BarcodeType As BarcodeType
[C#]
public BarcodeType BarcodeType {get;}
[C++]
public: __property BarcodeType get_BarcodeType();
[C++/CLI]
public:
property BarcodeType BarcodeType {
   BarcodeType get();
}

Remarks

If ReturnPossibleBarcodes is True, and only a region of interest is returned in the results, then the barcode type is UnknownBarcode.

See the Result for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeValue Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : BarcodeValue Property (Result)

Gets the value of the recognized barcode.

[Visual Basic]
Public ReadOnly Property BarcodeValue As String
[C#]
public string BarcodeValue {get;}
[C++]
public: __property string* get_BarcodeValue();
[C++/CLI]
public:
property String^ BarcodeValue {
   String^ get();
}

Remarks

If ReturnPossibleBarcodes is True, and only a region of interest is returned in the results, then the barcode value is a null string.

If the barcodes being recognized are encoding binary data, use the BarcodeDataAsByte property to return the result value instead.

See the Result for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Confidence Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Confidence Property

Gets the confidence of the recognized barcode.

[Visual Basic]
Public ReadOnly Property Confidence As Integer
[C#]
public int Confidence {get;}
[C++]
public: __property int get_Confidence();
[C++/CLI]
public:
property int Confidence {
   int get();
}

Remarks

Barcodes are assumed to have a 100 percent confidence from which points are deducted. Confidence reporting is based on several factors:

  • Barcodes that require the use of check digits that have not produced the anticipated check sum value will cause a reduced confidence. Invalid check sums will have a reduction of at least 50.
  • Barcodes that are recognized but that also include errors will cause a reduction in confidence. These could be barcodes that were recovered because of the check sum. The confidence of these barcodes is reduced by as much as 30.

All of these modifications of the confidence can be combined.

See the Result Class for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Length Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Length Property

Gets the length of the result string.

[Visual Basic]
Public ReadOnly Property Length As Integer
[C#]
public int Length {get;}
[C++]
public: __property int get_Length();
[C++/CLI]
public:
property int Length {
   int get();
}

Remarks

This property is used in conjuction with the BarcodeData property to return the recognized barcode's value.

See the Result for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

NumberCheckSumChars Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : NumberCheckSumChars Property

Gets the number of characters in the recognized check sum.

[Visual Basic]
Public ReadOnly Property NumberCheckSumChars As Integer
[C#]
public int NumberCheckSumChars {get;}
[C++]
public: __property int get_NumberCheckSumChars();
[C++/CLI]
public:
property int NumberCheckSumChars {
   int get();
}

Remarks

If a check sum does not exist, or the check sum evaluated incorrectly, this property will return 0.

See the Result for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Point1 Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Point1 Property

Gets the top-left point of the recognized barcode.

[Visual Basic]
Public ReadOnly Property Point1 As Point
[C#]
public Point Point1 {get;}
[C++]
public: __property Point get_Point1();
[C++/CLI]
public:
property Point Point1 {
   Point get();
}

Remarks

See the Result Class description for general information about retrieving results.

Point properties 1 through 4 locate the corner points of barcodes. When the barcode is in the horizontal orientation, BarcodeXpress reads it from left to right, assigning values to the Point 1 through 4 properties. The Point1 property is the upper-left corner point of the barcode. With any rotation of the barcode on the image, the Point value assigned to the corners rotate with the barcode. no matter what the rotation is, the Point properties always identify the same corner point of the barcode.

See the Boundary and Point Properties topic for more information.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Point2 Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Point2 Property

Gets the top-right point of the recognized barcode.

[Visual Basic]
Public ReadOnly Property Point2 As Point
[C#]
public Point Point2 {get;}
[C++]
public: __property Point get_Point2();
[C++/CLI]
public:
property Point Point2 {
   Point get();
}

Remarks

See the Result Class description for general information about retrieving results.

Point properties 1 through 4 locate the corner points of barcodes. When the barcode is in the horizontal orientation, BarcodeXpress reads it from left to right, assigning values to the Point 1 through 4 properties. The Point1 property is the upper-left corner point of the barcode. With any rotation of the barcode on the image, the Point value assigned to the corners rotate with the barcode. no matter what the rotation is, the Point properties always identify the same corner point of the barcode.

See the Boundary and Point Properties topic for more information.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Point3 Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Point3 Property

Gets the bottom-left point of the recognized barcode.

[Visual Basic]
Public ReadOnly Property Point3 As Point
[C#]
public Point Point3 {get;}
[C++]
public: __property Point get_Point3();
[C++/CLI]
public:
property Point Point3 {
   Point get();
}

Remarks

See the Result Class description for general information about retrieving results.

Point properties 1 through 4 locate the corner points of barcodes. When the barcode is in the horizontal orientation, BarcodeXpress reads it from left to right, assigning values to the Point 1 through 4 properties. The Point1 property is the upper-left corner point of the barcode. With any rotation of the barcode on the image, the Point value assigned to the corners rotate with the barcode. no matter what the rotation is, the Point properties always identify the same corner point of the barcode.

See the Boundary and Point Properties topic for more information.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Point4 Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Point4 Property

Gets the bottom-right point of the recognized barcode.

[Visual Basic]
Public ReadOnly Property Point4 As Point
[C#]
public Point Point4 {get;}
[C++]
public: __property Point get_Point4();
[C++/CLI]
public:
property Point Point4 {
   Point get();
}

Remarks

See the Result Class description for general information about retrieving results.

Point properties 1 through 4 locate the corner points of barcodes. When the barcode is in the horizontal orientation, BarcodeXpress reads it from left to right, assigning values to the Point 1 through 4 properties. The Point1 property is the upper-left corner point of the barcode. With any rotation of the barcode on the image, the Point value assigned to the corners rotate with the barcode. no matter what the rotation is, the Point properties always identify the same corner point of the barcode.

See the Boundary and Point Properties topic for more information.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Skew Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : Skew Property

Gets the angle of skew for the recognized barcode analyzed.

[Visual Basic]
Public ReadOnly Property Skew As Integer
[C#]
public int Skew {get;}
[C++]
public: __property int get_Skew();
[C++/CLI]
public:
property int Skew {
   int get();
}

Remarks

The skew angle is measured in degrees. 0 degrees is horizontal.

See the Result Class for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

Result Class | Result Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ValidCheckSum Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Result Class : ValidCheckSum Property

Gets a valid check sum for a recognized barcode.

[Visual Basic]
Public ReadOnly Property ValidCheckSum As Boolean
[C#]
public bool ValidCheckSum {get;}
[C++]
public: __property bool get_ValidCheckSum();
[C++/CLI]
public:
property bool ValidCheckSum {
   bool get();
}

Remarks

For barcodes with a check sum, it returns whether the check sum is valid. A value of 1 represents True, a value of 0 represents False.

For barcodes without a check sum, it returns False.

For barcodes with error correction, it returns True.

See the Result Class for more information about retrieving results.

Requirements

Platforms: See Getting Started section

See Also

Result Class | Result Members


%%PageItemTitle%%

RowCountException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : RowCountException Class

This exception is thrown if the input columns are outside the valid range of the 2D barcode type to be created.

For a list of all members of this type, see RowCountException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.RowCountException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class RowCountException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class RowCountException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class RowCountException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class RowCountException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

RowCountException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

RowCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : RowCountException Class

RowCountException overview

Public Constructors

Public Constructor RowCountException Constructor Overloaded. Generated base exception for row count error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

RowCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

RowCountException Class | RowCountException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > RowCountException Class : RowCountException Constructor (RowCountException)

Generated base exception for row count error.

Overload List

Generated base exception for row count error.

[Visual Basic] Public Sub New()

[C#] public RowCountException();

[C++] public RowCountException();

[C++/CLI] public RowCountException();

Generated exception for row count error with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public RowCountException(int);

[C++] public RowCountException(int);

[C++/CLI] public RowCountException(int);

Generated exception for row count error with a given message.

[Visual Basic] Public Sub New(String)

[C#] public RowCountException(string);

[C++] public RowCountException(string*);

[C++/CLI] public RowCountException(String^);

Generated exception for row count error with error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public RowCountException(int,string);

[C++] public RowCountException(int,string*);

[C++/CLI] public RowCountException(int,String^);

Generated exception for row count error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public RowCountException(string,Exception);

[C++] public RowCountException(string*,Exception*);

[C++/CLI] public RowCountException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

RowCountException Class | RowCountException Members


%%PageItemTitle%%

RowCountException Class | RowCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > RowCountException Class > RowCountException Constructor : RowCountException Constructor()

Generated base exception for row count error.

[Visual Basic]
Public Function New()
[C#]
public RowCountException();
[C++]
public: RowCountException();
[C++/CLI]
public:
RowCountException();

Requirements

Platforms: See Getting Started section

See Also

RowCountException Class | RowCountException Members | Overload List


%%PageItemTitle%%

RowCountException Class | RowCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > RowCountException Class > RowCountException Constructor : RowCountException Constructor(Int32)

Generated exception for row count error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public RowCountException(
   int errorNumber
);
[C++]
public: RowCountException(
   int errorNumber
)
[C++/CLI]
public:
RowCountException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

RowCountException Class | RowCountException Members | Overload List


%%PageItemTitle%%

RowCountException Class | RowCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > RowCountException Class > RowCountException Constructor : RowCountException Constructor(Int32,String)

Generated exception for row count error with error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public RowCountException(
   int errorNumber,
   string message
);
[C++]
public: RowCountException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
RowCountException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

RowCountException Class | RowCountException Members | Overload List


%%PageItemTitle%%

RowCountException Class | RowCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > RowCountException Class > RowCountException Constructor : RowCountException Constructor(String)

Generated exception for row count error with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public RowCountException(
   string message
);
[C++]
public: RowCountException(
   string* message
)
[C++/CLI]
public:
RowCountException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

RowCountException Class | RowCountException Members | Overload List


%%PageItemTitle%%

RowCountException Class | RowCountException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > RowCountException Class > RowCountException Constructor : RowCountException Constructor(String,Exception)

Generated exception for row count error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public RowCountException(
   string message,
   Exception innerException
);
[C++]
public: RowCountException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
RowCountException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

RowCountException Class | RowCountException Members | Overload List


%%PageItemTitle%%

TimeoutErrorException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : TimeoutErrorException Class

This exception is not used.

For a list of all members of this type, see TimeoutErrorException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.TimeoutErrorException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class TimeoutErrorException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class TimeoutErrorException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class TimeoutErrorException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class TimeoutErrorException sealed : public BarcodeException

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

TimeoutErrorException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

TimeoutErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : TimeoutErrorException Class

TimeoutErrorException overview

Public Constructors

Public Constructor TimeoutErrorException Constructor Overloaded. Generated base exception for a timeout error.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

TimeoutErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

TimeoutErrorException Class | TimeoutErrorException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > TimeoutErrorException Class : TimeoutErrorException Constructor (TimeoutErrorException)

Generated base exception for a timeout error.

Overload List

Generated base exception for a timeout error.

[Visual Basic] Public Sub New()

[C#] public TimeoutErrorException();

[C++] public TimeoutErrorException();

[C++/CLI] public TimeoutErrorException();

Generated exception for a timeout error with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public TimeoutErrorException(int);

[C++] public TimeoutErrorException(int);

[C++/CLI] public TimeoutErrorException(int);

Generated exception for a timeout error with a given message.

[Visual Basic] Public Sub New(String)

[C#] public TimeoutErrorException(string);

[C++] public TimeoutErrorException(string*);

[C++/CLI] public TimeoutErrorException(String^);

Generated exception for a timeout error with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public TimeoutErrorException(int,string);

[C++] public TimeoutErrorException(int,string*);

[C++/CLI] public TimeoutErrorException(int,String^);

Generated exception for a timeout error with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public TimeoutErrorException(string,Exception);

[C++] public TimeoutErrorException(string*,Exception*);

[C++/CLI] public TimeoutErrorException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

TimeoutErrorException Class | TimeoutErrorException Members


%%PageItemTitle%%

TimeoutErrorException Class | TimeoutErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > TimeoutErrorException Class > TimeoutErrorException Constructor : TimeoutErrorException Constructor()

Generated base exception for a timeout error.

[Visual Basic]
Public Function New()
[C#]
public TimeoutErrorException();
[C++]
public: TimeoutErrorException();
[C++/CLI]
public:
TimeoutErrorException();

Requirements

Platforms: See Getting Started section

See Also

TimeoutErrorException Class | TimeoutErrorException Members | Overload List


%%PageItemTitle%%

TimeoutErrorException Class | TimeoutErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > TimeoutErrorException Class > TimeoutErrorException Constructor : TimeoutErrorException Constructor(Int32)

Generated exception for a timeout error with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public TimeoutErrorException(
   int errorNumber
);
[C++]
public: TimeoutErrorException(
   int errorNumber
)
[C++/CLI]
public:
TimeoutErrorException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

TimeoutErrorException Class | TimeoutErrorException Members | Overload List


%%PageItemTitle%%

TimeoutErrorException Class | TimeoutErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > TimeoutErrorException Class > TimeoutErrorException Constructor : TimeoutErrorException Constructor(Int32,String)

Generated exception for a timeout error with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public TimeoutErrorException(
   int errorNumber,
   string message
);
[C++]
public: TimeoutErrorException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
TimeoutErrorException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

TimeoutErrorException Class | TimeoutErrorException Members | Overload List


%%PageItemTitle%%

TimeoutErrorException Class | TimeoutErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > TimeoutErrorException Class > TimeoutErrorException Constructor : TimeoutErrorException Constructor(String)

Generated exception for a timeout error with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public TimeoutErrorException(
   string message
);
[C++]
public: TimeoutErrorException(
   string* message
)
[C++/CLI]
public:
TimeoutErrorException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

TimeoutErrorException Class | TimeoutErrorException Members | Overload List


%%PageItemTitle%%

TimeoutErrorException Class | TimeoutErrorException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
innerException
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > TimeoutErrorException Class > TimeoutErrorException Constructor : TimeoutErrorException Constructor(String,Exception)

Generated exception for a timeout error with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public TimeoutErrorException(
   string message,
   Exception innerException
);
[C++]
public: TimeoutErrorException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
TimeoutErrorException(
   String^ message,
   Exception^ innerException
)

Parameters

message
innerException

Requirements

Platforms: See Getting Started section

See Also

TimeoutErrorException Class | TimeoutErrorException Members | Overload List


%%PageItemTitle%%

UnableCreateUPCEException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableCreateUPCEException Class

This exception is thrown if the function to expand a UPC-E value to a UPC-A value fails.

For a list of all members of this type, see UnableCreateUPCEException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.UnableCreateUPCEException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class UnableCreateUPCEException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class UnableCreateUPCEException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class UnableCreateUPCEException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class UnableCreateUPCEException sealed : public BarcodeException

Remarks

Note: This error signifies an internal failure, and cannot be triggered intentionally by the user. It will most likely never occur, but exists only because this is a special-case funtion necessary to create the UPC-E symbol. This error can only be returned when creating a UPC-E barcode symbol.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

UnableCreateUPCEException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

UnableCreateUPCEException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableCreateUPCEException Class

UnableCreateUPCEException overview

Public Constructors

Public Constructor UnableCreateUPCEException Constructor Overloaded. Generated base exception when the component unable to expand a UPC-E value to a UPC-A value fails.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

UnableCreateUPCEException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

UnableCreateUPCEException Class | UnableCreateUPCEException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableCreateUPCEException Class : UnableCreateUPCEException Constructor (UnableCreateUPCEException)

Generated base exception when the component unable to expand a UPC-E value to a UPC-A value fails.

Overload List

Generated base exception when the component unable to expand a UPC-E value to a UPC-A value fails.

[Visual Basic] Public Sub New()

[C#] public UnableCreateUPCEException();

[C++] public UnableCreateUPCEException();

[C++/CLI] public UnableCreateUPCEException();

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public UnableCreateUPCEException(int);

[C++] public UnableCreateUPCEException(int);

[C++/CLI] public UnableCreateUPCEException(int);

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given message.

[Visual Basic] Public Sub New(String)

[C#] public UnableCreateUPCEException(string);

[C++] public UnableCreateUPCEException(string*);

[C++/CLI] public UnableCreateUPCEException(String^);

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public UnableCreateUPCEException(int,string);

[C++] public UnableCreateUPCEException(int,string*);

[C++/CLI] public UnableCreateUPCEException(int,String^);

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public UnableCreateUPCEException(string,Exception);

[C++] public UnableCreateUPCEException(string*,Exception*);

[C++/CLI] public UnableCreateUPCEException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

UnableCreateUPCEException Class | UnableCreateUPCEException Members


%%PageItemTitle%%

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableCreateUPCEException Class > UnableCreateUPCEException Constructor : UnableCreateUPCEException Constructor()

Generated base exception when the component unable to expand a UPC-E value to a UPC-A value fails.

[Visual Basic]
Public Function New()
[C#]
public UnableCreateUPCEException();
[C++]
public: UnableCreateUPCEException();
[C++/CLI]
public:
UnableCreateUPCEException();

Requirements

Platforms: See Getting Started section

See Also

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List


%%PageItemTitle%%

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableCreateUPCEException Class > UnableCreateUPCEException Constructor : UnableCreateUPCEException Constructor(Int32)

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public UnableCreateUPCEException(
   int errorNumber
);
[C++]
public: UnableCreateUPCEException(
   int errorNumber
)
[C++/CLI]
public:
UnableCreateUPCEException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List


%%PageItemTitle%%

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableCreateUPCEException Class > UnableCreateUPCEException Constructor : UnableCreateUPCEException Constructor(Int32,String)

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public UnableCreateUPCEException(
   int errorNumber,
   string message
);
[C++]
public: UnableCreateUPCEException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
UnableCreateUPCEException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List


%%PageItemTitle%%

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableCreateUPCEException Class > UnableCreateUPCEException Constructor : UnableCreateUPCEException Constructor(String)

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public UnableCreateUPCEException(
   string message
);
[C++]
public: UnableCreateUPCEException(
   string* message
)
[C++/CLI]
public:
UnableCreateUPCEException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List


%%PageItemTitle%%

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableCreateUPCEException Class > UnableCreateUPCEException Constructor : UnableCreateUPCEException Constructor(String,Exception)

Generated exception when the component is unable to expand a UPC-E value to a UPC-A value with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public UnableCreateUPCEException(
   string message,
   Exception innerException
);
[C++]
public: UnableCreateUPCEException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
UnableCreateUPCEException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

UnableCreateUPCEException Class | UnableCreateUPCEException Members | Overload List


%%PageItemTitle%%

UnableReadBitmapException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableReadBitmapException Class

This exception is thrown if the bitmap is unreadable.

For a list of all members of this type, see UnableReadBitmapException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.UnableReadBitmapException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class UnableReadBitmapException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class UnableReadBitmapException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class UnableReadBitmapException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class UnableReadBitmapException sealed : public BarcodeException

Remarks

If the bitmap passed in by the Analyze method is unreadable, possibly because of an invalid bitmap handle, it can trigger this exception.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

UnableReadBitmapException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

UnableReadBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableReadBitmapException Class

UnableReadBitmapException overview

Public Constructors

Public Constructor UnableReadBitmapException Constructor Overloaded. Generated base exception when unable to read the bitmap.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

UnableReadBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

UnableReadBitmapException Class | UnableReadBitmapException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableReadBitmapException Class : UnableReadBitmapException Constructor (UnableReadBitmapException)

Generated base exception when unable to read the bitmap.

Overload List

Generated base exception when unable to read the bitmap.

[Visual Basic] Public Sub New()

[C#] public UnableReadBitmapException();

[C++] public UnableReadBitmapException();

[C++/CLI] public UnableReadBitmapException();

Generated exception when unable to read the bitmap with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public UnableReadBitmapException(int);

[C++] public UnableReadBitmapException(int);

[C++/CLI] public UnableReadBitmapException(int);

Generated exception when unable to read the bitmap with a given message.

[Visual Basic] Public Sub New(String)

[C#] public UnableReadBitmapException(string);

[C++] public UnableReadBitmapException(string*);

[C++/CLI] public UnableReadBitmapException(String^);

Generated exception when unable to read the bitmap with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public UnableReadBitmapException(int,string);

[C++] public UnableReadBitmapException(int,string*);

[C++/CLI] public UnableReadBitmapException(int,String^);

Generated exception when unable to read the bitmap with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public UnableReadBitmapException(string,Exception);

[C++] public UnableReadBitmapException(string*,Exception*);

[C++/CLI] public UnableReadBitmapException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

UnableReadBitmapException Class | UnableReadBitmapException Members


%%PageItemTitle%%

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableReadBitmapException Class > UnableReadBitmapException Constructor : UnableReadBitmapException Constructor()

Generated base exception when unable to read the bitmap.

[Visual Basic]
Public Function New()
[C#]
public UnableReadBitmapException();
[C++]
public: UnableReadBitmapException();
[C++/CLI]
public:
UnableReadBitmapException();

Requirements

Platforms: See Getting Started section

See Also

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List


%%PageItemTitle%%

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableReadBitmapException Class > UnableReadBitmapException Constructor : UnableReadBitmapException Constructor(Int32)

Generated exception when unable to read the bitmap with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public UnableReadBitmapException(
   int errorNumber
);
[C++]
public: UnableReadBitmapException(
   int errorNumber
)
[C++/CLI]
public:
UnableReadBitmapException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List


%%PageItemTitle%%

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableReadBitmapException Class > UnableReadBitmapException Constructor : UnableReadBitmapException Constructor(Int32,String)

Generated exception when unable to read the bitmap with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public UnableReadBitmapException(
   int errorNumber,
   string message
);
[C++]
public: UnableReadBitmapException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
UnableReadBitmapException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List


%%PageItemTitle%%

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableReadBitmapException Class > UnableReadBitmapException Constructor : UnableReadBitmapException Constructor(String)

Generated exception when unable to read the bitmap with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public UnableReadBitmapException(
   string message
);
[C++]
public: UnableReadBitmapException(
   string* message
)
[C++/CLI]
public:
UnableReadBitmapException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List


%%PageItemTitle%%

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which reprents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnableReadBitmapException Class > UnableReadBitmapException Constructor : UnableReadBitmapException Constructor(String,Exception)

Generated exception when unable to read the bitmap with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public UnableReadBitmapException(
   string message,
   Exception innerException
);
[C++]
public: UnableReadBitmapException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
UnableReadBitmapException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which reprents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

UnableReadBitmapException Class | UnableReadBitmapException Members | Overload List


%%PageItemTitle%%

UnsupportBarcodeTypeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnsupportBarcodeTypeException Class

This exception is thrown if an unsupported barcode type is detected.

For a list of all members of this type, see UnsupportBarcodeTypeException members.

Inheritance Hierarchy

System.Object
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.UnsupportBarcodeTypeException

Syntax

[Visual Basic]
<SerializableAttribute()>
Public NotInheritable Class UnsupportBarcodeTypeException
   Inherits BarcodeException
[C#]
[SerializableAttribute()]
public sealed class UnsupportBarcodeTypeException : BarcodeException
[C++]
[SerializableAttribute()]
public __gc __sealed class UnsupportBarcodeTypeException : public BarcodeException
[C++/CLI]
[SerializableAttribute()]
public ref class UnsupportBarcodeTypeException sealed : public BarcodeException

Remarks

If the BarcodeType is set to a BarcodeType that is not write-supported, if may trigger this exception. For more details, see the Writer Class.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

UnsupportBarcodeTypeException Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

UnsupportBarcodeTypeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnsupportBarcodeTypeException Class

UnsupportBarcodeTypeException overview

Public Constructors

Public Constructor UnsupportBarcodeTypeException Constructor Overloaded. Generated base exception for an unsupported barcode type.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

UnsupportBarcodeTypeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnsupportBarcodeTypeException Class : UnsupportBarcodeTypeException Constructor (UnsupportBarcodeTypeException)

Generated base exception for an unsupported barcode type.

Overload List

Generated base exception for an unsupported barcode type.

[Visual Basic] Public Sub New()

[C#] public UnsupportBarcodeTypeException();

[C++] public UnsupportBarcodeTypeException();

[C++/CLI] public UnsupportBarcodeTypeException();

Generated exception for an unsupported barcode type with a given error number.

[Visual Basic] Public Sub New(Integer)

[C#] public UnsupportBarcodeTypeException(int);

[C++] public UnsupportBarcodeTypeException(int);

[C++/CLI] public UnsupportBarcodeTypeException(int);

Generated exception for an unsupported barcode type with a given message.

[Visual Basic] Public Sub New(String)

[C#] public UnsupportBarcodeTypeException(string);

[C++] public UnsupportBarcodeTypeException(string*);

[C++/CLI] public UnsupportBarcodeTypeException(String^);

Generated exception for an unsupported barcode type with a given error number and message.

[Visual Basic] Public Sub New(Integer,String)

[C#] public UnsupportBarcodeTypeException(int,string);

[C++] public UnsupportBarcodeTypeException(int,string*);

[C++/CLI] public UnsupportBarcodeTypeException(int,String^);

Generated exception for an unsupported barcode type with a given message and inner exception.

[Visual Basic] Public Sub New(String,Exception)

[C#] public UnsupportBarcodeTypeException(string,Exception);

[C++] public UnsupportBarcodeTypeException(string*,Exception*);

[C++/CLI] public UnsupportBarcodeTypeException(String^,Exception^);

Requirements

Platforms: See Getting Started section

See Also

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members


%%PageItemTitle%%

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Constructor()

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnsupportBarcodeTypeException Class > UnsupportBarcodeTypeException Constructor : UnsupportBarcodeTypeException Constructor()

Generated base exception for an unsupported barcode type.

[Visual Basic]
Public Function New()
[C#]
public UnsupportBarcodeTypeException();
[C++]
public: UnsupportBarcodeTypeException();
[C++/CLI]
public:
UnsupportBarcodeTypeException();

Requirements

Platforms: See Getting Started section

See Also

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List


%%PageItemTitle%%

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Constructor(Int32)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnsupportBarcodeTypeException Class > UnsupportBarcodeTypeException Constructor : UnsupportBarcodeTypeException Constructor(Int32)

Generated exception for an unsupported barcode type with a given error number.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer _
)
[C#]
public UnsupportBarcodeTypeException(
   int errorNumber
);
[C++]
public: UnsupportBarcodeTypeException(
   int errorNumber
)
[C++/CLI]
public:
UnsupportBarcodeTypeException(
   int errorNumber
)

Parameters

errorNumber
An integer which represents the error number.

Requirements

Platforms: See Getting Started section

See Also

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List


%%PageItemTitle%%

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

errorNumber
An integer which represents the error number.
message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Constructor(Int32,String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnsupportBarcodeTypeException Class > UnsupportBarcodeTypeException Constructor : UnsupportBarcodeTypeException Constructor(Int32,String)

Generated exception for an unsupported barcode type with a given error number and message.

[Visual Basic]
Public Function New( _
   ByVal errorNumber As Integer, _
   ByVal message As String _
)
[C#]
public UnsupportBarcodeTypeException(
   int errorNumber,
   string message
);
[C++]
public: UnsupportBarcodeTypeException(
   int errorNumber,
   string* message
)
[C++/CLI]
public:
UnsupportBarcodeTypeException(
   int errorNumber,
   String^ message
)

Parameters

errorNumber
An integer which represents the error number.
message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List


%%PageItemTitle%%

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Constructor(String)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnsupportBarcodeTypeException Class > UnsupportBarcodeTypeException Constructor : UnsupportBarcodeTypeException Constructor(String)

Generated exception for an unsupported barcode type with a given message.

[Visual Basic]
Public Function New( _
   ByVal message As String _
)
[C#]
public UnsupportBarcodeTypeException(
   string message
);
[C++]
public: UnsupportBarcodeTypeException(
   string* message
)
[C++/CLI]
public:
UnsupportBarcodeTypeException(
   String^ message
)

Parameters

message
A string which represents the message.

Requirements

Platforms: See Getting Started section

See Also

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List


%%PageItemTitle%%

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

message
A string which represents the message.
innerException
An inner exception from the base constructor.
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Constructor(String,Exception)

PegasusImaging.WinForms.BarcodeXpress5 Namespace > UnsupportBarcodeTypeException Class > UnsupportBarcodeTypeException Constructor : UnsupportBarcodeTypeException Constructor(String,Exception)

Generated exception for an unsupported barcode type with a given message and inner exception.

[Visual Basic]
Public Function New( _
   ByVal message As String, _
   ByVal innerException As Exception _
)
[C#]
public UnsupportBarcodeTypeException(
   string message,
   Exception innerException
);
[C++]
public: UnsupportBarcodeTypeException(
   string* message,
   Exception* innerException
)
[C++/CLI]
public:
UnsupportBarcodeTypeException(
   String^ message,
   Exception^ innerException
)

Parameters

message
A string which represents the message.
innerException
An inner exception from the base constructor.

Requirements

Platforms: See Getting Started section

See Also

UnsupportBarcodeTypeException Class | UnsupportBarcodeTypeException Members | Overload List


%%PageItemTitle%%

Writer Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Writer Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Writer Class (PegasusImaging.WinForms.BarcodeXpress5)

The Writer Class is inherited from the WriterBase Class and is used to create barcodes.

For a list of all members of this type, see Writer members.

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.WriterBase
PegasusImaging.WinForms.BarcodeXpress5.Writer

Syntax

[Visual Basic]
Public Class Writer
   Inherits WriterBase
[C#]
public class Writer : WriterBase
[C++]
public __gc class Writer : public WriterBase
[C++/CLI]
public ref class Writer : public WriterBase

Remarks

Written barcode types:

  • Industry 2 of 5
  • Interleaved 2 of 5
  • Industry 2 of 5
  • Codabar
  • Code 39
  • Code 39 Extended
  • Code 93
  • Code 93 Extended
  • Code128
  • DataMatrix
  • EAN 128
  • EAN 13 and JAN
  • EAN 8
  • UPCA
  • UPCE
  • PatchCode
  • PDF417

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

Writer Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

Writer Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Writer Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Writer Class (PegasusImaging.WinForms.BarcodeXpress5)

Writer overview

Public Constructors

Public Constructor Writer Constructor The main constructor for the Writer class

Public Properties

Public Property AdjustBarWidth (Inherited from WriterBase) | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize (Inherited from WriterBase) | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData (Inherited from WriterBase) | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeType | Gets and sets the type of barcode to create.
Public Property BarcodeValue (Inherited from WriterBase) | Gets and sets the value of the barcode to be created.
Public Property BarWidth (Inherited from WriterBase) | Gets the bar width in pixels of a bar that was created.
Public Property CheckSum | Gets and sets the checksum write flag for barcodes that optionally use checksums.
Public Property Height (Inherited from WriterBase) | Gets and sets the height of the image in pixels.
Public Property HorizontalTextGap | Gets and sets the amount of gap between the outside text and the barcode when creating a barcode.
Public Property HorizontalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight (Inherited from WriterBase) | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth (Inherited from WriterBase) | Gets and sets the minimum bar width when creating a barcode.
Public Property OutsideTextFont | Gets and sets the font used to display the UPC values that appear outside of the left and right guard bars.
Public Property OutsideVerticalTextOffset | Gets and sets the vertical offset text.
Public Property RequiredHeight (Inherited from WriterBase) | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth (Inherited from WriterBase) | Gets and sets the required width of the image in pixels based on the current settings.
Public Property ShowText | Gets and sets if the barcode value is written as text adjacent to the created barcode.
Public Property TextFont | Gets and sets the font of the barcode written as text adjacent to the barcode being created.
Public Property TextNotchPercent | Gets and sets the notch percent of the barcode for the text value.
Public Property VerticalTextGap | Gets and sets the amount of gap between the text and the barcode when creating a barcode.
Public Property VerticalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width (Inherited from WriterBase) | Gets and sets the width of the image in pixels.

Public Methods

Public Method Create (Inherited from WriterBase) | The main method for creating barcodes.
Public Method CreateBitmap (Inherited from WriterBase) | The method for creating bitmap barcodes.
Public Method Dispose (Inherited from WriterBase) | Disposes of unmanaged resources.

See Also

Writer Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

barcodeParent
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Writer Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : Writer Constructor (Writer)

The main constructor for the Writer class

[Visual Basic]
Public Function New( _
   ByVal barcodeParent As BarcodeXpress _
)
[C#]
public Writer(
   BarcodeXpress barcodeParent
);
[C++]
public: Writer(
   BarcodeXpress* barcodeParent
)
[C++/CLI]
public:
Writer(
   BarcodeXpress^ barcodeParent
)

Parameters

barcodeParent

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%% $$Properties$$

Writer Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Writer Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Writer Class (PegasusImaging.WinForms.BarcodeXpress5)

For a list of all members of this type, see Writer members.

Public Properties

Public Property AdjustBarWidth (Inherited from WriterBase) | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize (Inherited from WriterBase) | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData (Inherited from WriterBase) | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeType | Gets and sets the type of barcode to create.
Public Property BarcodeValue (Inherited from WriterBase) | Gets and sets the value of the barcode to be created.
Public Property BarWidth (Inherited from WriterBase) | Gets the bar width in pixels of a bar that was created.
Public Property CheckSum | Gets and sets the checksum write flag for barcodes that optionally use checksums.
Public Property Height (Inherited from WriterBase) | Gets and sets the height of the image in pixels.
Public Property HorizontalTextGap | Gets and sets the amount of gap between the outside text and the barcode when creating a barcode.
Public Property HorizontalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight (Inherited from WriterBase) | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth (Inherited from WriterBase) | Gets and sets the minimum bar width when creating a barcode.
Public Property OutsideTextFont | Gets and sets the font used to display the UPC values that appear outside of the left and right guard bars.
Public Property OutsideVerticalTextOffset | Gets and sets the vertical offset text.
Public Property RequiredHeight (Inherited from WriterBase) | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth (Inherited from WriterBase) | Gets and sets the required width of the image in pixels based on the current settings.
Public Property ShowText | Gets and sets if the barcode value is written as text adjacent to the created barcode.
Public Property TextFont | Gets and sets the font of the barcode written as text adjacent to the barcode being created.
Public Property TextNotchPercent | Gets and sets the notch percent of the barcode for the text value.
Public Property VerticalTextGap | Gets and sets the amount of gap between the text and the barcode when creating a barcode.
Public Property VerticalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width (Inherited from WriterBase) | Gets and sets the width of the image in pixels.

See Also

Writer Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

Writer Class | Writer Members | Writer Class | BarcodeType Property

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeType Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : BarcodeType Property (Writer)

Gets and sets the type of barcode to create.

[Visual Basic]
Public Property BarcodeType As BarcodeType
[C#]
public BarcodeType BarcodeType {get; set;}
[C++]
public: __property BarcodeType get_BarcodeType();
public: __property void set_BarcodeType(
   BarcodeType value
);
[C++/CLI]
public:
property BarcodeType BarcodeType {
   BarcodeType get();
   void set (BarcodeType value);
}

Remarks

Required to create a barcode. When set, the BarcodeType property verifies the specified type is valid for writing. If not, the UnsupportBarcodeTypeException exception is thrown.

Below are the barcode types which can be written:

  • Industry 2 of 5
  • Interleaved 2 of 5
  • Codabar
  • Code 39
  • Code 39 Extended
  • Code 93
  • Code 93 Extended
  • Code 128
  • DataMatrix
  • EAN 128
  • EAN-13 or JAN
  • EAN 8
  • UPCA
  • UPCE
  • PatchCode
  • PDF417

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members | Writer Class | BarcodeType Property


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

CheckSum Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : CheckSum Property

Gets and sets the checksum write flag for barcodes that optionally use checksums.

[Visual Basic]
Public Property CheckSum As Integer
[C#]
public int CheckSum {get; set;}
[C++]
public: __property int get_CheckSum();
public: __property void set_CheckSum(
   int value
);
[C++/CLI]
public:
property int CheckSum {
   int get();
   void set (int value);
}

Remarks

A value of 1 will write optional check sums, and a value of 0 will not write optional check sums.

Currently, of the supported barcode types that BarcodeXpress can write, only types Industry 2 of 5, Interleaved 2 of 5, Code 39, and Code 39 Extended allows an optional check sum. This property is ignored for other barcode types that require check sums.

Default value: 0 (False)

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

HorizontalTextGap Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : HorizontalTextGap Property

Gets and sets the amount of gap between the outside text and the barcode when creating a barcode.

[Visual Basic]
Public Property HorizontalTextGap As Integer
[C#]
public int HorizontalTextGap {get; set;}
[C++]
public: __property int get_HorizontalTextGap();
public: __property void set_HorizontalTextGap(
   int value
);
[C++/CLI]
public:
property int HorizontalTextGap {
   int get();
   void set (int value);
}

Remarks

Outside text is only written with certain barcodes where this is standard. The barcode types that support a text notch are UPC-A, UPC-E, EAN-8 and EAN-13. For all other types, this value is ignored.

Default value: 5 pixels

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutsideTextFont Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : OutsideTextFont Property

Gets and sets the font used to display the UPC values that appear outside of the left and right guard bars.

[Visual Basic]
Public Property OutsideTextFont As Font
[C#]
public Font OutsideTextFont {get; set;}
[C++]
public: __property Font get_OutsideTextFont();
public: __property void set_OutsideTextFont(
   Font value
);
[C++/CLI]
public:
property Font OutsideTextFont {
   Font get();
   void set (Font value);
}

Remarks

Outside value text is only written for certain barcodes where this is standard. The barcode types that support outside text are UPC-A, UPC-E, EAN-8 and EAN-13. For all other types, this value is ignored.

Default value: Arial, 16, Normal

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutsideVerticalTextOffset Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : OutsideVerticalTextOffset Property

Gets and sets the vertical offset text.

[Visual Basic]
Public Property OutsideVerticalTextOffset As Integer
[C#]
public int OutsideVerticalTextOffset {get; set;}
[C++]
public: __property int get_OutsideVerticalTextOffset();
public: __property void set_OutsideVerticalTextOffset(
   int value
);
[C++/CLI]
public:
property int OutsideVerticalTextOffset {
   int get();
   void set (int value);
}

Remarks

A value less than 0 will raise the outside value text above the standard value text. A value greater than 0 will lower the outside value text below the standard value text.

Outside value text is only written for certain barcodes where this is standard. The barcode types that support outside text are UPC-A, UPC-E, EAN-8 and EAN-13. For all other types this value is ignored.

Default value: 0 pixels

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ShowText Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : ShowText Property (Writer)

Gets and sets if the barcode value is written as text adjacent to the created barcode.

[Visual Basic]
Public Property ShowText As ShowTextInfo
[C#]
public ShowTextInfo ShowText {get; set;}
[C++]
public: __property ShowTextInfo get_ShowText();
public: __property void set_ShowText(
   ShowTextInfo value
);
[C++/CLI]
public:
property ShowTextInfo ShowText {
   ShowTextInfo get();
   void set (ShowTextInfo value);
}

Remarks

Default value: All

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TextFont Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : TextFont Property

Gets and sets the font of the barcode written as text adjacent to the barcode being created.

[Visual Basic]
Public Property TextFont As Font
[C#]
public Font TextFont {get; set;}
[C++]
public: __property Font get_TextFont();
public: __property void set_TextFont(
   Font value
);
[C++/CLI]
public:
property Font TextFont {
   Font get();
   void set (Font value);
}

Remarks

Default value: Arial, 16, Normal

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TextNotchPercent Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : TextNotchPercent Property

Gets and sets the notch percent of the barcode for the text value.

[Visual Basic]
Public Property TextNotchPercent As Integer
[C#]
public int TextNotchPercent {get; set;}
[C++]
public: __property int get_TextNotchPercent();
public: __property void set_TextNotchPercent(
   int value
);
[C++/CLI]
public:
property int TextNotchPercent {
   int get();
   void set (int value);
}

Remarks

This property is used by supported barcodes UPC-A and EAN13. Otherwise this value is ignored.

Notch percent is only used with certain barcodes where this is standard. The barcode types that support a text notch are UPC-A, UPC-E, EAN-8 and EAN-13.

Default value: 10 percent.

Valid values: 0 - 50

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

Writer Class | Writer Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

VerticalTextGap Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > Writer Class : VerticalTextGap Property

Gets and sets the amount of gap between the text and the barcode when creating a barcode.

[Visual Basic]
Public Property VerticalTextGap As Integer
[C#]
public int VerticalTextGap {get; set;}
[C++]
public: __property int get_VerticalTextGap();
public: __property void set_VerticalTextGap(
   int value
);
[C++/CLI]
public:
property int VerticalTextGap {
   int get();
   void set (int value);
}

Remarks

This property value can be positive or negative. Positive values move the value text further away from the bottom of the bars while negative values move the text closer to the bars, even overlapping.

Note: In the case where the value text overlaps the barcode, this may prevent the barcode from being recognized.

Default value: 5 pixels

Requirements

Platforms: See Getting Started section

See Also

Writer Class | Writer Members


%%PageItemTitle%%

WriterBase Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterBase Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterBase Class

The WriterBase Class includes properties used to write barcode recognition results.

For a list of all members of this type, see WriterBase members.

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.WriterBase
PegasusImaging.WinForms.BarcodeXpress5.WriterPDF417
PegasusImaging.WinForms.BarcodeXpress5.WriterDataMatrix
PegasusImaging.WinForms.BarcodeXpress5.Writer

Syntax

[Visual Basic]
Public Class WriterBase
[C#]
public class WriterBase
[C++]
public __gc class WriterBase
[C++/CLI]
public ref class WriterBase

Remarks

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

WriterBase Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

WriterBase Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterBase Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterBase Class

WriterBase overview

Public Constructors

Public Constructor WriterBase Constructor This class is the base class which the Writer class inherits from.

Public Properties

Public Property AdjustBarWidth | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeValue | Gets and sets the value of the barcode to be created.
Public Property BarWidth | Gets the bar width in pixels of a bar that was created.
Public Property Height | Gets and sets the height of the image in pixels.
Public Property HorizontalWhiteSpace | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth | Gets and sets the minimum bar width when creating a barcode.
Public Property RequiredHeight | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth | Gets and sets the required width of the image in pixels based on the current settings.
Public Property ShowText | Gets and sets the display level of the barcode value written as text adjacent to the created barcode.
Public Property VerticalWhiteSpace | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width | Gets and sets the width of the image in pixels.

Public Methods

Public Method Create | The main method for creating barcodes.
Public Method CreateBitmap | The method for creating bitmap barcodes.
Public Method Dispose | Disposes of unmanaged resources.

See Also

WriterBase Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

barcodeParent
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterBase Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : WriterBase Constructor (WriterBase)

This class is the base class which the Writer class inherits from.

[Visual Basic]
Public Function New( _
   ByVal barcodeParent As BarcodeXpress _
)
[C#]
public WriterBase(
   BarcodeXpress barcodeParent
);
[C++]
public: WriterBase(
   BarcodeXpress* barcodeParent
)
[C++/CLI]
public:
WriterBase(
   BarcodeXpress^ barcodeParent
)

Parameters

barcodeParent

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Create Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : Create Method

The main method for creating barcodes.

[Visual Basic]
Public Function Create() As Integer
[C#]
public int Create();
[C++]
public: int Create();
[C++/CLI]
public:
int Create();

Remarks

The Create method returns the handle of the newly created DIB containing the barcode.

It is the responsibility of the caller to free this resource when the DIB is no longer needed.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

CreateBitmap Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : CreateBitmap Method

The method for creating bitmap barcodes.

[Visual Basic]
Public Function CreateBitmap() As Bitmap
[C#]
public Bitmap CreateBitmap();
[C++]
public: Bitmap CreateBitmap();
[C++/CLI]
public:
Bitmap CreateBitmap();

Remarks

The CreateBitmap method returns a bitmap barcode.

It is the responsibility of the caller to free this resource when no longer needed using the Dispose method.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Dispose Method

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : Dispose Method

Disposes of unmanaged resources.

[Visual Basic]
Public Sub Dispose()
[C#]
public void Dispose();
[C++]
public: void Dispose();
[C++/CLI]
public:
void Dispose();

Remarks

This method is part of the IDisposable interface.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%% $$Properties$$

WriterBase Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterBase Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterBase Class

For a list of all members of this type, see WriterBase members.

Public Properties

Public Property AdjustBarWidth | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeValue | Gets and sets the value of the barcode to be created.
Public Property BarWidth | Gets the bar width in pixels of a bar that was created.
Public Property Height | Gets and sets the height of the image in pixels.
Public Property HorizontalWhiteSpace | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth | Gets and sets the minimum bar width when creating a barcode.
Public Property RequiredHeight | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth | Gets and sets the required width of the image in pixels based on the current settings.
Public Property ShowText | Gets and sets the display level of the barcode value written as text adjacent to the created barcode.
Public Property VerticalWhiteSpace | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width | Gets and sets the width of the image in pixels.

See Also

WriterBase Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

AdjustBarWidth Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : AdjustBarWidth Property

Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.

[Visual Basic]
Public Property AdjustBarWidth As Boolean
[C#]
public bool AdjustBarWidth {get; set;}
[C++]
public: __property bool get_AdjustBarWidth();
public: __property void set_AdjustBarWidth(
   bool value
);
[C++/CLI]
public:
property bool AdjustBarWidth {
   bool get();
   void set (bool value);
}

Remarks

This property gets and sets an indicator to allow barcode bar width dynamic adjustment during barcode creation.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

AutoSize Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : AutoSize Property

Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.

[Visual Basic]
Public Property AutoSize As Boolean
[C#]
public bool AutoSize {get; set;}
[C++]
public: __property bool get_AutoSize();
public: __property void set_AutoSize(
   bool value
);
[C++/CLI]
public:
property bool AutoSize {
   bool get();
   void set (bool value);
}

Remarks

The default value is true.

When this property is set to true, the component will calculate the required height and width of the output image during barcode creation.

The image height and width are calculated using the barcode value, minimum bar width, horizontal gaps, vertical gaps and the size of the text font. If the calculated height or width is greater than the user input height and width, the image size will be increased to create the barcode.

When this property is set to false, the component will use the RequiredHeight and RequiredWidth parameters.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeData Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : BarcodeData Property (WriterBase)

Gets and sets the current barcode value as an array of bytes.

[Visual Basic]
Public Property BarcodeData As Byte()
[C#]
public byte[] BarcodeData {get; set;}
[C++]
public: __property byte[]* get_BarcodeData();
public: __property void set_BarcodeData(
   byte[]* value
);
[C++/CLI]
public:
property array<byte>^ BarcodeData {
   array<byte>^ get();
   void set (bytearray<value>^ value);
}

Remarks

The default valueis an empty string "".

Use BarcodeData property only if non-ASCII text values are needed.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeValue Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : BarcodeValue Property (WriterBase)

Gets and sets the value of the barcode to be created.

[Visual Basic]
Public Property BarcodeValue As String
[C#]
public string BarcodeValue {get; set;}
[C++]
public: __property string* get_BarcodeValue();
public: __property void set_BarcodeValue(
   string* value
);
[C++/CLI]
public:
property String^ BarcodeValue {
   String^ get();
   void set (String^ value);
}

Remarks

The default valueis an empty string "".

Use BarcodeData property only if non-ASCII text values are needed.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarWidth Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : BarWidth Property

Gets the bar width in pixels of a bar that was created.

[Visual Basic]
Public ReadOnly Property BarWidth As Integer
[C#]
public int BarWidth {get;}
[C++]
public: __property int get_BarWidth();
[C++/CLI]
public:
property int BarWidth {
   int get();
}

Remarks

The value is the number of pixels which make up the width of the bar.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Height Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : Height Property

Gets and sets the height of the image in pixels.

[Visual Basic]
Public Property Height As Integer
[C#]
public int Height {get; set;}
[C++]
public: __property int get_Height();
public: __property void set_Height(
   int value
);
[C++/CLI]
public:
property int Height {
   int get();
   void set (int value);
}

Remarks

The default valueis 600.

The value is the number of pixels it takes to make the height of the barcode image.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

HorizontalWhiteSpace Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : HorizontalWhiteSpace Property

Gets and sets the amount of white space on the sides of the barcode during creation.

[Visual Basic]
Public Property HorizontalWhiteSpace As Integer
[C#]
public int HorizontalWhiteSpace {get; set;}
[C++]
public: __property int get_HorizontalWhiteSpace();
public: __property void set_HorizontalWhiteSpace(
   int value
);
[C++/CLI]
public:
property int HorizontalWhiteSpace {
   int get();
   void set (int value);
}

Remarks

The default value is 50.

The white space surrounding the barcode is also known as the quiet zone. The component requires a quiet zone for accurate barcode detection.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

MinimumBarHeight Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : MinimumBarHeight Property

Gets and sets the minimum height of the bars when creating a barcode.

[Visual Basic]
Public Property MinimumBarHeight As Integer
[C#]
public int MinimumBarHeight {get; set;}
[C++]
public: __property int get_MinimumBarHeight();
public: __property void set_MinimumBarHeight(
   int value
);
[C++/CLI]
public:
property int MinimumBarHeight {
   int get();
   void set (int value);
}

Remarks

The default value is 100 (PDF417 should set this value between 3 and 5)

This value is used to set the bar height in 1D barcodes. PDF417 uses this value as a multiplier of the minimum barcode width to set the row module height.

This property does not affect DataMatrix.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

MinimumBarWidth Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : MinimumBarWidth Property

Gets and sets the minimum bar width when creating a barcode.

[Visual Basic]
Public Property MinimumBarWidth As Integer
[C#]
public int MinimumBarWidth {get; set;}
[C++]
public: __property int get_MinimumBarWidth();
public: __property void set_MinimumBarWidth(
   int value
);
[C++/CLI]
public:
property int MinimumBarWidth {
   int get();
   void set (int value);
}

Remarks

The default value is 3.

This value is used to set the bar width in 1D and PDF417 barcodes and the module size (black and white squares that make up the barcode) in DataMatrix barcode.

This value will be overridden if AdjustBarWidth parameter is set to true.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RequiredHeight Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : RequiredHeight Property

Gets and sets the required height of the image in pixels based on the current settings.

[Visual Basic]
Public ReadOnly Property RequiredHeight As Integer
[C#]
public int RequiredHeight {get;}
[C++]
public: __property int get_RequiredHeight();
[C++/CLI]
public:
property int RequiredHeight {
   int get();
}

Remarks

The required height is the sum of the minimum bar height + 2 * vertical spacing + the space required for the text (if displayed).

This is the required height given the input parameters to create a barcode image. It is only valid after trying to make the barcode.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RequiredWidth Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : RequiredWidth Property

Gets and sets the required width of the image in pixels based on the current settings.

[Visual Basic]
Public ReadOnly Property RequiredWidth As Integer
[C#]
public int RequiredWidth {get;}
[C++]
public: __property int get_RequiredWidth();
[C++/CLI]
public:
property int RequiredWidth {
   int get();
}

Remarks

The required width is the size of the barcode value bars * bar width + 2 * horizontal spacing + size of the outside text (if displayed). The bar should either be the minimal bar width or the calculated bar width if the AdjustBarWidth property is set to true.

This is the required width given the input parameters to create a barcode image. It is only valid after trying to make the barcode.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ShowText Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : ShowText Property (WriterBase)

Gets and sets the display level of the barcode value written as text adjacent to the created barcode.

[Visual Basic]
Public Property ShowText As ShowTextInfo
[C#]
public ShowTextInfo ShowText {get; set;}
[C++]
public: __property ShowTextInfo get_ShowText();
public: __property void set_ShowText(
   ShowTextInfo value
);
[C++/CLI]
public:
property ShowTextInfo ShowText {
   ShowTextInfo get();
   void set (ShowTextInfo value);
}

Remarks

The default value is All.

This property determines if the barcode value is written as text adjacent to the created barcode.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

VerticalWhiteSpace Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : VerticalWhiteSpace Property

Gets and sets the amount of white space above and below the barcode during creation.

[Visual Basic]
Public Property VerticalWhiteSpace As Integer
[C#]
public int VerticalWhiteSpace {get; set;}
[C++]
public: __property int get_VerticalWhiteSpace();
public: __property void set_VerticalWhiteSpace(
   int value
);
[C++/CLI]
public:
property int VerticalWhiteSpace {
   int get();
   void set (int value);
}

Remarks

The default value is 50.

The white space surrounding the barcode is also known as the quiet zone. The component requires a quiet zone for accurate barcode detection.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterBase Class | WriterBase Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Width Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterBase Class : Width Property

Gets and sets the width of the image in pixels.

[Visual Basic]
Public Property Width As Integer
[C#]
public int Width {get; set;}
[C++]
public: __property int get_Width();
public: __property void set_Width(
   int value
);
[C++/CLI]
public:
property int Width {
   int get();
   void set (int value);
}

Remarks

The default value is 600.

The value is the number of pixels it takes to make the width of the barcode image.

Requirements

Platforms: See Getting Started section

See Also

WriterBase Class | WriterBase Members


%%PageItemTitle%%

WriterDataMatrix Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterDataMatrix Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterDataMatrix Class

WriterDataMatrix extends the writer class to include the writing of DataMatrix barcodes.

For a list of all members of this type, see WriterDataMatrix members.

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.WriterBase
PegasusImaging.WinForms.BarcodeXpress5.WriterDataMatrix

Syntax

[Visual Basic]
Public Class WriterDataMatrix
   Inherits WriterBase
[C#]
public class WriterDataMatrix : WriterBase
[C++]
public __gc class WriterDataMatrix : public WriterBase
[C++/CLI]
public ref class WriterDataMatrix : public WriterBase

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

WriterDataMatrix Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

WriterDataMatrix Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterDataMatrix Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterDataMatrix Class

WriterDataMatrix overview

Public Constructors

Public Constructor WriterDataMatrix Constructor Creates an instance of the WriterDataMatrix class. It requires an instance to the barcode component.

Public Properties

Public Property AdjustBarWidth (Inherited from WriterBase) | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize (Inherited from WriterBase) | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData (Inherited from WriterBase) | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeValue (Inherited from WriterBase) | Gets and sets the value of the barcode to be created.
Public Property BarWidth (Inherited from WriterBase) | Gets the bar width in pixels of a bar that was created.
Public Property Height (Inherited from WriterBase) | Gets and sets the height of the image in pixels.
Public Property HorizontalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight (Inherited from WriterBase) | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth (Inherited from WriterBase) | Gets and sets the minimum bar width when creating a barcode.
Public Property RequiredHeight (Inherited from WriterBase) | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth (Inherited from WriterBase) | Gets and sets the required width of the image in pixels based on the current settings.
Public Property RowsAndColumns | Gets and sets the number of rows and columns desired in creating a DataMatrix barcode.
Public Property RowsAndColumnsCreated | Gets the number of rows and columns created in the DataMatrix barcode.
Public Property ShowText (Inherited from WriterBase) | Gets and sets the display level of the barcode value written as text adjacent to the created barcode.
Public Property VerticalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width (Inherited from WriterBase) | Gets and sets the width of the image in pixels.

Public Methods

Public Method Create (Inherited from WriterBase) | The main method for creating barcodes.
Public Method CreateBitmap (Inherited from WriterBase) | The method for creating bitmap barcodes.
Public Method Dispose (Inherited from WriterBase) | Disposes of unmanaged resources.

See Also

WriterDataMatrix Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

WriterDataMatrix Class | WriterDataMatrix Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

barcodeParent
Instance of the barcode control
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterDataMatrix Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterDataMatrix Class : WriterDataMatrix Constructor (WriterDataMatrix)

Creates an instance of the WriterDataMatrix class. It requires an instance to the barcode component.

[Visual Basic]
Public Function New( _
   ByVal barcodeParent As BarcodeXpress _
)
[C#]
public WriterDataMatrix(
   BarcodeXpress barcodeParent
);
[C++]
public: WriterDataMatrix(
   BarcodeXpress* barcodeParent
)
[C++/CLI]
public:
WriterDataMatrix(
   BarcodeXpress^ barcodeParent
)

Parameters

barcodeParent
Instance of the barcode control

Requirements

Platforms: See Getting Started section

See Also

WriterDataMatrix Class | WriterDataMatrix Members


%%PageItemTitle%% $$Properties$$

WriterDataMatrix Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterDataMatrix Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterDataMatrix Class

For a list of all members of this type, see WriterDataMatrix members.

Public Properties

Public Property AdjustBarWidth (Inherited from WriterBase) | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize (Inherited from WriterBase) | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData (Inherited from WriterBase) | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeValue (Inherited from WriterBase) | Gets and sets the value of the barcode to be created.
Public Property BarWidth (Inherited from WriterBase) | Gets the bar width in pixels of a bar that was created.
Public Property Height (Inherited from WriterBase) | Gets and sets the height of the image in pixels.
Public Property HorizontalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight (Inherited from WriterBase) | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth (Inherited from WriterBase) | Gets and sets the minimum bar width when creating a barcode.
Public Property RequiredHeight (Inherited from WriterBase) | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth (Inherited from WriterBase) | Gets and sets the required width of the image in pixels based on the current settings.
Public Property RowsAndColumns | Gets and sets the number of rows and columns desired in creating a DataMatrix barcode.
Public Property RowsAndColumnsCreated | Gets the number of rows and columns created in the DataMatrix barcode.
Public Property ShowText (Inherited from WriterBase) | Gets and sets the display level of the barcode value written as text adjacent to the created barcode.
Public Property VerticalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width (Inherited from WriterBase) | Gets and sets the width of the image in pixels.

See Also

WriterDataMatrix Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

WriterDataMatrix Class | WriterDataMatrix Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowsAndColumns Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterDataMatrix Class : RowsAndColumns Property

Gets and sets the number of rows and columns desired in creating a DataMatrix barcode.

[Visual Basic]
Public Property RowsAndColumns As DataMatrixSizes
[C#]
public DataMatrixSizes RowsAndColumns {get; set;}
[C++]
public: __property DataMatrixSizes get_RowsAndColumns();
public: __property void set_RowsAndColumns(
   DataMatrixSizes value
);
[C++/CLI]
public:
property DataMatrixSizes RowsAndColumns {
   DataMatrixSizes get();
   void set (DataMatrixSizes value);
}

Remarks

The range is obtained from the DataMatrixSizes enumeration where AutoRowsAndColumns is the default.

Requirements

Platforms: See Getting Started section

See Also

WriterDataMatrix Class | WriterDataMatrix Members


%%PageItemTitle%%

WriterDataMatrix Class | WriterDataMatrix Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowsAndColumnsCreated Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterDataMatrix Class : RowsAndColumnsCreated Property

Gets the number of rows and columns created in the DataMatrix barcode.

[Visual Basic]
Public ReadOnly Property RowsAndColumnsCreated As DataMatrixSizes
[C#]
public DataMatrixSizes RowsAndColumnsCreated {get;}
[C++]
public: __property DataMatrixSizes get_RowsAndColumnsCreated();
[C++/CLI]
public:
property DataMatrixSizes RowsAndColumnsCreated {
   DataMatrixSizes get();
}

Remarks

The value is a range from DataMatrixSizes read from the RowsAndColumns property.

Requirements

Platforms: See Getting Started section

See Also

WriterDataMatrix Class | WriterDataMatrix Members


%%PageItemTitle%%

WriterPDF417 Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Requirements Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterPDF417 Class

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterPDF417 Class

WriterPDF417 extends the writer class to include the writing of PDF417 barcodes.

For a list of all members of this type, see WriterPDF417 members.

Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.WriterBase
PegasusImaging.WinForms.BarcodeXpress5.WriterPDF417

Syntax

[Visual Basic]
Public Class WriterPDF417
   Inherits WriterBase
[C#]
public class WriterPDF417 : WriterBase
[C++]
public __gc class WriterPDF417 : public WriterBase
[C++/CLI]
public ref class WriterPDF417 : public WriterBase

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

WriterPDF417 Members | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Members$$

WriterPDF417 Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterPDF417 Class Members

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterPDF417 Class

WriterPDF417 overview

Public Constructors

Public Constructor WriterPDF417 Constructor Creates an instance of the WriterPDF417 class. It requires an instance to the barcode component.

Public Properties

Public Property AdjustBarWidth (Inherited from WriterBase) | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize (Inherited from WriterBase) | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData (Inherited from WriterBase) | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeValue (Inherited from WriterBase) | Gets and sets the value of the barcode to be created.
Public Property BarWidth (Inherited from WriterBase) | Gets the bar width in pixels of a bar that was created.
Public Property Columns | Gets and sets the number of columns desired in the PDF417 barcode.
Public Property ColumnsCreated | Gets the columns created in the PDF417 barcode.
Public Property ErrorCorrectionLevel | Gets and sets the error correction level desired in the PDF417 barcode.
Public Property ErrorCorrectionLevelUsed | Gets the error correction level used in creating the PDF417 barcode.
Public Property Height (Inherited from WriterBase) | Gets and sets the height of the image in pixels.
Public Property HorizontalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight (Inherited from WriterBase) | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth (Inherited from WriterBase) | Gets and sets the minimum bar width when creating a barcode.
Public Property RequiredHeight (Inherited from WriterBase) | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth (Inherited from WriterBase) | Gets and sets the required width of the image in pixels based on the current settings.
Public Property Rows | Gets and sets the number of rows desired in the PDF417 barcode.
Public Property RowsCreated | Gets the rows created in the PDF417 barcode.
Public Property ShowText (Inherited from WriterBase) | Gets and sets the display level of the barcode value written as text adjacent to the created barcode.
Public Property VerticalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width (Inherited from WriterBase) | Gets and sets the width of the image in pixels.

Public Methods

Public Method Create (Inherited from WriterBase) | The main method for creating barcodes.
Public Method CreateBitmap (Inherited from WriterBase) | The method for creating bitmap barcodes.
Public Method Dispose (Inherited from WriterBase) | Disposes of unmanaged resources.

See Also

WriterPDF417 Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

barcodeParent
Instance of the barcode control
See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterPDF417 Constructor

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : WriterPDF417 Constructor (WriterPDF417)

Creates an instance of the WriterPDF417 class. It requires an instance to the barcode component.

[Visual Basic]
Public Function New( _
   ByVal barcodeParent As BarcodeXpress _
)
[C#]
public WriterPDF417(
   BarcodeXpress barcodeParent
);
[C++]
public: WriterPDF417(
   BarcodeXpress* barcodeParent
)
[C++/CLI]
public:
WriterPDF417(
   BarcodeXpress^ barcodeParent
)

Parameters

barcodeParent
Instance of the barcode control

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%% $$Properties$$

WriterPDF417 Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterPDF417 Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterPDF417 Class

For a list of all members of this type, see WriterPDF417 members.

Public Properties

Public Property AdjustBarWidth (Inherited from WriterBase) | Gets and sets a flag indicating if dynamic adjustment of the bar widths during barcode creation are allowed.
Public Property AutoSize (Inherited from WriterBase) | Gets and sets a flag indicating if the barcode area is automatically sized during barcode creation.
Public Property BarcodeData (Inherited from WriterBase) | Gets and sets the current barcode value as an array of bytes.
Public Property BarcodeValue (Inherited from WriterBase) | Gets and sets the value of the barcode to be created.
Public Property BarWidth (Inherited from WriterBase) | Gets the bar width in pixels of a bar that was created.
Public Property Columns | Gets and sets the number of columns desired in the PDF417 barcode.
Public Property ColumnsCreated | Gets the columns created in the PDF417 barcode.
Public Property ErrorCorrectionLevel | Gets and sets the error correction level desired in the PDF417 barcode.
Public Property ErrorCorrectionLevelUsed | Gets the error correction level used in creating the PDF417 barcode.
Public Property Height (Inherited from WriterBase) | Gets and sets the height of the image in pixels.
Public Property HorizontalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space on the sides of the barcode during creation.
Public Property MinimumBarHeight (Inherited from WriterBase) | Gets and sets the minimum height of the bars when creating a barcode.
Public Property MinimumBarWidth (Inherited from WriterBase) | Gets and sets the minimum bar width when creating a barcode.
Public Property RequiredHeight (Inherited from WriterBase) | Gets and sets the required height of the image in pixels based on the current settings.
Public Property RequiredWidth (Inherited from WriterBase) | Gets and sets the required width of the image in pixels based on the current settings.
Public Property Rows | Gets and sets the number of rows desired in the PDF417 barcode.
Public Property RowsCreated | Gets the rows created in the PDF417 barcode.
Public Property ShowText (Inherited from WriterBase) | Gets and sets the display level of the barcode value written as text adjacent to the created barcode.
Public Property VerticalWhiteSpace (Inherited from WriterBase) | Gets and sets the amount of white space above and below the barcode during creation.
Public Property Width (Inherited from WriterBase) | Gets and sets the width of the image in pixels.

See Also

WriterPDF417 Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Columns Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : Columns Property

Gets and sets the number of columns desired in the PDF417 barcode.

[Visual Basic]
Public Property Columns As Integer
[C#]
public int Columns {get; set;}
[C++]
public: __property int get_Columns();
public: __property void set_Columns(
   int value
);
[C++/CLI]
public:
property int Columns {
   int get();
   void set (int value);
}

Remarks

The default value is -1.

If the value is -1 then the number of columns will be determined when the barcode is created.

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnsCreated Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : ColumnsCreated Property

Gets the columns created in the PDF417 barcode.

[Visual Basic]
Public ReadOnly Property ColumnsCreated As Integer
[C#]
public int ColumnsCreated {get;}
[C++]
public: __property int get_ColumnsCreated();
[C++/CLI]
public:
property int ColumnsCreated {
   int get();
}

Remarks

This property gets the number of columns that were created in the PDF417 barcode.

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevel Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : ErrorCorrectionLevel Property

Gets and sets the error correction level desired in the PDF417 barcode.

[Visual Basic]
Public Property ErrorCorrectionLevel As PDF417ErrorCorrectionLevel
[C#]
public PDF417ErrorCorrectionLevel ErrorCorrectionLevel {get; set;}
[C++]
public: __property PDF417ErrorCorrectionLevel get_ErrorCorrectionLevel();
public: __property void set_ErrorCorrectionLevel(
   PDF417ErrorCorrectionLevel value
);
[C++/CLI]
public:
property PDF417ErrorCorrectionLevel ErrorCorrectionLevel {
   PDF417ErrorCorrectionLevel get();
   void set (PDF417ErrorCorrectionLevel value);
}

Remarks

The PDF417ErrorCorrectionLevel value set.
The default value is ErrorCorrectionAuto.

The error correction level for the PDF417 ranges from ErrorCorrection0 to a high of ErrorCorrection8. A high error correction level should be used in application where symbol damage is expected. It is recomended that the ErrorCorrectionAuto level be used in most cases.

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelUsed Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : ErrorCorrectionLevelUsed Property

Gets the error correction level used in creating the PDF417 barcode.

[Visual Basic]
Public ReadOnly Property ErrorCorrectionLevelUsed As PDF417ErrorCorrectionLevel
[C#]
public PDF417ErrorCorrectionLevel ErrorCorrectionLevelUsed {get;}
[C++]
public: __property PDF417ErrorCorrectionLevel get_ErrorCorrectionLevelUsed();
[C++/CLI]
public:
property PDF417ErrorCorrectionLevel ErrorCorrectionLevelUsed {
   PDF417ErrorCorrectionLevel get();
}

Remarks

This property gets the error correction level value used in creation of the PDF417 barcode.

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Rows Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : Rows Property

Gets and sets the number of rows desired in the PDF417 barcode.

[Visual Basic]
Public Property Rows As Integer
[C#]
public int Rows {get; set;}
[C++]
public: __property int get_Rows();
public: __property void set_Rows(
   int value
);
[C++/CLI]
public:
property int Rows {
   int get();
   void set (int value);
}

Remarks

The default value is -1

If the value is -1 then the number of rows will be determined

when the barcode is created.

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%%

WriterPDF417 Class | WriterPDF417 Members

Requirements

Platforms: See Getting Started section

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowsCreated Property

PegasusImaging.WinForms.BarcodeXpress5 Namespace > WriterPDF417 Class : RowsCreated Property

Gets the rows created in the PDF417 barcode.

[Visual Basic]
Public ReadOnly Property RowsCreated As Integer
[C#]
public int RowsCreated {get;}
[C++]
public: __property int get_RowsCreated();
[C++/CLI]
public:
property int RowsCreated {
   int get();
}

Remarks

This property gets the number of rows that were created in the PDF417 barcode.

Requirements

Platforms: See Getting Started section

See Also

WriterPDF417 Class | WriterPDF417 Members


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

AustralianPostCustomDecodeType Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : AustralianPostCustomDecodeType Enumeration

The Australian Post 4 State barocde supports a custom section in both the Customer Barcode 2 and Customer Barcode 3 formats.

Members

Member | Description
BarStates | Returns the bar states of the custom section. This will be a string of A D F T values, where A - Ascending Bar D - Decending Bar F - Full Bar T - Tracking Bar
TableN | The bars in the custom section are decoded using the "N" Table defined by the Australian Post 4 State Barcode specification. This will result in numeric values, for the custom section, of the barcode value
TableC | The bars in the custom section are decoded using the "C" Table defined by the Australian Post 4 State Barcode specification. This will result in Alphanumeric values, for the custom section, of the barcode value
NoCustomDecode | The bars in the custom section are not decoded

Remarks

The recommended bar encodings in this section is either Table-N or Table-C encoding, but the customer is also free to put their own encoding in this section.

The type of encoding, in the custom section, is not stored in the barcode format. The end customer must know the encoding prior to decoding the barcode.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeStatus Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeStatus Enumeration

Indicates the barcode image is either acceptable, possibly out of range or invalid.

Members

Member | Description
Status_OK | Indicates no problems are found. This is the default status.
Status_Warning | Indicates barcodes are not in range or available, but the error is not critical and may be recoverable.
Status_Error | Indicates an invalid condition occurred as something is not set properly.

Remarks

The default value is Status_OK.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeType Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeType Enumeration (PegasusImaging.WinForms.BarcodeXpress5)

Specifies a barcode type.

Members

Member | Description
UnknownBarcode | Indicates an unknown barcode.
Industry2of5Barcode | Indicates an Industry 2 of 5 barcode type.
Interleaved2of5Barcode | Indicates an Interleaved 2 of 5 barcode type.
IATA2of5Barcode | Indicates an IATA 2 of 5 barcode type.
DataLogic2of5Barcode | Indicates a DataLogic 2 of 5 barcode type.
Invert2of5Barcode | Indicates an Inverted 2 of 5 barcode type.
BCDMatrixBarcode | Indicates a BCD Matrix barcode type.
Matrix2of5Barcode | Indicates a Matrix 2 of 5 barcode type.
Code32Barcode | Indicates a Code 32 barcode type.
Code39Barcode | Indicates a Code 39 barcode type.
Code39ExtendedBarcode | Indicates a Code 39 Extended barcode type.
CodabarBarcode | Indicates a Codabar barcode type.
Code93Barcode | Indicates a Code 93 barcode type.
Code93ExtendedBarcode | Indicates a Code 93 Extended barcode type.
Code128Barcode | Indicates a Code 128 barcode type.
EAN13Barcode | Indicates an EAN-13 barcode. This also supports a JAN barcode which is an EAN-13 with country code 49.
EAN8Barcode | Indicates an EAN-8 barcode type.
UPCABarcode | Indicates a UPC-A barcode type.
UPCEBarcode | Indicates a UPC-E barcode type.
Add5Barcode | Indicates an Add 5 barcode type.
Add2Barcode | Indicates an Add 2 barcode type.
EAN128Barcode | Indicates an EAN-128 barcode type.
PatchCodeBarcode | Indicates a Patch Code.
PostNetBarcode | Indicates a PostNet barcode type.
PDF417Barcode | Indicates a PDF417 barcode type.
DataMatrixBarcode | Indicates a DataMatrix barcode type.
QRCodeBarcode | QR Code barcode
IntelligentMailBarcode | United States Postal IntelligentMail 4 State barcode
RoyalPost4StateBarcode | Royal Post 4 State barocode
AustralianPost4StateBarcode | Australian Post 4 State barcode

Remarks

The default value is UnknownBarcode.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

DataMatrixSizes Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : DataMatrixSizes Enumeration

The rows and columns are encoded in the value of the enumerations using this equation: RowsXColumnsY = X * 256 + Y. AutoRowsAndColumns is -1.

Members

Member | Description
AutoRowsAndColumns | Auto size the Datamatrix barcode
Rows10Columns10 | 10 x 10 Datamatrix
Rows12Columns12 | 12 x 12 Datamatrix
Rows14Columns14 | 14 x 14 Datamatrix
Rows16Columns16 | 16 x 16 Datamatrix
Rows18Columns18 | 18 x 18 Datamatrix
Rows20Columns20 | 20 x 20 Datamatrix
Rows22Columns22 | 22 x 22 Datamatrix
Rows24Columns24 | 24 x 24 Datamatrix
Rows26Columns26 | 26 x 26 Datamatrix
Rows32Columns32 | 32 x 32 Datamatrix
Rows36Columns36 | 36 x 36 Datamatrix
Rows40Columns40 | 40 x 40 Datamatrix
Rows44Columns44 | 44 x 44 Datamatrix
Rows48Columns48 | 48 x 48 Datamatrix
Rows52Columns52 | 52 x 52 Datamatrix
Rows64Columns64 | 64 x 64 Datamatrix
Rows72Columns72 | 72 x 72 Datamatrix
Rows80Columns80 | 80 x 80 Datamatrix
Rows88Columns88 | 88 x 88 Datamatrix
Rows96Columns96 | 96 x 96 Datamatrix
Rows104Columns104 | 104 x 104 Datamatrix
Rows120Columns120 | 120 x 120 Datamatrix
Rows132Columns132 | 132 x 132 Datamatrix
Rows144Columns144 | 144 x 144 Datamatrix
Rows8Columns18 | 8 x 18 Datamatrix
Rows8Columns32 | 8 x 32 Datamatrix
Rows12Columns26 | 12 x 26 Datamatrix
Rows12Columns36 | 12 x 36 Datamatrix
Rows16Columns36 | 16 x 36 Datamatrix
Rows16Columns48 | 16 x 48 Datamatrix

Remarks

A C# type cast of (DataMatrixSizes) (22 * 256 + 22) is equivalent to Rows22Columns22. use this with caution since only the specified sizes of the enumerations are allowed and all others will cause an exception.

Caution: An anomaly has been identified for DataMatrix 144 x 144 barcodes written by several competitors'components. For this size only, barcodes created using those components do not adhere to the DataMatrix barcode specification. Because Pegasus Imaging does adhere to the DataMatrix specification, those competitors'components will not correctly read 144 x 144 size DataMatrix written by BarcodeXpress.

When reading 144 x 144 DataMatrix barcodes, BarcodeXpress will assume that the barcodes adhere to the specification. If reading fails, the component will automatically attempt to apply the recognition algorithm that will work on barcodes written by the competitors components, and report the results. The barcode reader will not be notified that the barcode did not adhere to the specification. For these barcodes only, recognition speed will be impacted.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace | DebugLogFile Property | ErrorLevel Property

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorLevelInfo Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ErrorLevelInfo Enumeration

Defines the amount of error information to write to the DebugLogFile.

Members

Member | Description
Production | Place minimal information into the DebugLogFile.
Development | Place information into the DebugLogFile that is useful during normal development using this component.
Detailed | Place as much information into the DebugLogFile as possible. You should use tis option when you are tracking down a problem.

Remarks

This enumeration allows you to specify the amount of detail to place into the DebugLogFile and can be set by the ErrorLevel property.

The default value is Production.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace | DebugLogFile Property | ErrorLevel Property


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace | EvaluationMode Property

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

EvaluationChoice Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : EvaluationChoice Enumeration

The evaluation choice of the component.

Members

Member | Description
TrialDialog | Automatic evaluation mode. When possible, this component will automatically detect that it is running without a user interface and switch to another evaluation mode. Otherwise, it will display the evaluation mode dialog box.
Timeout | Timeout evaluation mode. When running in evaluation mode, this component will timeout after 5 minutes instead of displaying the evaluation mode dialog box. This is the appropriate evaluation mode for applications that have no user interface.

Remarks

To simplify your evaluation of this component, Pegasus Imaging Corporation has implemented an evaluation mode. Normally, this mode will display a dialog box reminding you that you are using evaluation mode. In certain environments with no user interface, such as services, displaying a dialog box will cause the application to stop and you must change the evaluation mode to avoid that problem.

Note: In addition to a dialog box displaying while using the trial version, Barcode Xpress will randomly replace portions of text in the output with "www.PegasusImaging.com".

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace | EvaluationMode Property


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InkColorInfo Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InkColorInfo Enumeration

Specifies the ink color for barcodes search.

Members

Member | Description
Unknown | Both black and white ink color barcodes will be searched.
Black | Black ink colored barcodes will be searched. This is the default.
White | White ink colored barcodes will be searched.

Remarks

To improve recognition and speed by reducing search criteria, set this property correctly.

Default value: Black

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace | Trial Mode | Development Mode | Runtime Licensing | License Agreement | LicenseEdition Property

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LicenseChoice Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : LicenseChoice Enumeration

The license edition of the component.

Members

Member | Description
StandardEdition | This edition reads approximately 20 barcodes per second, or no more than 80% of the fastest speed possible on the CPU, whichever is slower. Read and Write of all 1D barcodes is supported. Read of 2D is NOTE supported.
ProfessionalEdition | This edition reads as fast as the processor can handle. Read and Write of all 1D barcodes is supported. Read of 2D barcodes is supported. This edition also supports creation of applications that read at Standard, Professional and Professional Plus 2D Write speeds using the LicenseEdition property.
ProfessionalPlus2DWriteEdition | In addition to all the features the regular Professional edition supports including unlimited speed, this new edition also includes the ability to write WriterPDF417 and WriterDataMatrix 2D barcodes.

Remarks

The default value is ProfessionalEdition.

The component can run in different modes, depending on which edition you purchase.

Note: In order to move from the default ProfessionalEdition to ProfessionalPlus2DWriteEdition, follow te same steps outlined in Trial Mode.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace | Trial Mode | Development Mode | Runtime Licensing | License Agreement | LicenseEdition Property


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OrientationInfo Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : OrientationInfo Enumeration

Specifies the orientation for the barcode search.

Members

Member | Description
AllOrientations | Barcodes with both a vertical and horizontal orientation will be searched.
HorizontalVertical | Search for barcodes in horizontal and vertical direction
Horizontal | Barcodes with only a horizontal orientation will be searched.
Vertical | Barcodes with only a vertical orientation will be searched.
HorizontalVerticalDiagonal | Barcodes will be searched for in Horizotal, Vertical and 45 degrees. This will increase processing time

Remarks

The default value is AllOrientations.

To improve recognition and speed by reducing search criteria, set this property correctly.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417ErrorCorrectionLevel Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : PDF417ErrorCorrectionLevel Enumeration

PDF417 Error correction levels.

Members

Member | Description
ErrorCorrectionAuto | Auto error correction level - choses the best error correction level based on the number of code words in the data stream.
ErrorCorrection0 | Error Correction Level 0 - 2 Code words
ErrorCorrection1 | Error Correction Level 1 - 4 Code words
ErrorCorrection2 | Error Correction Level 2 - 8 Code words
ErrorCorrection3 | Error Correction Level 3 - 16 Code words
ErrorCorrection4 | Error Correction Level 4 - 32 Code words
ErrorCorrection5 | Error Correction Level 5 - 64 Code words
ErrorCorrection6 | Error Correction Level 6 - 128 Code words
ErrorCorrection7 | Error Correction Level 7 - 256 Code words
ErrorCorrection8 | Error Correction Level 8 - 512 Code words

Remarks

The error correction level for the PDF417 ranges from a low of 0 (2 code words of error correction) to a high of 8 (512 code words of error correction). A high error correction level should be used in application where symbol damage is expected. It is recomended that the Auto error correction level be used in most cases.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%%

PegasusImaging.WinForms.BarcodeXpress5 Namespace

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

Language

Visual Basic

C#

C++

C++/CLI

Show All

See Also Languages Requirements PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ShowTextInfo Enumeration

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ShowTextInfo Enumeration

Specifies the text to display adjacent to the created barcode.

Members

Member | Description
None | No text is displayed.
Value | Only the value is displayed.
ValueAndCheckSum | The value and check sum is displayed.
All | All possible text is displayed.

Remarks

The default value isAll.

Requirements

Namespace: PegasusImaging.WinForms.BarcodeXpress5

Assembly: PegasusImaging.WinForms.BarcodeXpress5 (in PegasusImaging.WinForms.BarcodeXpress5.dll)

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Empty Index Entry

Empty Index Entry

The index entry you selected has no target topics associated with it.

If you have chosen a parent entry, please select a child entry.


%%ItemTitle%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Topic Not Found

Topic Not Found

The link you just clicked was not able to connect to the target page.

Some possible reasons and remedies are as follows:

Reason | Remedy
Destination topic is not part of the area you specified in the Filtered by field. | Either select another filter or select (no filter).
The URL of the destination topic is incorrect or has changed. | Use the index or the search function instead.
Problems with the help installation. | Rerun Setup for the product this help is related to and select the 'Repair' option.

Additional help is available for filters, search, and the index.

Click Back to return to the page you were on.

The target parameters are:

Keyword:
Index Moniker:
URL:


%%ItemTitle%%

Glossary Item Box

AustralianPostCustomDecodeMode Property | AustralianPostCustomDecodeType Enumeration

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Australian Post 4 State Barcode

Below is an example of the Australian 4-state Postal Code.

The Australian Post 4 State barcode is a 4 state barcode. It supports four different formats:

  • Standard
  • Customer Barcode 2
  • Customer Barcode 3
  • Reply Paid Barcode

The Customer Barcodes 2 & 3 include a customer field for encoding data. This barcode also supports the Reed-Solomon error correction scheme.

Format Control Field

The Format Control Field is a 2 digit field identifying the barcode type:

  • 11 - Standard Customer Barcode
  • 59 - Customer Barcode 2
  • 62 - Customer Barcode 3
  • 45 - Reply Paid Barcode

Sorting Code

The Sorting Code is an 8 character sorting code (Delivery Point ID)

Customer Information

There is a free format area available in the Customer Barcodes 2 & 3. This will be decoded using the AustrailianPostCustomDecodeType.

  • If the decode mode is "BarStates" then the output will be either bar state "F" full bar, "T" tracker bar, "A" ascending bar or "D" descending bar.
  • If the decode mode is "TableN" then the output will be decoded using the numeric decoding defined in the Australian Post specification.
  • If the decode mode is "TableC" then the output will be decoded using the character decoding defined in the Australian Post specification.

Copyright J4L Components ( http://www.java4less.com ) 2006.

See Also

AustralianPostCustomDecodeMode Property | AustralianPostCustomDecodeType Enumeration


%%Variable%%

Glossary Item Box

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Glossary

A | B | C | D | E | F | G | H | I | J | K | L | M | N | O | P | Q | R | S | T | U | V | W | X | Y | Z


%%ItemTitle%%

Glossary Item Box

Checksums | PostNet

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Intelligent Mail Barcode

The Intelligent Mail Barcode is also known as the UPSP OneCode Solution or USPS 4-State Customer Barcode (abbreviated 4CB, 4-CB, or USPS4CB). This barcode is adopting a new 4-state 1D barcode that includes more address information than the current code. A sample is shown below. Further information can be found at the USPS Web site: http://ribbs.usps.gov/onecodesolution/.

The Intelligent Mail barcode combines information currently found in the PostNet and Planet barcodes. The length of the barcode is fixed at 65 bars. It also contains a CRC-Checksum for verifying the barcode value. There is no error correction. The output of the barcode is a 20, 25, 29 or 31 digit string (0, 5, 9 or 11 digit zip code) containing the following data:

(© USPS-B-3200,Pages 4-5,file:SPUSPS-B3200B001.pdf)

Statistics

The Mailer ID is a field within the Intelligent Mail barcodes that is used to identify Mail Owners and/or Mailing Agents. The IDs are assigned by the USPS to each Mail Owner and/or Mailing Agent that requests them. A Mailer ID can be a 9-digit field or a 6-digit field. The USPS assigns 6-digit or 9-digit Mailer IDs based upon the mail volume of the mailer.

  • The barcode identifier is a 2 digit field assigned by the USPS. The first digit ranges from 0-9 and the second digit ranges from 0-4.

Note: All 6-digit MIDs (Mailer IDs), assigned by USPS will begin with 0 through 8. All 9-digit MIDs will begin with the number 9.

  • Special services include a 3 digit field assigned by the USPS for any special services which range from 000-999.
  • The customer identifier is a 6 digit field assigned by the USPS and is unique for each customer. The range is from 000000000-999999999.
  • The sequence number is a 9 digit field assigned by the mailer for tracking mail pieces which range from 000000000-999999999.
  • The zip code is a 0, 5, 9, or 11 digit zip code which range from none, 00000-99999, 000000000-999999999, 00000000000-99999999999.
See Also

Checksums | PostNet


%%phrase%%

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Assembly Overview

Namespaces

Namespace | Description
PegasusImaging.WinForms.BarcodeXpress5 |


$$GETTING_STARTED$$ - %%projecttitle%%

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Getting Started

© 1997 - 2007, Pegasus Imaging Corporation, All Rights Reserved.


$$INTRODUCTION$$ - %%projecttitle%%

PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Introduction

© 1997 - 2007, Pegasus Imaging Corporation, All Rights Reserved.


%%PageItemTitle%% $$Methods$$

BarcodeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeException Class

For a list of all members of this type, see BarcodeException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

BarcodeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Events$$

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Class Events

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeXpress Class

For a list of all members of this type, see BarcodeXpress members.

Public Events

Public Event Disposed (Inherited from System.ComponentModel.Component) Adds an event handler to listen to the Disposed event on the component.

See Also

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

BarcodeXpress Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : BarcodeXpress Class

For a list of all members of this type, see BarcodeXpress members.

Public Methods

Public Method AboutBox | Displays a dialog box that contains information about the component.
Public Method CreateObjRef (Inherited from System.MarshalByRefObject) | Creates an object that contains all the relevant information required to generate a proxy used to communicate with a remote object.
Public Method Dispose (Inherited from System.ComponentModel.Component) | Removes any unused memory. Releases all resources used by the Component.
Public Method GetLifetimeService (Inherited from System.MarshalByRefObject) | Retrieves the current lifetime service object that controls the lifetime policy for this instance.
Public Method InitializeLifetimeService (Inherited from System.MarshalByRefObject) | Obtains a lifetime service object to control the lifetime policy for this instance.
Public Method ReadFromStream | Reads a specially-formatted stream and places the values into properties of this object.
Public Method ToString (Inherited from System.ComponentModel.Component) | Returns a String containing the name of the Component, if any. This method should not be overridden.
Public Method WriteToStream | Writes some properties of this object to a specially-formatted stream.

See Also

BarcodeXpress Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

ColumnCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ColumnCountException Class

For a list of all members of this type, see ColumnCountException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ColumnCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

ColumnCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ColumnCountException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ColumnCountException Class

For a list of all members of this type, see ColumnCountException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

ColumnCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

ErrorCorrectionLevelTooHighException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ErrorCorrectionLevelTooHighException Class

For a list of all members of this type, see ErrorCorrectionLevelTooHighException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ErrorCorrectionLevelTooHighException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

ErrorCorrectionLevelTooHighException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ErrorCorrectionLevelTooHighException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ErrorCorrectionLevelTooHighException Class

For a list of all members of this type, see ErrorCorrectionLevelTooHighException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

ErrorCorrectionLevelTooHighException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

ImageNotAvailableException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ImageNotAvailableException Class

For a list of all members of this type, see ImageNotAvailableException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ImageNotAvailableException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

ImageNotAvailableException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ImageNotAvailableException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ImageNotAvailableException Class

For a list of all members of this type, see ImageNotAvailableException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

ImageNotAvailableException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InsufficientHeightException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientHeightException Class

For a list of all members of this type, see InsufficientHeightException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InsufficientHeightException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InsufficientHeightException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientHeightException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientHeightException Class

For a list of all members of this type, see InsufficientHeightException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InsufficientHeightException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InsufficientWidthException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientWidthException Class

For a list of all members of this type, see InsufficientWidthException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InsufficientWidthException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InsufficientWidthException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InsufficientWidthException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InsufficientWidthException Class

For a list of all members of this type, see InsufficientWidthException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InsufficientWidthException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InternalErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InternalErrorException Class

For a list of all members of this type, see InternalErrorException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InternalErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InternalErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InternalErrorException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InternalErrorException Class

For a list of all members of this type, see InternalErrorException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InternalErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidAreaException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidAreaException Class

For a list of all members of this type, see InvalidAreaException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidAreaException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidAreaException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidAreaException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidAreaException Class

For a list of all members of this type, see InvalidAreaException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidAreaException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidBarcodeValueException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBarcodeValueException Class

For a list of all members of this type, see InvalidBarcodeValueException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidBarcodeValueException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidBarcodeValueException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBarcodeValueException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBarcodeValueException Class

For a list of all members of this type, see InvalidBarcodeValueException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidBarcodeValueException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBitmapException Class

For a list of all members of this type, see InvalidBitmapException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidBitmapException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidBitmapException Class

For a list of all members of this type, see InvalidBitmapException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidErrorCorrectionLevelException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidErrorCorrectionLevelException Class

For a list of all members of this type, see InvalidErrorCorrectionLevelException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidErrorCorrectionLevelException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidErrorCorrectionLevelException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidErrorCorrectionLevelException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidErrorCorrectionLevelException Class

For a list of all members of this type, see InvalidErrorCorrectionLevelException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidErrorCorrectionLevelException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidIndexException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidIndexException Class

For a list of all members of this type, see InvalidIndexException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidIndexException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidIndexException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidIndexException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidIndexException Class

For a list of all members of this type, see InvalidIndexException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidIndexException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidLicenseException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidLicenseException Class

For a list of all members of this type, see InvalidLicenseException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidLicenseException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidLicenseException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidLicenseException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidLicenseException Class

For a list of all members of this type, see InvalidLicenseException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidLicenseException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

InvalidParameterException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidParameterException Class

For a list of all members of this type, see InvalidParameterException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

InvalidParameterException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

InvalidParameterException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

InvalidParameterException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : InvalidParameterException Class

For a list of all members of this type, see InvalidParameterException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

InvalidParameterException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

LargeDataSizeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : LargeDataSizeException Class

For a list of all members of this type, see LargeDataSizeException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

LargeDataSizeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

LargeDataSizeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

LargeDataSizeException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : LargeDataSizeException Class

For a list of all members of this type, see LargeDataSizeException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

LargeDataSizeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

Licensing Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Licensing Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Licensing Class (PegasusImaging.WinForms.BarcodeXpress5)

For a list of all members of this type, see Licensing members.

Public Methods

Public Method UnlockRuntime | Unlocks the component for use in runtime environments.
Public Method UnlockWeb | Unlocks the component for use in web servers.

See Also

Licensing Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

OutOfMemoryException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : OutOfMemoryException Class

For a list of all members of this type, see OutOfMemoryException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

OutOfMemoryException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

OutOfMemoryException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

OutOfMemoryException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : OutOfMemoryException Class

For a list of all members of this type, see OutOfMemoryException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

OutOfMemoryException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

ParameterOutOfRangeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ParameterOutOfRangeException Class

For a list of all members of this type, see ParameterOutOfRangeException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

ParameterOutOfRangeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

ParameterOutOfRangeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

ParameterOutOfRangeException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : ParameterOutOfRangeException Class

For a list of all members of this type, see ParameterOutOfRangeException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

ParameterOutOfRangeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

PDF417EncodingException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : PDF417EncodingException Class

For a list of all members of this type, see PDF417EncodingException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

PDF417EncodingException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

PDF417EncodingException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PDF417EncodingException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : PDF417EncodingException Class

For a list of all members of this type, see PDF417EncodingException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

PDF417EncodingException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

Reader Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Reader Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Reader Class (PegasusImaging.WinForms.BarcodeXpress5)

For a list of all members of this type, see Reader members.

Public Methods

Public Method Analyze Overloaded. Detects barcodes on the given bitmap image.

See Also

Reader Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

RowCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : RowCountException Class

For a list of all members of this type, see RowCountException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

RowCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

RowCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

RowCountException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : RowCountException Class

For a list of all members of this type, see RowCountException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

RowCountException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

TimeoutErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : TimeoutErrorException Class

For a list of all members of this type, see TimeoutErrorException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

TimeoutErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

TimeoutErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

TimeoutErrorException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : TimeoutErrorException Class

For a list of all members of this type, see TimeoutErrorException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

TimeoutErrorException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

UnableCreateUPCEException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableCreateUPCEException Class

For a list of all members of this type, see UnableCreateUPCEException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

UnableCreateUPCEException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

UnableCreateUPCEException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableCreateUPCEException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableCreateUPCEException Class

For a list of all members of this type, see UnableCreateUPCEException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

UnableCreateUPCEException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

UnableReadBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableReadBitmapException Class

For a list of all members of this type, see UnableReadBitmapException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

UnableReadBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

UnableReadBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnableReadBitmapException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnableReadBitmapException Class

For a list of all members of this type, see UnableReadBitmapException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

UnableReadBitmapException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

UnsupportBarcodeTypeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnsupportBarcodeTypeException Class

For a list of all members of this type, see UnsupportBarcodeTypeException members.

Public Methods

Public Method GetBaseException (Inherited from System.Exception) | When overridden in a derived class, returns the Exception that is the root cause of one or more subsequent exceptions.
Public Method GetObjectData (Inherited from System.Exception) | When overridden in a derived class, sets the SerializationInfo with information about the exception.
Public Method GetType (Inherited from System.Exception) | Gets the runtime type of the current instance.
Public Method ToString (Inherited from System.Exception) | Creates and returns a string representation of the current exception.

See Also

UnsupportBarcodeTypeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Properties$$

UnsupportBarcodeTypeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

UnsupportBarcodeTypeException Class Properties

PegasusImaging.WinForms.BarcodeXpress5 Namespace : UnsupportBarcodeTypeException Class

For a list of all members of this type, see UnsupportBarcodeTypeException members.

Public Properties

Public Property Data (Inherited from System.Exception) | Gets a collection of key/value pairs that provide additional, user-defined information about the exception.
Public Property HelpLink (Inherited from System.Exception) | Gets or sets a link to the help file associated with this exception.
Public Property InnerException (Inherited from System.Exception) | Gets the Exception instance that caused the current exception.
Public Property Message (Inherited from System.Exception) | Gets a message that describes the current exception.
Public Property Number (Inherited from BarcodeException) | Gets the number of the last error.
Public Property Source (Inherited from System.Exception) | Gets or sets the name of the application or the object that causes the error.
Public Property StackTrace (Inherited from System.Exception) | Gets a string representation of the frames on the call stack at the time the current exception was thrown.
Public Property TargetSite (Inherited from System.Exception) | Gets the method that throws the current exception.

See Also

UnsupportBarcodeTypeException Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

Writer Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

Writer Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : Writer Class (PegasusImaging.WinForms.BarcodeXpress5)

For a list of all members of this type, see Writer members.

Public Methods

Public Method Create (Inherited from WriterBase) | The main method for creating barcodes.
Public Method CreateBitmap (Inherited from WriterBase) | The method for creating bitmap barcodes.
Public Method Dispose (Inherited from WriterBase) | Disposes of unmanaged resources.

See Also

Writer Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

WriterBase Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterBase Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterBase Class

For a list of all members of this type, see WriterBase members.

Public Methods

Public Method Create | The main method for creating barcodes.
Public Method CreateBitmap | The method for creating bitmap barcodes.
Public Method Dispose | Disposes of unmanaged resources.

See Also

WriterBase Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

WriterDataMatrix Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterDataMatrix Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterDataMatrix Class

For a list of all members of this type, see WriterDataMatrix members.

Public Methods

Public Method Create (Inherited from WriterBase) | The main method for creating barcodes.
Public Method CreateBitmap (Inherited from WriterBase) | The method for creating bitmap barcodes.
Public Method Dispose (Inherited from WriterBase) | Disposes of unmanaged resources.

See Also

WriterDataMatrix Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%PageItemTitle%% $$Methods$$

WriterPDF417 Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

WriterPDF417 Class Methods

PegasusImaging.WinForms.BarcodeXpress5 Namespace : WriterPDF417 Class

For a list of all members of this type, see WriterPDF417 members.

Public Methods

Public Method Create (Inherited from WriterBase) | The main method for creating barcodes.
Public Method CreateBitmap (Inherited from WriterBase) | The method for creating bitmap barcodes.
Public Method Dispose (Inherited from WriterBase) | Disposes of unmanaged resources.

See Also

WriterPDF417 Class | PegasusImaging.WinForms.BarcodeXpress5 Namespace


%%ItemTitle%% $$INHERITANCE_HIERARCHY$$

PegasusImaging.WinForms.BarcodeXpress5 Assembly

See Also PegasusImaging.WinForms.BarcodeXpress5 Send comments on this topic.

PegasusImaging.WinForms.BarcodeXpress5 Namespace Inheritance Hierarchy

System.Object
PegasusImaging.WinForms.BarcodeXpress5.Licensing
PegasusImaging.WinForms.BarcodeXpress5.Reader
PegasusImaging.WinForms.BarcodeXpress5.Result
PegasusImaging.WinForms.BarcodeXpress5.WriterBase
PegasusImaging.WinForms.BarcodeXpress5.Writer
PegasusImaging.WinForms.BarcodeXpress5.WriterDataMatrix
PegasusImaging.WinForms.BarcodeXpress5.WriterPDF417
System.Exception
PegasusImaging.WinForms.BarcodeXpress5.BarcodeException
PegasusImaging.WinForms.BarcodeXpress5.ColumnCountException
PegasusImaging.WinForms.BarcodeXpress5.ErrorCorrectionLevelTooHighException
PegasusImaging.WinForms.BarcodeXpress5.ImageNotAvailableException
PegasusImaging.WinForms.BarcodeXpress5.InsufficientHeightException
PegasusImaging.WinForms.BarcodeXpress5.InsufficientWidthException
PegasusImaging.WinForms.BarcodeXpress5.InternalErrorException
PegasusImaging.WinForms.BarcodeXpress5.InvalidAreaException
PegasusImaging.WinForms.BarcodeXpress5.InvalidBarcodeValueException
PegasusImaging.WinForms.BarcodeXpress5.InvalidBitmapException
PegasusImaging.WinForms.BarcodeXpress5.InvalidErrorCorrectionLevelException
PegasusImaging.WinForms.BarcodeXpress5.InvalidIndexException
PegasusImaging.WinForms.BarcodeXpress5.InvalidLicenseException
PegasusImaging.WinForms.BarcodeXpress5.InvalidParameterException
PegasusImaging.WinForms.BarcodeXpress5.LargeDataSizeException
PegasusImaging.WinForms.BarcodeXpress5.OutOfMemoryException
PegasusImaging.WinForms.BarcodeXpress5.ParameterOutOfRangeException
PegasusImaging.WinForms.BarcodeXpress5.PDF417EncodingException
PegasusImaging.WinForms.BarcodeXpress5.RowCountException
PegasusImaging.WinForms.BarcodeXpress5.TimeoutErrorException
PegasusImaging.WinForms.BarcodeXpress5.UnableCreateUPCEException
PegasusImaging.WinForms.BarcodeXpress5.UnableReadBitmapException
PegasusImaging.WinForms.BarcodeXpress5.UnsupportBarcodeTypeException
System.MarshalByRefObject
System.ComponentModel.Component
PegasusImaging.WinForms.BarcodeXpress5.BarcodeXpress

See Also

PegasusImaging.WinForms.BarcodeXpress5 Namespace | PegasusImaging.WinForms.BarcodeXpress5 Assembly